目錄

簡介

必要條件

需求

採用元件

設定

GUI配置

建立SSID

WDS AP上的本地RADIUS伺服器配置

WDS客戶端AP上的本地RADIUS伺服器配置

在WDS AP上啟用WDS

在WDS客戶端AP上啟用WDS

CLI配置

WDS AP

WDS客戶端AP

驗證

WDS AP上的CLI驗證輸出

WDS客戶端AP上的CLI驗證輸出

疑難排解

簡介

本檔案介紹如何在使用本地RADIUS伺服器的自主存取點(AP)設定上設定無線網域服務(WDS)。本文檔重點介紹通過新GUI進行的配置，但也提供了命令列介面(CLI)配置。

必要條件

需求

思科建議您瞭解自治AP上的基本GUI和CLI配置。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 自治AP IOS®軟體版本15.2(4)JA1上的Cisco 3602e系列存取點；此裝置將充當WDS AP和本地RADIUS伺服器。

- 自治AP IOS軟體版本15.2(4)JA1上的Cisco 2602i系列接入點；此裝置將充當WDS客戶端AP。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

附註：使用命令查詢工具(僅供已註冊客戶使用)可獲取本節中使用的命令的更多資訊。

GUI配置

建立SSID

以下過程介紹了如何建立新的服務集識別符號(SSID)。

1. 導航到Security > SSID Manager，然後按一下NEW以建立新的SSID。

2. 為可擴展身份驗證協定(EAP)身份驗證配置SSID。

3. 設定所需的加密級別。在本示例中，使用Wi-Fi保護訪問2(WPA2)。

4. 按一下「Apply」以儲存設定。

5. 導覽至Security > Encryption Manager，然後選擇所需的加密密碼方法。

WDS AP上的本地RADIUS伺服器配置

以下過程介紹如何在WDS AP上配置本地RADIUS伺服器：

1. 導覽至Security > Server Manager，將WDS AP Bridge Virtual Interface(BVI)IP新增為本地RADIUS，然後新增共用密碼。

2. 導覽至Security > Local Radius Server > General Set-Up索引標籤。定義要使用的EAP協定。在本示例中，啟用輕型可擴展身份驗證協定(LEAP)身份驗證。

3. 還可以在同一頁上新增網路訪問伺服器(NAS)IP和客戶端使用者名稱/密碼憑據。WDS AP上的本地RADIUS配置已完成。

WDS客戶端AP上的本地RADIUS伺服器配置

下圖顯示如何將WDS AP的IP地址配置為RADIUS伺服器：

兩個AP現在都配置了SSID以進行LEAP身份驗證，並且WDS伺服器充當本地RADIUS。對外部RADIUS使用相同步驟；只有RADIUS伺服器IP會更改。

在WDS AP上啟用WDS

以下過程介紹了如何在WDS AP上啟用WDS:

1. 導覽至Wireless > WDS > General Set-Up頁籤，然後啟用Use this AP as Wireless Domain Services覈取方塊。這將啟用AP上的WDS服務。

2. 在具有多個WDS AP的網路中，使用Wireless Domain Services Priority選項定義主WDS和備份WDS。值範圍為1-255，其中255是最高優先順序。

3. 導航到同一頁上的Server Groups頁籤。建立一個基礎結構伺服器組清單，所有WDS客戶端AP都將對其進行身份驗證。您可以使用WDS AP上的本地RADIUS伺服器來實現此目的。由於已經新增了該檔案，因此它會顯示在下拉選單中。

4. 啟用單選按鈕Use Group For:Infrastructure Authentication，然後按一下Apply以儲存設定。

5. WDS AP使用者名稱和密碼可以新增到本地RADIUS伺服器清單中。

在WDS客戶端AP上啟用WDS

以下過程介紹了如何在WDS客戶端AP上啟用WDS:

1. 導覽至Wireless > AP，然後啟用Participate in SWAN Infrastructure覈取方塊。SWAN代表結構化無線感知網路。

2. WDS客戶端AP可以自動發現WDS AP。或者，您可以在Specified Discovery（指定發現）文本框中手動輸入用於客戶端註冊的WDS AP的IP地址。

您還可以新增WDS客戶端使用者名稱和密碼，以便對WDS AP上配置的本地RADIUS伺服器進行身份驗證。

CLI配置

WDS AP

以下是WDS AP的配置示例：

Current configuration : 2832 bytes

!

! Last configuration change at 05:54:08 UTC Fri Apr 26 2013

version 15.2

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

!

hostname MAIB-WDS-AP

!

!

logging rate-limit console 9

enable secret 5 $1$EdDD$dG47yIKn86GCqmKjFf1Sy0

!

aaa new-model

!

!

aaa group server radius rad_eap

server name Local-Radius

!

aaa group server radius Infrastructure

server name Local-Radius

!

aaa authentication login eap_methods group rad_eap

aaa authentication login method_Infrastructure group Infrastructure

aaa authorization exec default local

!

!

!

!

!

aaa session-id common

no ip routing

no ip cef

!

!

!

