目录

简介

先决条件

要求

使用的组件

故障排除

验证CGR能否识别3G模块

检查3G模块是否已识别但没有连接

检查IP地址连接

检验Ping

打开TAC服务请求时要收集的信息

相关信息

简介

本文档介绍对带CG-OS的Cisco Connected Grid Router(CGR)1000系列路由器的3G模块进行故障排除的步骤。文章还就解决问题的问题、原因及解决措施进行了论述。

排除调制解调器故障时，第一步是确定CGR是否能识别模块。本文档说明确定此步骤所需的步骤以及如何继续此过程。

作者：Sumedha Phatak和Abhishek Kumar，Cisco TAC工程师。

先决条件

要求

Cisco 建议您了解以下主题：

- 通过CLI访问安装有3G模块和SIM卡的CGR 1000系列路由器，并提供活动数据计划。

- 3G无线网络覆盖在路由器的物理位置。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- CGR 1000系列路由器

- Cisco CG-OS软件

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

故障排除

排除调制解调器故障时，第一步是确定CGR是否能识别模块。

验证CGR能否识别3G模块

安装和配置3G模块后，CGR有时无法识别模块。

1.运行show cellular 3/1 all命令以验证CGR是否能识别模块并显示所有相关信息。如果输出中的所有字段都显示“unknown”，请重新加载模块，并等待最多两分钟，然后再次验证。

2.如果所有字段在重新加载后显示“未知”，请关闭/否关闭蜂窝网接口并等待最多两分钟，然后再次发出show cellular 3/1 all命令。

注意：如果所有字段值继续显示“未知”，请联系思科TAC以更换模块。附加带有上述故障排除的日志，并输出“show inventory”（显示库存）以获取序列号信息。

重新加载3G模块

使用此命令只重新加载3G模块。

ast03-cgr1120-cgosB# reload module 3

reloading module 3 ...

退回蜂窝网接口

使用此命令关闭/不关闭蜂窝网接口。

ast03-cgr1120-cgosB# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

ast03-cgr1120-cgosB(config)# interface cellular 3/1

ast03-cgr1120-cgosB(config-if)# shut   <<<<<<<<<<<<<<<<<   Wait for 30 sec

ast03-cgr1120-cgosB(config-if)# no shut

3G模块启动并工作时的输出示例

模块工作时输出“show cellular 3/1 all”。

ast03-cgr1120-cgosB# sh cellular 3/1 all

Hardware Information

====================

Modem Firmware Version = T1_0_3_2AP R361 CNSZXD00000061 2011/04/15 17:40:48

Modem Firmware Built = 04/15/11

Modem Hardware Version = 1.0

International Mobile Subscriber Identity (IMSI) = 867941410

International Mobile Equipment Identity (IMEI) = 357115040246303

Factory Serial Number (FSN) = CC3159202581007 04/15/11

Modem status = Online

Current Modem Temperature = 35 deg C

Current Temperature State = Normal

Profile Information

===================

--- Profile 1 details ---

Status = Activated

Default: Yes

PDP Type: IPv4

Profile IP: 192.0.2.1

Profile APN: broadband

Authentication: None

Profile UserName:

Profile Password:

