内容

概要

前提条件

要件

使用するコンポーネント

関連製品

表記法

手順

パスワード回復手順の例

関連情報

概要

このドキュメントでは、イネーブル パスワードとイネーブル シークレット パスワードを回復する方法について説明します。これらのパスワードは、特権 EXEC モードおよびコンフィギュレーション モードへのアクセスを保護します。イネーブル パスワードは回復可能ですが、イネーブル シークレット パスワードは暗号化されているため、新しいパスワードで置き換える必要があります。イネーブル シークレット パスワードを置き換えるには、このドキュメントで説明されている手順に従ってください。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、Cisco 12000 シリーズ ルータに基づくものです。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

関連製品

関連製品のパスワードの回復方法については、『パスワード回復手順』を参照してください。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

手順

次の手順に従って、パスワードを回復してください。

1. ターミナルまたはターミナル エミュレーションを搭載した PC をルータのコンソール ポートに接続します。

次のターミナル設定を使用してください。

- 9600 ボーレート

- パリティなし

- 8 データ ビット

- 1 ストップ ビット

- フロー制御なし

ケーブルの接続方法と、ターミナルをコンソール ポートまたは AUX ポートに接続する方法については、次のドキュメントを参照してください。

- コンソールおよび補助ポートに関するケーブル接続ガイド

- Catalyst スイッチのコンソール ポートに端末を接続する方法

- Catalyst スイッチのコンソール ポートに端末を接続する方法

2. ルータにアクセスできる場合は、プロンプトで show version と入力し、コンフィギュレーション レジスタ設定を記録します。show version コマンドの出力を見るには、「パスワード回復手順の例」を参照してください。

注：コンフィギュレーションレジスタは、通常0x2102または0x102に設定されます。ルータにアクセスできない場合（ログインまたはTACACSパスワードが失われたため）、コンフィギュレーションレジスタが0x2102に設定されていると仮定できます。

3. 電源スイッチを使用してルータの電源をオフにしてから、ルータの電源をオンに戻します。

特記事項：

- このステップと同等のことを Cisco 6400 で行うには、Node Route Processor（NRP; ノード ルート プロセッサ）カードまたは Node Switch Processor（NSP; ノード スイッチ プロセッサ）カードを引き抜いてから、差し込みします。

- NI-2 が装着された Cisco 6x00 でこのステップをシミュレートするには、NI-2 カードを取り外して、再び差し込みます。

4. ルータを ROMmon 状態にするため、電源投入から 60 秒以内にターミナルのキーボードの Break キーを押します。

ブレーク シーケンスが正しく動作しない場合、他のキーの組み合わせについて、『パスワード回復時の標準的なブレーク キー シーケンスの組み合わせ』を参照してください。

5. フラッシュからブートするため、rommon 1> プロンプトで confreg 0x2142 と入力します。

この手順により、パスワードが格納されているスタートアップ コンフィギュレーションをバイパスします。

6. rommon 2> プロンプトで reset と入力します。

ルータがリブートしますが、保存されたコンフィギュレーションは無視されます。

7. セットアップのそれぞれの質問の後に no と入力するか、Ctrl+C キーを押して初期セットアップ手順をスキップします。

8. Router> プロンプトで enable と入力します。

これでイネーブル モードになり、Router# プロンプトが表示されます。

9. configure memory または copy startup-config running-config と入力して、不揮発性 RAM（NVRAM）の内容をメモリにコピーします。

重要：copy running-config startup-config や write は入力しないでください。これらのコマンドを使用すると、スタートアップ コンフィギュレーションが消去されます。

10. show running-config と入力します。

show running-config コマンドにより、ルータのコンフィギュレーションが表示されます。このコンフィギュレーションでは、shutdown コマンドがすべてのインターフェイスに設定されています。つまり、すべてのインターフェイスが現在シャットダウンされています。また、パスワード（enable password、enable secret、vty、コンソール パスワード）は暗号化形式か非暗号化形式のいずれかになっています。非暗号化形式のパスワードは再使用できます。暗号化されているパスワードは新しいパスワードに変更する必要があります。

11. configure terminal と入力します。

hostname(config)# プロンプトが表示されます。

12. enable secret <password> と入力して、enable secret パスワードを変更します。以下に、いくつかの例を示します。

hostname(config)#enable secret cisco

13. 使用するすべてのインターフェイスに対して no shutdown コマンドを発行します。

show ip interface brief コマンドを発行して、必要なすべてのインターフェイスが up up と表示されることを確認します。

14. config-register <configuration_register_setting> と入力します。ここでconfiguration_register_settingは、ステップ2で記録した値または0x2102のいずれかを示します。以下に、いくつかの例を示します。

hostname(config)#config-register 0x2102

15. Ctrl+Z か End キーを押して、コンフィギュレーション モードを終了します。

hostname# プロンプトが表示されます。

16. write memory または copy running-config startup-config と入力して、変更を確定します。

パスワード回復手順の例

このセクションでは、パスワード回復手順の例を示します。この例では Cisco 2600 シリーズ ルータを使用しています。Cisco 2600 シリーズ ルータを使用していない場合でも、表示される出力の内容はほぼ同じです。

Router>enable

Password:

Password:

Password:

% Bad secrets

Router>show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

ROM: System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Router uptime is 3 minutes

System returned to ROM by abort at PC 0x802D0B60

System image file is "flash:c2600-is-mz.120-7.T"

cisco 2611 (MPC860) processor (revision 0x202) with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

Configuration register is 0x2102

Router>

!--- The router was just powercycled, and during bootup a !--- break sequence was sent to the router.

