目錄

簡介

命令SNMP Notif-Threshold如何工作？

組態範例

相關資訊

簡介

本文檔介紹簡單網路管理協定(SNMP)通知閾值snmp notif-threshold的計數和low_count的命令列介面(CLI)說明，在CLI參考中，StarOS不清晰。本文旨在明確此命令及其用法。

命令SNMP Notif-Threshold如何工作？

指令語法如下：

snmp notif-threshold  <max-threshold> low <low-threshold> period <polling-period>

根據此配置，陷阱建立速率將按照period引數配置定期進行監控。如果在一個週期週期內建立的陷阱數量超過配置的max-threshold值，則會禁用陷阱建立。僅當建立陷阱的數量下降到配置的<low-threshold>值以下時，才會再次啟用陷阱建立，但陷阱建立仍然處於禁用狀態。

組態範例

snmp notif-threshold  100 low 20 period 300

在示例中，每300秒設定的最大陷阱數為100。StarOS軟體版本18.0及更低版本具有100最大閾值，而軟體版本19.0及更高版本具有300最大閾值。如果機箱在300秒時間內收到超過100個陷阱，則禁用SNMP陷阱。稍後，如果機箱在300秒時間內收到20個陷阱（或更少），機箱將再次啟用SNMP陷阱。如果陷阱生成在300秒時間內保持大於20個陷阱的值，則SNMP陷阱保持禁用狀態。

請參閱命令列介面參考以與軟體級別對應，以便找出預設值。

這些命令可用於檢查SNMP陷阱生成。

配置值

[local]ASR5500-2# show config | grep -i notif

snmp notif-threshold 1000 low 800 period 10

陷阱統計資訊

[local]ASR5500-2# show snmp trap statistics

SNMP Notification Statistics:

Total number of notifications   : 2

Last notification sent         : Tuesday October 07 12:00:27 CDT 2014

Notification sending is         : enabled

Notifications have never been disabled

Notifications have never been cleared

Notifications in current period : 0

Notifications in previous period: 1

Notification monitor period     : 10 seconds

SNMP伺服器資訊

[local]ASR5500-2# show snmp server

SNMP Server Configuration:

Server State             : enabled

SNMP Port                : 161

sysLocation              :

sysContact               :

authenticationFail traps : Disabled

EngineID                 :

Alert Threshold          : 1000 alerts in 10 seconds

Alert Low Threshold      : 800 alerts in 10 seconds

相關資訊

- 技術支援與文件 - Cisco Systems

- Cisco ASR 5000系列配置指南