Data Connection Information

===========================

Data Transmitted = 460 bytes

Data Received = 420 bytes

Profile 1, Packet Session Status = ACTIVATED

IP Address = 192.0.2.1

Network Information

===================

Modem status = Online

Service status = Normal

Service type = Combined

Current Roaming Status = Home

Country Initials = USA

Network name = AT&T

Mobile Country Code (MCC) = 310

Mobile Network Code (MNC) = 410

Location Area Code (LAC) = 28986

Routing Area Code (RAC) = 1

Cell ID = 50434

Primary Scrambling Code = 2

PLMN Selection = Automatic

Radio Information

=================

Current band = WCDMA_V_850

Radio power mode = On

Channel number = 4359

Band selected = Auto

Current RSSI = -92 dBm

Band Information

================

Number of bands:   5

Band 1: WCDMA: NA

Band 2: GSM PCS 850

Band 3: GSM ALL

Band 4: WCDMA ALL

Band 5: AUTO BAND

Current LED values

==================

WWAN: green

RSSI: amber

SIM Slot 0: off

SIM Slot 1: green

Service: green

GPS: off

检查3G模块是否已识别但没有连接

检查蜂窝网接口

发出show ip interface brief命令并验证蜂窝网接口是否收到IP且状态为UP。如果接口无法获取IP，请继续转到publishoot。

ast03-cgr1120-cgosB# sh ip int b

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Cell3/1              192.0.2.1       protocol-up/link-up/admin-up

检查信号强度

接收信号强度指示(RSSI)指示3G模块接收的信号的强度。这可以使用show cellular 3/1 radio命令进行检查。

ast03-cgr1120-cgosB# sh cellular 3/1 radio

Current band = WCDMA_V_850

Radio power mode = On

Channel number = 4359

Band selected = Auto

Current RSSI = -92 dBm

RSSI值：

1. RSSI至少应大于–90，以实现可靠连接。RSSI大于–60表示信号强度强。

2.如果RSSI小于–100，则模块将无法连接到网络。这可能是由于以下原因：

- 蜂窝网接口管理性关闭；no关闭蜂窝网接口并检查RSSI值是否更改。

- 模块卡在低功耗模式；shut/no shut the cellular interface并检查RSSI值是否更改。请等待30秒，然后发出no shut命令。

- 天线丢失或连接不正确。

- 该区域没有3G服务覆盖。

3.如果RSSI大于–60，则需要进行更多故障排除。启用调试以进一步分类问题。

检查IP地址连接

1.使用show ip interface brief和show cellular 3/1 all all命令验证模块是否发起出站呼叫并接收IP地址。调试输出示例，用于验证这一点：

