目錄

簡介

必要條件

需求

採用元件

背景資訊

什麼是CSFB?

設定

預啟用運行狀況檢查

預啟用程式

CSFB啟用流程

啟用後程式

回滾流程

統計/狀態

驗證

疑難排解

簡介

本檔案介紹如何實作為電路交換器後退(CSFB)啟用指定的變更，以便允許透過使用者群組(SG)介面使用行動交換中心(MSC)/訪客位置登錄檔(VLR)進行語音和簡訊服務(SMS)。SG介面介於進化式封包系統(EPS)中的行動化管理實體(MME)與VLR之間，以便允許位置管理協調，以及透過EPS系統轉送某些與電路交換服務相關的訊息。

這在部署於思科聚合服務路由器(ASR)5x00系列(ASR5x00)上的MME上實施。

必要條件

需求

確保您擁有所識別的ASR5x00節點所需的Show Support Details(SSD)、批次統計資料檔案、系統日誌檔案和任何其他CLI輸出。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

背景資訊

什麼是CSFB?

CSFB允許支援3G/4G的使用者裝置(UE)回退到3G網路以實現電路交換功能，支援SMS和語音呼叫。

參考資料

- 第三代合作夥伴計畫(3GPP)技術規範(TS)23.272:EPS中的電路交換機(CS)後退

- 3GPP TS 29.118:SG介面規範

此圖基於使用蒸汽控制傳輸協定(SCTP)進行傳輸的SG:

移動始發呼叫（PS切換）

移動始發呼叫（PS掛起）

行動終端呼叫（閒置模式）

行動終端呼叫（PS切換）

3G到4G反向

- UE決定

- 如果發生封包交換器(PS)交接(HO)，則回覆是正常的3G到4G HO

- 如果發生PS掛起，網路將為返回的UE恢復掛起的承載

移動呼叫（PS恢復）

設定

附註：使用命令查詢工具(僅供已註冊客戶使用)可獲取本節中使用的命令的更多資訊。

預啟用運行狀況檢查

收集以下命令的輸出：

show configuration

show crash list

show alarm all

show snmp trap history

show configuration errors

show logs

show card table

show card hardware

show subscribers summary

show leds all

show port utilization table

show linecard table

show card mapping

show session progress

show threshold

show ntp associations

show cpu table

show ntp status

show system uptime

show clock

show license information

show task resource

show ip interface summary

Repeat below steps over all context

Context <context_name>

show ip interface summary

show ip route

show egtp-service all

show egtpc statistics

show session disconnect-reasons

show mme-service all

show mme-service enode-association all

show hss-peer-service service all

show diameter peers full

show sgs-service all

show sgs-service vlr-status full

Logs checkpoint

clear snmp trap history

預啟用程式

1. 將當前配置儲存到快閃記憶體驅動器以便備份。

2. 根據運算子命名法使用命名約定：
[local] #save configuration /flash/Config_Date_before_activity.cfg -r -no

3. 輸入show support details命令以檢視機箱的詳細資訊：
[local] #show support details

4. 輸入show boot指令以確認現有的開機順序：
[local] #show boot

boot system priority 7 \

image /flash/production.37140.st40.bin \

config /flash/QGLC-final-25-08-11.cfg

boot system priority 8 \

image /flash/production.37140.st40.bin \

config /flash/config_g101.cfg

boot system priority 9 \

image /flash/production.34838.st40.bin \

config /flash/config_g101.cfg

boot system priority 10 \

image /flash/st40.bin \

config /flash/system.cfg

5. 輸入show license information命令以確認機箱上安裝的CSFB許可證：
[local] #show license information

Key Information (installed key):

Comment        MME/SGSN 1 SO:50931561,51138669

Device 1      Model:         "VICF4GB"

Serial Number: "VICF4GB00000B7B"

Device 2      Model:         "VICF4GB"

Serial Number: "VICF4GB00000C0D"

Issued        Monday November 28 12:05:59 EST 2014

Issued By     Cisco Systems

Key Number    48086

Enabled Features:

Feature                       Applicable Part Numbers

----------------------------  -----------------------------

IPv4 Routing Protocols        [ none ]

IPv6                          [ N/A / N/A ]

Lawful Intercept              [ ASR5K-00-CSXXLI ]

RADIUS AAA Server Groups      [ ASR5K-00-CSXXAAA ]

SGSN Software License         [ ASR5K-00-SN10SESS / ASR5K-00-SN01SESS ]

MME license:                  [ ASR5K-00-ME01BASE / ASR5K-00-ME10LIC ]

+ Session Recovery           [ ASR5K-00-PN01REC / ASR5K-00-HA01REC

ASR5K-00-00000000 / ASR5K-00-GN01REC

ASR5K-00-SN01REC / ASR5K-00-AN01REC

ASR5K-00-IS10PXY / ASR5K-00-IS01PXY

ASR5K-00-HWXXSREC / ASR5K-00-PW01REC

ASR5K-05-PHXXSREC / ASR5K-00-SY01R-K9

ASR5K-00-IG01REC / ASR5K-00-PC10SR

ASR5K-00-EG01SR / ASR5K-00-FY01SR

ASR5K-00-CS01LASR / ASR5K-00-FY01USR ]

