目錄

簡介

系統中配置的鄰居狀態

運行狀況檢查CLI

排除CLI故障

SNMP陷阱

簡介

本檔案介紹邊界閘道通訊協定(BGP)健康狀況檢查以及如何對CLI進行疑難排解。

ASR 5000/ASR 5500/虛擬資料包核心支援作為AS間路由協定的BGP。BGP也可用作機箱間會話恢復(ICSR)的監控機制。

系統中配置的鄰居狀態

以下CLI範例顯示如何檢查系統中設定的BGP鄰居狀態。系統中存在的每個情景都有一個獨立的路由表；因此，為了檢查BGP路由資訊，操作員必須處於要檢查的所需上下文中。

以下是情境感知CLI。

- BGP鄰居資訊show ip bgp summary

此處的示例顯示了上下文gn下的IPv4和IPv6鄰居條目。在上述示例中，四個鄰居運行在ECMP模式下，為系統提供了更高的吞吐量和可靠性。  您可以在Up/Down和State列下檢查對等體的穩定性。

[gn]asr5500# show ip bgp summary

BGP Address-Family : IPv4

BGP router identifier 10.10.1.100, local AS number 2

BGP table version is 2

2 BGP AS-PATH entries

Neighbor      V AS MsgRcvd MsgSent TblVer Up/Down State/PfxRcd

192.168.2.1  4 65021 1362115 1666073 2    12w5d12h   1

192.168.3.1  4 65021 1362137 1666216 2    12w5d12h   1

192.168.4.1  4 65021 1362115 1665912 2    12w5d12h   1

192.168.5.1  4 65021 1362137 1666148 2    12w5d12h   1

BGP Address-Family : IPv6

BGP router identifier 10.10.1.100, local AS number 2

BGP table version is 2

2 BGP AS-PATH entries

Neighbor                      V AS    MsgRcvd MsgSent TblVer Up/Down State/PfxRcd

2000:4000:1:aa01:a0:100:0:a1  4 65021 1362115 1666009 2      12w5d12h  1

2000:4000:1:aa01:a0:100:0:b1  4 65021 1362137 1666175 2      12w5d12h  1

2000:4000:1:aa01:a0:100:0:a2  4 65021 1362115 1666051 2      12w5d12h  1

2000:4000:1:aa01:a0:100:0:b2  4 65021 1362137 1666199 2      12w5d12h  1

- 顯示詳細的BGP鄰居資訊 show ip bgp neighbors

[gn]asr5500# show ip bgp neighbors

BGP neighbor is 192.168.2.1, remote AS 1, local AS 2, external link

BGP version 4, remote router ID 10.1.1.1

BGP state = Established,up for 00:08:50

Hold time is 90 seconds, keepalive interval is 30 seconds

Configured Hold time is 90 seconds, keepalive interval is 30 seconds

Connect Interval is 20 seconds

Neighbor capabilities:

Route refresh: advertised and received (old and new)

Address family IPv4 Unicast: advertised and received

Received 23 messages, 0 notifications, 0 in queue

Sent 25 messages, 0 notifications, 0 in queue

Route refresh request: received 0, sent 0

Minimum time between advertisement runs is 30 seconds

For address family: IPv4 Unicast

AF-dependant capabilities:

Graceful restart: advertised

0 accepted prefixes, maximum limit 40960

Threshold for warning message 75(%)

3 announced prefixes

For address family: VPNv4 Unicast

0 accepted prefixes

0 announced prefixes

For address family: IPv6 Unicast

0 accepted prefixes

0 announced prefixes

For address family: VPNv6 Unicast

0 accepted prefixes

0 announced prefixes

Connections established 1; dropped 0

Local host: 192.168.2.2, Local port: 38190

Foreign host: 192.168.2.1, Foreign port: 179

Next hop: 192.168.2.2

Next hop global: fe80::5:47ff:fe30:4fd8

運行狀況檢查CLI

以下是情境感知CLI。需要這些命令才能從正確的上下文中運行。

- show ip interface summary

- show ipv6 interface summary

- show ip bgp

- show ip bgp summary

- show ip bgp neighbors

- show ip bgp neighbors <IP Address> accepted-routes

- show ip bgp neighbors <IP Address> advertised-routes

- show ip bgp neighbors <IP Address> received-routes

- ping <BGP Neighbor IPV4> src <IPv4 Loopback>

- ping6 <BGP Neighbor IPv6> src <IPv6環回>

排除CLI故障

- show snmp trap history verbose | grep -i bgp

- 顯示日誌 | grep -i bgp

- show srp monitor all（如果使用ICSR）

只有根據思科支援部門的建議才能執行這些命令，因為日誌記錄過高可能會給系統帶來壓力並影響使用者。

- logging filter active facility bgp level debug

- logging filter active facility iparp level debug

- 日誌記錄活動

- 無活動日誌記錄

- Wireshark跟蹤

SNMP陷阱

顯示與BGP相關的SNMP陷阱

show snmp trap history verbose | grep -i bgp

此處的示例顯示上下文gn中的IPv6鄰居已關閉並恢復。

Mon Jan 11 07:14:18 2021 Internal trap notification 1289 (BGPPeerSessionIPv6Down) vpn gn ipaddr 2000:4000:1:aa01:a0:100:0:a1

Mon Jan 11 09:03:06 2021 Internal trap notification 1288 (BGPPeerSessionIPv6Up) vpn gn ipaddr 2000:4000:1:aa01:a0:100:0:a1

- BGPPeerSessionDown

說明:到指定IP地址的BGP對等會話不再運行。

可能原因：BGP對等點無法運作；節點和BGP對等體之間的網路發生中斷。要採取的行動：驗證BGP對等點是否可操作；驗證與BGP對等體的網路連線。

- BGPPeerSessionUp

說明:到指定IP地址的BGP對等會話運行正常。這可能表示新對等體的初始配置、系統重新啟動後的初始連線或BGPPeerSessionDown事件後的連線恢復。

要採取的行動：無需任何操作。

- BGPPeerSessionIPv6Down

說明:到指定IPv6地址的BGP對等會話不再運行。

可能原因：BGP對等點無法運作；節點和BGP對等體之間的網路發生中斷。

要採取的行動：驗證BGP對等點是否可操作；驗證與BGP對等體的網路連線。

- BGPPeerSessionIPv6Up

說明:到指定IPv6地址的BGP對等會話運行正常。這可能表示新對等體的初始配置、系統重新啟動後的初始連線或starBGNPeerSessionDown事件後的連線恢復。

要採取的行動：無需任何操作。