2009 Feb  5 22:57:51.479132 dialer: Dialer1 is in READY state

2009 Feb  5 22:57:52 ast03-cgr1120-cgosB %DIALER-5-DIALER_DIAL_OUT: Dialer1 dial out cellular3/1 successfully

2009 Feb  5 22:57:52.572770 dialer: Dialer1 dial out cellular3/1 successfully

2009 Feb  5 22:57:55 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_CON_EST: Connection Established

2009 Feb  5 22:57:55.317420 cellpm: Get Ip from modem 192.0.2.1

2009 Feb  5 22:57:55.995243 cellpm: interface cellular 3/1 IP address 192.0.2.1

2.如果发出出站呼叫但未收到IP地址，请收集日志，通过show log查看断开原因 |无命令并将其附加到TAC案例。

3.如果没有出站呼叫请求，请执行空中初始化(IOTA)以验证是否可以建立连接（仅用于CDMA模块）。

cellular3/1 cdma activate otasp *22899

(i)如果IOTA连接成功，请检查硬件或配置问题。

- show interface cellual 3/1

- show controllers cellular 3/1

- show tech

(ii)如果IOTA连接不成功，请验证原因日志并发出以下命令：

- show log |否

成功连接时的调试输出示例：

2009 Feb  5 22:57:37 ast03-cgr1120-cgosB %DIALER-5-DIALER_MODEM_UP: Modem active

2009 Feb  5 22:57:37.758585 dialer: modem changes from DISABLE to ENABLE

2009 Feb  5 22:57:37.758652 dialer: CHAT SCRIPT CHAT profile 1

2009 Feb  5 22:57:37.758722 dialer: Dialer1 is in READY state

2009 Feb  5 22:57:37.758764 dialer: Dial out interface service is not ready yet

2009 Feb  5 22:57:37.762968 cellpm: Plmn Ready: 0

2009 Feb  5 22:57:37 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_SIM_STATUS: SIM Status: SIM Okay

2009 Feb  5 22:57:37.763128 cellpm: SIM Status: SIM Okay

2009 Feb  5 22:57:37.763231 cellpm: Rec'd Modem Radio Power Enable

2009 Feb  5 22:57:37.763520 cellpm: Receive modem enabled notification

2009 Feb  5 22:57:37 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_MODEM_UP: Modem enabled

2009 Feb  5 22:57:37.766192 dialer: Modem Enable on interface 29100000

2009 Feb  5 22:57:37.766257 dialer: Rec'd cellular3/1 modem ENABLE notification

2009 Feb  5 22:57:37.766303 dialer: current modem state is ENABLE

2009 Feb  5 22:57:39.485643 cellpm: Network Service Status: Emergency

2009 Feb  5 22:57:39.485697 cellpm: Network Service Type: Invalid Service

2009 Feb  5 22:57:39.485932 cellpm: Send MTS opcode 183321 to sap 776 if_index 29100000

2009 Feb  5 22:57:39.488392 dialer: Modem service is out for interface 29100000

2009 Feb  5 22:57:39.488686 cellpm: Service Type: 0

2009 Feb  5 22:57:39.488787 cellpm: Registration Indication:

2009 Feb  5 22:57:39 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_NETWORK_NAME:

2009 Feb  5 22:57:39.488851 cellpm:

2009 Feb  5 22:57:41.360863 cellpm: Network Service Status: Emergency

2009 Feb  5 22:57:41.360928 cellpm: Network Service Type: Invalid Service

2009 Feb  5 22:57:41.361704 cellpm: Send MTS opcode 183321 to sap 776 if_index 29100000

2009 Feb  5 22:57:41.364084 cellpm: Service Type: 0

2009 Feb  5 22:57:41.364157 dialer: Modem service is out for interface 29100000

2009 Feb  5 22:57:41.364938 cellpm: Registration Indication:

2009 Feb  5 22:57:41.365040 cellpm:

2009 Feb  5 22:57:41.466717 cellpm: Network Service Status: Emergency

2009 Feb  5 22:57:41.466770 cellpm: Network Service Type: Invalid Service

2009 Feb  5 22:57:41.467005 cellpm: Send MTS opcode 183321 to sap 776 if_index 29100000

2009 Feb  5 22:57:41.469358 cellpm: Service Type: 0

2009 Feb  5 22:57:41.469444 dialer: Modem service is out for interface 29100000

2009 Feb  5 22:57:41.469478 cellpm: Registration Indication:

2009 Feb  5 22:57:41.469568 cellpm:

2009 Feb  5 22:57:41.469645 cellpm: Network Service Status: Normal

2009 Feb  5 22:57:41.469689 cellpm: Network Service Type: Combined

2009 Feb  5 22:57:41.469733 cellpm: Modem Status Normal notify dialer

2009 Feb  5 22:57:41.469929 cellpm: Send MTS opcode 183299 to sap 776 if_index 29100000

2009 Feb  5 22:57:41.472329 dialer: Modem Enable on interface 29100000

2009 Feb  5 22:57:41.472382 dialer: Rec'd cellular3/1 modem ENABLE notification

2009 Feb  5 22:57:41.472427 dialer: current modem state is ENABLE

2009 Feb  5 22:57:41.477311 cellpm: MTS_OPC_CELLPM_SERVICE_READY send at port 3

