目錄

簡介

問題

解決方案

簡介

本檔案介紹用於解決 Unable to connect to the server: x509: certificate has expired or is not yet valid 錯誤。

問題

連線到Ultra Cloud核心使用者微服務基礎架構(SMI)的Kubectl會引發錯誤。

Unable to connect to the server: x509: certificate has expired or is not yet valid

Kubernetes控制平面節點通過SSL隧道進行通訊。SSL隧道通常依靠一組受信任的第三方證書頒發機構來建立證書的真實性。

證書過期時，控制平面節點通訊停止。

要檢查證書過期，請執行以下操作： kubectl get secrets --all-namespaces | grep 'kubernetes.io/tls' | awk '{print $2, $1}' | xargs -n2 sh -c 'echo container $0 namespace $1;kubectl -n $1 get secret $0 -o jsonpath="{.data.tls\.crt}" | base64 -d | openssl x509 -noout -enddate; echo ----------------------'

cloud-user@k8-rcdn-primary-1:~$ kubectl get secrets --all-namespaces | grep 'kubernetes.io/tls' | awk '{print $2, $1}' | xar

gs -n2 sh -c 'echo container $0 namespace $1;kubectl -n $1 get secret $0 -o jsonpath="{.data.tls\.crt}" | base64 -d | open

ssl x509 -noout -enddate; echo ----------------------'

container cert-cli-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:39 2023 GMT

----------------------

container cert-docs-cee-k8-rcdn-product-documentation-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:04 2023 GMT

----------------------

container cert-grafana-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:06 2023 GMT

----------------------

container cert-restconf-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:40 2023 GMT

----------------------

container cert-show-tac-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:40 2023 GMT

----------------------

container cert-show-tac-cee-k8-rcdn-smi-show-tac-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:07 2023 GMT

----------------------

container cert-cli-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:56 2023 GMT

----------------------

container cert-restconf-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:57 2023 GMT

----------------------

container cert-show-tac-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:57 2023 GMT

----------------------

container cert-cli-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:07 2023 GMT

----------------------

container cert-restconf-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:08 2023 GMT

----------------------

container cert-show-tac-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:08 2023 GMT

----------------------

container cert-cli-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:26 2023 GMT

----------------------

container cert-restconf-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:28 2023 GMT

----------------------

container cert-show-tac-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:27 2023 GMT

----------------------

container cert-cli-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:41 2023 GMT

----------------------

container cert-restconf-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:43 2023 GMT

----------------------

container cert-show-tac-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:42 2023 GMT

----------------------

解決方案

1.驗證apiserver.crt是否顯示正確的結束日期。

ubuntu@labnode-cnat-cnat-core-primary1:~$ cd /data/kubernetes/pki

ubuntu@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki$ sudo su

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# sudo cat /data/kubernetes/pki/apiserver.crt | openssl x509 -enddate -noout

notAfter=Feb 17 08:22:04 2022 GMT

2.檢查SSL中的結束日期。

ubuntu@labnode-cnat-cnat-core-primary1:~$ echo | openssl s_client -showcerts -servername gnupg.org -connect localhost:6443 2>/dev/null | openssl x509 -inform pem -noout -text

Certificate:

Data:

Version: 3 (0x2)

Serial Number: 44335566778899aabba (0xabcdef0123456789)

Signature Algorithm: sha256WithRSAEncryption

Issuer: CN = kubernetes

Validity

Not Before: Mar 17 11:59:23 2020 GMT

Not After : Mar 19 10:37:35 2021 GMT

3.檢查docker容器狀態。

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-apiserver"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

f988867819ed c2c9a0406787 "kube-apiserver --ad…" 12 months ago Up 12 months k8s_kube-apiserver_kube-apiserver-labnode-cnat-cnat-core-primary1_kube-system_00112233445566778899aabbccddeeff_0

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki#

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-controller"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

929a8f1ef716 6e4bffa46d70 "kube-controller-man…" 3 days ago Up 3 days k8s_kube-controller-manager_kube-controller-manager-labnode-cnat-cnat-core-primary1_kube-system_112233445566778899aabbccddeeff00_2

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-scheduler"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

32783a2c3a71 ebac1ae204a2 "kube-scheduler --au…" 12 months ago Up 12 months k8s_kube-scheduler_kube-scheduler-labnode-cnat-cnat-core-primary1_kube-system_2233445566778899aabbccddeeff0011_1

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki#

4.在所有三個控制平面節點上重新啟動kube-apiserver和kube-scheduler的docker容器。

docker ps -f "name=k8s_kube-apiserver" -q | xargs docker restart

docker ps -f "name=k8s_kube-scheduler" -q | xargs docker restart

5.確認apiserver.crt顯示正確的結束日期。

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# sudo cat /data/kubernetes/pki/apiserver.crt | openssl x509 -enddate -noout

notAfter=Feb 17 08:22:04 2022 GMT

6.驗證在SSL中更新了結束日期並且其結束日期正確。

echo | openssl s_client -showcerts -servername gnupg.org -connect localhost:6443 2>/dev/null | openssl x509 -inform pem -noout -text

7.驗證群集是否正常

有關操作的詳細資訊，請參閱思科Ultra雲核心 — 使用者微服務基礎設施指南。