!

*** System received an abort due to Break Key ***

signal= 0x3, code= 0x500, context= 0x813ac158

PC = 0x802d0b60, Vector = 0x500, SP = 0x80006030

rommon 1 > confreg 0x2142

You must reset or power cycle for new config to take effect

rommon 2 > reset

System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Copyright (c) 1999 by cisco Systems, Inc.

TAC:Home:SW:IOS:Specials for info

C2600 platform with 32768 Kbytes of main memory

program load complete, entry point: 0x80008000, size: 0x6fdb4c

Self decompressing the image : ###############################

##############################################################

##############################################################

##############################################################

############################### [OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

cisco 2611 (MPC860) processor (revision 0x202) with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: n

Press RETURN to get started!

00:00:19: %LINK-3-UPDOWN: Interface BRI0/0, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Ethernet0/0, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Ethernet0/1, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Serial0/0, changed state to down

00:00:19: %LINK-3-UPDOWN: Interface Serial0/1, changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0,

changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to up

Router>

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/1,

changed state to up

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0/0,

changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0/1,

changed state to down

00:00:50: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

00:00:50: %LINK-5-CHANGED: Interface BRI0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Ethernet0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Serial0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Ethernet0/1,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Serial0/1,

changed state to administratively down

00:00:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to down

00:00:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/1,

changed state to down

Router>

Router>enable

Router#copy startup-config running-config

Destination filename [running-config]?

1324 bytes copied in 2.35 secs (662 bytes/sec)

Router#

00:01:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:1,

changed state to down

00:01:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:2,

changed state to down

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#enable secret < password >

Router(config)#^Z

00:01:54: %SYS-5-CONFIG_I: Configured from console by console

Router#show ip interface brief

Interface   IP-Address        OK?  Method     Status                   Protocol

Ethernet0/0 10.200.40.37      YES  TFTP       administratively down    down

Serial0/0   unassigned        YES  TFTP       administratively down    down

BRI0/0      193.251.121.157   YES  unset      administratively down    down

BRI0/0:1    unassigned        YES  unset      administratively down    down

BRI0/0:2    unassigned        YES  unset      administratively down    down

Ethernet0/1 unassigned        YES  TFTP       administratively down    down

Serial0/1   unassigned        YES  TFTP       administratively down    down

Loopback0   193.251.121.157   YES  TFTP       up                       up

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#interface Ethernet0/0

Router(config-if)#no shutdown

Router(config-if)#

00:02:14: %LINK-3-UPDOWN: Interface Ethernet0/0, changed state to up

00:02:15: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to up

Router(config-if)#interface BRI0/0

Router(config-if)#no shutdown

Router(config-if)#

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0:1, changed state to down

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0:2, changed state to down

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0, changed state to up

00:02:115964116991: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0/0,

TEI 68 changed to up

Router(config-if)#^Z

Router#

00:02:35: %SYS-5-CONFIG_I: Configured from console by console

Router#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

Router#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

ROM: System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Router uptime is 3 minutes

System returned to ROM by abort at PC 0x802D0B60

System image file is "flash:c2600-is-mz.120-7.T"

cisco 2611 (MPC860) processor (revision 0x202)

with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

Configuration register is 0x2142

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#config-register 0x2102

Router(config)#^Z

00:03:20: %SYS-5-CONFIG_I: Configured from console by console

Router#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.0(7)T, RELEASE SOFTWARE (fc2)

Copyright (c) 1986-1999 by cisco Systems, Inc.

Compiled Tue 07-Dec-99 02:21 by phanguye

Image text-base: 0x80008088, data-base: 0x80C524F8

ROM: System Bootstrap, Version 11.3(2)XA4, RELEASE SOFTWARE (fc1)

Router uptime is 3 minutes

System returned to ROM by abort at PC 0x802D0B60

System image file is "flash:c2600-is-mz.120-7.T"

cisco 2611 (MPC860) processor (revision 0x202)

with 26624K/6144K bytes of memory.

Processor board ID JAB031202NK (3878188963)

M860 processor: part number 0, mask 49

Bridging software.

X.25 software, Version 3.0.0.

Basic Rate ISDN software, Version 1.1.

2 Ethernet/IEEE 802.3 interface(s)

2 Serial(sync/async) network interface(s)

1 ISDN Basic Rate interface(s)

32K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash partition 1 (Read/Write)

8192K bytes of processor board System flash partition 2 (Read/Write)

Configuration register is 0x2142 (will be 0x2102 at next reload)

Router#

関連情報

- Password Recovery Procedures

- コンソールおよび補助ポートに関するケーブル接続ガイド

- Catalyst スイッチのコンソール ポートに端末を接続する方法

- Catalyst スイッチのコンソール ポートに端末を接続する方法

- パスワード復旧中の標準的なブレーク キー シーケンスの組み合わせ

- テクニカルサポート - Cisco Systems