2009 Feb  5 22:57:41.477369 cellpm: Service Type: 6

2009 Feb  5 22:57:41.477405 dialer: Modem service is ready for interface 29100000

2009 Feb  5 22:57:41.477456 dialer: Rec'd cellular3/1 AT port 3

2009 Feb  5 22:57:41.477466 cellpm: Registration Indication:

2009 Feb  5 22:57:41.477504 cellpm:  Network Name: AT&T

2009 Feb  5 22:57:41.477512 dialer: timer start #0 if_index 29100000

2009 Feb  5 22:57:41 ast03-cgr1120-cgosB last message repeated 2 times

2009 Feb  5 22:57:41 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_NETWORK_NAME:  AT&T

2009 Feb  5 22:57:41.477560 dialer: Create time for msg 0

2009 Feb  5 22:57:41.477589 cellpm:

2009 Feb  5 22:57:41.477601 dialer: dialer_timer_start start timer

2009 Feb  5 22:57:48.636548 cellpm: cellpm_timer_msg_handler 0xb610052c Message type is 0

2009 Feb  5 22:57:48.636609 cellpm: timer expired if_index 29100000

2009 Feb  5 22:57:48.637429 cellpm: The onboard temp is 30

2009 Feb  5 22:57:48.639603 cellpm: temperature timer start if_index 29100000

2009 Feb  5 22:57:48.639666 cellpm: Create time for msg 0

2009 Feb  5 22:57:48.639711 cellpm: cellpm_timer_start start timer

2009 Feb  5 22:57:48.655443 cellpm: Modem Status Online

2009 Feb  5 22:57:48.655495 cellpm: temp 30 low crit -26 norm -23 admin state 1

2009 Feb  5 22:57:51.479034 dialer: timer expired if_index 29100000

2009 Feb  5 22:57:51.479098 dialer: CHAT SCRIPT CHAT profile 1

2009 Feb  5 22:57:51.479132 dialer: Dialer1 is in READY state

2009 Feb  5 22:57:52.572492 dialer: timeout_val 60 dialer_retry_num 1

2009 Feb  5 22:57:52.572572 dialer: timer start #1 if_index 29100000

2009 Feb  5 22:57:52.572627 dialer: Create time for msg 0

2009 Feb  5 22:57:52.572673 dialer: dialer_timer_start start timer

2009 Feb  5 22:57:52 ast03-cgr1120-cgosB %DIALER-5-DIALER_DIAL_OUT: Dialer1 dial out cellular3/1 successfully

2009 Feb  5 22:57:52.572770 dialer: Dialer1 dial out cellular3/1 successfully

2009 Feb  5 22:57:52.573620 cellpm: Plmn Ready: 0

2009 Feb  5 22:57:54.497230 cellpm: Network Service Status: Normal

2009 Feb  5 22:57:54.497286 cellpm: Network Service Type: Combined

2009 Feb  5 22:57:54.497329 cellpm: Modem Status Normal notify dialer

2009 Feb  5 22:57:54.497553 cellpm: Send MTS opcode 183299 to sap 776 if_index 29100000

2009 Feb  5 22:57:54.497771 dialer: Modem Enable on interface 29100000

2009 Feb  5 22:57:54.497831 dialer: Rec'd cellular3/1 modem ENABLE notification

2009 Feb  5 22:57:54.497880 dialer: current modem state is ENABLE

2009 Feb  5 22:57:54.508855 dialer: Modem service is ready for interface 29100000

2009 Feb  5 22:57:54.508924 dialer: Rec'd cellular3/1 AT port 3

2009 Feb  5 22:57:54.508972 dialer: Dial out timer started already

2009 Feb  5 22:57:54.509194 cellpm: MTS_OPC_CELLPM_SERVICE_READY send at port 3

2009 Feb  5 22:57:54.509259 cellpm: Service Type: 6

2009 Feb  5 22:57:55 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_GSM_SESSION_ACTIVE: GSM Profile 1 is activated

2009 Feb  5 22:57:55.295970 cellpm: GSM profile 1 is activated

2009 Feb  5 22:57:55.296018 cellpm: Activation Status:             1

2009 Feb  5 22:57:55.296062 cellpm: Negotiated QoS:                1

2009 Feb  5 22:57:55.296103 cellpm: Negotiated Precedence:         2

2009 Feb  5 22:57:55.296334 cellpm: Send MTS - PKT SESS ACTIVATED to dialer

2009 Feb  5 22:57:55.296695 dialer: Session activated. Dialer1 stop dialing

2009 Feb  5 22:57:55 ast03-cgr1120-cgosB %DIALER-5-DIALER_CON_EST: Connection Established

2009 Feb  5 22:57:55.297250 cellpm: Rec'd session active notification

2009 Feb  5 22:57:55 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_CON_EST: Connection Established

2009 Feb  5 22:57:55.317420 cellpm: Get Ip from modem 192.0.2.1

2009 Feb  5 22:57:55 ast03-cgr1120-cgosB %URIB-4-ZERO_NEXTHOP:  urib [3445] (default-base) Client "static" added 0.0.0.0 next hop and interface Cellular3/1 is not point-to-point

