目錄

簡介

必要條件

需求

採用元件

背景資訊

配置IDFT

問題

分析

解決方案

簡介

本檔案介紹控制與使用者計劃分離(CUPS)和舊版/裸機設定中的間接轉送通道(IDFT)功能的行為。

必要條件

需求

思科建議您瞭解以下主題：

- StarOS

- 與IDFT相關的服務網關(SGW)功能

採用元件

本文檔中的資訊基於SGW - 21.25.9（舊版和CUPS中）軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

SGW支援IDFT建立和刪除程式，這些程式適用於具有多資料包資料網路(PDN)和多承載的Pure-S和摺疊呼叫。此功能適用於具有或不具有SGW重新定位和衝突情形的IDFT支援。

IDFT功能支援以下功能：

- 為Collapsed、Pure-S、Collapsed和Pure-S多PDN呼叫與多個承載的組合建立IDFT請求。

- 下行鏈路和上行鏈路IDFT承載上的資料傳輸。

- 從移動管理引擎(MME)刪除IDFT請求。此外，如果MME沒有傳送刪除的IDFT請求，則在預設值100秒到期後，基於計時器刪除IDFT承載。

- 當正常PDN關閉時，刪除IDFT PDN，包括從MME/P-GW清除/刪除使用者。

- 在IDFT主用/IDFT時，如果為Pure-S和摺疊呼叫，則使用Sx-Path故障處理，建立Sx-Pending狀態。

- IDFT PDN建立或刪除時的消息互動和衝突與任何其他過程。

- 當IDFT PDN處於活動狀態時，現在支援在非IDFT PDN上進行S11/S5和Sx-Path故障處理。

配置IDFT

本節介紹支援IDFT功能的CLI命令。

在控制平面上，使用這些CLI命令啟用或禁用IDFT功能。

configure

context context_name

sgw-service service_name

[ default | no ] egtp idft-support

end

問題

即使功能關閉，SGW也會處理建立IDFT請求。在傳統/裸機節點中可看到此行為。

以下是節點中存在的IDFT配置：

sgw-service SGW-SVC

accounting context EPC gtpp group default

accounting mode gtpp

associate ingress egtp-service S11-SGW

associate egress-proto gtp egress-context EPC egtp-service S5-S8-SGW

no egtp idft-support                                                                                           ---> IDFT feature is off in the node.

分析

跟蹤和調試日誌通過在實驗室中模擬此場景獲取，並且會看到建立IDFT請求和建立IDFT響應的行為。

1)MME將建立IDFT請求傳送到SGW。

2)SGW處理請求並將響應「建立IDFT響應」傳送回MME，原因為「請求已接受」。

在此建立IDFT響應中，預期SGW必須傳送建立IDFT響應，原因為「不支援資料轉發」，因為配置中已禁用此功能。

在CUPS設定中使用相同的配置：

1)MME將建立IDFT請求傳送到SGW。

2)SGW處理該請求並將響應「建立IDFT響應」傳送回MME，原因為「不支援資料轉發」。

在管理指南中，要啟用此功能，您需要執行以下步驟：

在控制平面上，使用這些CLI命令啟用或禁用IDFT功能。

configure

context context_name

sgw-service service_name

[ default | no ] egtp idft-support

end

如果您按照舊版中的這些步驟啟用/禁用該服務，則看不到任何切換該服務的選項。

[sgw]TITAN-ULTRA-001(config-sgw-service)# egtp

cause-code           - Configuration to related to handling failure response from peer

change-notification-req - Configuration related to handling change notification request

modify-bearer-req    - Configuration related to handling Modify Bearer Request

[sgw]TITAN-ULTRA-001(config-sgw-service)# no egtp

cause-code           - Configuration to related to handling failure response from peer

change-notification-req - Configuration related to handling change notification request

modify-bearer-req    - Configuration related to handling Modify Bearer Request

當您嘗試在CUPS設定中啟用/禁用它時，它會顯示切換它的選項。

[SAEGW]saegw-cp1(config-sgw-service)# egtp

cause-code           - Configuration to related to handling failure response from peer

change-notification-req - Configuration related to handling change notification request

idft-support         - Enable/Disable the IDFT Feature for CUPS. By default, it is disabled

modify-bearer-req    - Configuration related to handling Modify Bearer Request

[SAEGW]saegw-cp1(config-sgw-service)# egtp

cause-code           - Configuration to related to handling failure response from peer

change-notification-req - Configuration related to handling change notification request

idft-support         - Enable/Disable the IDFT Feature for CUPS. By default, it is disabled

modify-bearer-req    - Configuration related to handling Modify Bearer Request

解決方案

此行為的原因如下所述：

舊行為：

— 舊版中沒有CLI來控制IDFT行為。

— 舊版代碼始終支援IDFT。

CUPS行為：

- CLI由許可證控制，也就是說，它只能通過CUPS許可證使用。

— 可以在CUPS中啟用/禁用它。