+ Enhanced Lawful Intercept  [ ASR5K-00-CS01ELI / ASR5K-00-CS10ELI ]

APN Aliasing                  [ ASR5K-00-SNXXALES ]

Circuit Switched Fallback     [ ASR5K-00-CS01CSFB ]

Always On Licensing           [ ASR5K-00-GNXXAOL ]

Session Limits:

Sessions  Session Type

--------  -----------------------

610000  MME license

CARD License Counts:

[none]

Status:

Device 1               Matches card 8 flash

Device 2               Matches card 9 flash

License Status         Good (Redundant)

CSFB啟用流程

1. 使用給定IP地址配置SG介面。

2. 使用流控制傳輸協定(SCTP)埠號、跟蹤區域代碼(TAC)到位置區域代碼(LAC)對映、池區域等配置SG服務。

3. 將介面IP地址繫結到SG服務並關聯SCTP模板（如果有）：
[local]#config

[local](config)#context mme

[mme](config-ctx)#interface sgs

[mme](config-if-eth)#ip address xxx.xxx.xxx.xxx 255.255.255.xxx

[mme](config-if-eth)#exit

[mme](config-ctx)#sgs-service sgs_svc

[mme](config-sgs-service)#sctp port xxxx

[mme](config-sgs-service)#tac-to-lac-mapping any-tac map-to lac xxx

[mme](config-sgs-service)#vlr VLR1 ipv4 xxx.xxx.xxx.xxx

ipv4-address xxx.xxx.xxx.xxx port xxx

[mme](config-sgs-service)#pool-area east_nodes

[mme](config-sgs-pool-area)#lac xxx

[mme](config-sgs-pool-area)#hash-value non-configured-values use-vlr VLR1

[mme](config-sgs-pool-area)#exit

[mme](config-sgs-service)#bind ipv4 xxx.xxx.xxx.xxx

[mme](config-sgs-service)#associate sctp-param-template sgs_svc

[mme](config-sgs-service)#exit

4. 將SG服務名稱與MME服務相關聯：
[mme](config-ctx)#mme-service mme_svc

[mme](config-mme-service)#associate sgs-service sgs_svc context mme

[mme](config-mme -service)#end

5. 為SG介面配置虛擬LAN(VLAN)並繫結到各自的上下文名稱：
[local]#config

[local](config)#port ethernet 17/1

[local](config-port-17/1)#vlan 181

[local](config-port-17/1-vlan-181)#no shutdown

[local](config-port-17/1-vlan-181)#bind interface sgs mme

[local](config-port-17/1-vlan-181)#end

啟用後程式

1. 將當前配置儲存到快閃記憶體驅動器以便備份。

2. 根據運算子命名法使用命名約定：
[local] #save configuration /flash/Config_Date_After_activity.cfg -r -no

3. 輸入show support details命令以顯示機箱的詳細資訊：
[local] #show support details

4. 輸入以下命令可擷取活動統計：
local]#show sgs-service all

[local]#show sgs-service vlr-status full

[local]#show sgs-service statistics all

[local]#show crash list

[local]#show alarm all

[local]#show snmp trap history

[local]#show configuration errors

5. 輸入以下命令可擷取硬體統計資訊：
[local]#show task resource

[local]#show alarm outstanding

[local]#show cpu table

[local]#show port utilization table

[local]#show npu utilization table

[local]#show snmp trap

[local]#show card table all

6. 輸入以下命令可擷取服務狀態：
[local]#show mme-service all

[local]#show mme-service db record all

[local]#show mme-service enode-association all

[local]#show mme-service id summary

[local]#show mme-service session full

[local]#show session disconnect-reasons

[local]#show session progress

[local]#show mme-service statistics

[local]#show hss-peer-service service all

[local]#show subscriber mme-only summary

[local]#show subscriber mme-only data-rate

[local]#show hss-peer-service statistics all

[local]#show egtp-service all

[local]#show egtpc statistics

[local]#show diameter peers full

[local]#show sgs-service all

[local]#show sgs-service vlr-status full

附註：參照長期演化(LTE)網路擷取此輸出。如果機箱包括其他服務，則包括相關統計資訊。

回滾流程

如果新配置或變更無法正常工作或出現其他問題，請恢復到以前的配置：

1. 輸入以下命令可從已配置的上下文中刪除SG介面和SG服務：
[local]#config

[local](config)#context mme

[mme](config-ctx)#no interface sgs

[mme](config-if-eth)#exit

[mme](config-ctx)#no sgs-service sgs_svc

2. 輸入以下命令以從MME服務中刪除SG服務關聯：
[mme](config-ctx)#mme-service mme_svc

[mme](config-mme-service)#no associate sgs-service

[mme](config-mme -service)#end

3. 輸入以下命令以刪除為SG介面配置的VLAN:
[local]#config

[local](config)#port ethernet 17/1

[local](config-port-17/1)#no vlan 181

[local](config-port-17/1)#end

統計/狀態

show sgs-service service-name <name>

show sgs-service statistics

show sgs-service vlr-status { full }

show mme-service session full

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。