2009 Feb  5 22:57:55 ast03-cgr1120-cgosB %VSHD-5-VSHD_SYSLOG_CONFIG_I: Configured from vty by root on vsh.28455

2009 Feb  5 22:57:55.995243 cellpm: interface cellular 3/1 IP address 192.0.2.1

2009 Feb  5 22:57:55.998937 cellpm: Send MTS opcode 229378 to sap 776 if_index 29100000

2009 Feb  5 22:57:56.006669 cellpm: Service Type: 6

2009 Feb  5 22:57:56 ast03-cgr1120-cgosB %CELLPM-5-CELLPM_STATE_CHANGE: Moving to State: Connected

2009 Feb  5 22:58:03.100719 cellpm: Network Service Status: Normal

2009 Feb  5 22:58:03.100788 cellpm: Network Service Type: Combined

2009 Feb  5 22:58:03.100835 cellpm: Modem Status Normal notify dialer

2009 Feb  5 22:58:03.101097 cellpm: Send MTS opcode 183299 to sap 776 if_index 29100000

2009 Feb  5 22:58:03.103525 cellpm: Service Type: 6

2009 Feb  5 22:58:03.103560 dialer: Modem Enable on interface 29100000

2009 Feb  5 22:58:03.103610 dialer: Rec'd cellular3/1 modem ENABLE notification

2009 Feb  5 22:58:03.103654 dialer: current modem state is ENABLE

2009 Feb  5 22:58:03.732185 cellpm: Service Type: 6

2009 Feb  5 22:58:38.918415 cellpm: Get Ip from modem 192.0.2.1

2009 Feb  5 22:58:38.969173 cellpm: Get Ip from modem 192.0.2.1

检验Ping

如果蜂窝网接口收到IP，且接口状态为UP，请检验对公有IP的ping是否成功。如果ping不成功，请检查默认路由是否配置正确。

ast03-cgr1120-cgosB# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

ast03-cgr1120-cgosB(config)#ip route 0.0.0.0 0.0.0.0 Cellular3/1

ast03-cgr1120-cgosB# show ip route

0.0.0.0/0, ubest/mbest: 1/0

*via Cellular3/1, [1/0], 00:06:05, static

ast03-cgr1120-cgosB# ping 8.8.8.8

PING 8.8.8.8 (8.8.8.8): 56 data bytes

64 bytes from 8.8.8.8: icmp_seq=0 ttl=54 time=1786.39 ms

64 bytes from 8.8.8.8: icmp_seq=1 ttl=54 time=89.716 ms

64 bytes from 8.8.8.8: icmp_seq=2 ttl=54 time=89.699 ms

64 bytes from 8.8.8.8: icmp_seq=3 ttl=54 time=99.691 ms

64 bytes from 8.8.8.8: icmp_seq=4 ttl=54 time=119.689 ms

--- 8.8.8.8 ping statistics ---

5 packets transmitted, 5 packets received, 0.00% packet loss

round-trip min/avg/max = 89.699/437.037/1786.39 ms

打开TAC服务请求时要收集的信息

如果您打开TAC服务请求，请将此信息附加到您的请求中，以排除3G调制解调器问题：

- 对相关日志执行故障排除的详细信息

- show tech

- show log |否

- debug chat trace

- debug cellular trace

- debug dialer trace

相关信息

- http://www.cisco.com/c/en/us/td/docs/routers/connectedgrid/modules/3g/Cisco_Connected_Grid_3G_Module_Installation_and_Configuration_Guide.html

- 技术支持和文档 - Cisco Systems