目錄

簡介

應用程式故障「shared/VTLStatus.py」意味著什麼？

相關資訊

簡介

本文檔描述「shared/VTLStatus.py」應用程式故障。

應用程式故障「shared/VTLStatus.py」意味著什麼？

在思科電子郵件安全裝置(ESA)上，有兩種主要變體與此問題相關：

An application fault occurred:

('shared/VTLStatus.py getVTLstatus|42', "<type

'exceptions.UnboundLocalError'>", "local variable 'fp' referenced

before assignment", '[shared/VTLStatus.py getVTLstatus|42]')

An application fault occurred:

('shared/VTLStatus.py getVTLstatus|37', "<type

'exceptions.UnboundLocalError'>", "local variable 'vtl_score_pattern'

referenced before assignment", '[shared/VTLStatus.py getVTLstatus|37]')

此應用程式故障是一個暫時性問題，僅影響病毒爆發過濾器狀態的圖形表示形式。警報與裝置上經常運行的進程一起發出。這樣，就有可能收到一些警報，而不會使問題對ESA的效能造成干擾，因此可以安全地忽略該問題。

思科建議確保在ESA上運行當前且受支援的AsyncOS版本。

相關資訊

- Cisco Email Security Appliance — 最終使用手冊

- 技術支援與文件 - Cisco Systems