!

dot11 syslog

!

dot11 ssid WDS-EAP

authentication open eap eap_methods

authentication network-eap eap_methods

authentication key-management wpa version 2

guest-mode

!

!

dot11 guest

!

!

!

username Cisco password 7 13261E010803

username My3602 privilege 15 password 7 10430810111F00025D56797F65

!

!

bridge irb

!

!

!

interface Dot11Radio0

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

stbc

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface Dot11Radio1

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

peakdetect

dfs band 3 block

stbc

channel dfs

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface GigabitEthernet0

no ip address

no ip route-cache

duplex auto

speed auto

bridge-group 1

bridge-group 1 spanning-disabled

no bridge-group 1 source-learning

!

interface BVI1

ip address 10.106.54.146 255.255.255.192

no ip route-cache

ipv6 address dhcp

ipv6 address autoconfig

ipv6 enable

!

ip forward-protocol nd

ip http server

no ip http secure-server

ip http help-path http://www.cisco.com/warp/public/779/smbiz/prodconfig/help/eag

ip radius source-interface BVI1

!

!

radius-server local

no authentication eapfast

no authentication mac

nas 10.106.54.146 key 7 045802150C2E1D1C5A

user WDSClient1 nthash 7

072E776E682F4D5D35345B5A227E78050D6413004A57452024017B0803712B224A

!

radius-server attribute 32 include-in-access-req format %h

radius-server vsa send accounting

!

radius server Local-Radius

address ipv4 10.106.54.146 auth-port 1812 acct-port 1813

key 7 060506324F41584B56

!

bridge 1 route ip

!

!

wlccp authentication-server infrastructure method_Infrastructure

wlccp wds priority 254 interface BVI1

!

line con 0

line vty 0 4

transport input all

!

end

WDS客戶端AP

以下是WDS客戶端AP的配置示例：

Current configuration : 2512 bytes

!

! Last configuration change at 00:33:17 UTC Wed May 22 2013

version 15.2

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

!

hostname MAIB-WDS-Client

!

!

logging rate-limit console 9

enable secret 5 $1$vx/M$qP6DY30TGiXmjvUDvKKjk/

!

aaa new-model

!

!

aaa group server radius rad_eap

server name WDS-Radius

!

aaa authentication login eap_methods group rad_eap

aaa authorization exec default local

!

!

!

!

!

aaa session-id common

no ip routing

no ip cef

!

!

!

!

dot11 syslog

!

dot11 ssid WDS-EAP

authentication open eap eap_methods

authentication network-eap eap_methods

authentication key-management wpa version 2

guest-mode

!

!

dot11 guest

!

eap profile WDS-AP

method leap

!

!

!

username Cisco password 7 062506324F41

username My2602 privilege 15 password 7 09414F000D0D051B5A5E577E6A

!

!

bridge irb

!

!

!

interface Dot11Radio0

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

stbc

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface Dot11Radio1

no ip address

no ip route-cache

!

encryption mode ciphers aes-ccm

!

ssid WDS-EAP

!

antenna gain 0

peakdetect

dfs band 3 block

stbc

channel dfs

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface GigabitEthernet0

no ip address

no ip route-cache

duplex auto

speed auto

bridge-group 1

bridge-group 1 spanning-disabled

no bridge-group 1 source-learning

!

interface BVI1

ip address 10.106.54.136 255.255.255.192

no ip route-cache

ipv6 address dhcp

ipv6 address autoconfig

ipv6 enable

!

ip forward-protocol nd

ip http server

no ip http secure-server

ip http help-path http://www.cisco.com/warp/public/779/smbiz/prodconfig/help/eag

ip radius source-interface BVI1

!

!

radius-server attribute 32 include-in-access-req format %h

radius-server vsa send accounting

!

radius server WDS-Radius

address ipv4 10.106.54.146 auth-port 1812 acct-port 1813

key 7 110A1016141D5A5E57

!

bridge 1 route ip

!

!

wlccp ap username WDSClient1 password 7 070C285F4D06485744

wlccp ap wds ip address 10.106.54.146

!

line con 0

line vty 0 4

transport input all

!

end

驗證

使用本節內容，確認您的組態是否正常運作。設定完成後，WDS客戶端AP應該能夠註冊到WDS AP。

在WDS AP上，WDS狀態顯示為已註冊。

在WDS客戶端AP上，WDS的狀態為Infrastructure。

附註：輸出直譯器工具(僅供已註冊客戶使用)支援某些show命令。使用輸出直譯器工具來檢視show命令輸出的分析。

WDS AP上的CLI驗證輸出

以下過程顯示如何驗證WDS AP配置：

MAIB-WDS-AP#sh wlccp wds ap

HOSTNAME MAC-ADDR IP-ADDR IPV6-ADDR STATE

MAIB-WDS-Client f872.ea24.40e6 10.106.54.136 :: REGISTERED

MAIB-WDS-AP#sh wlccp wds statistics

WDS Statistics for last 10:34:13:

Current AP count: 1

Current MN count: 0

AAA Auth Attempt count: 2

AAA Auth Success count: 2

AAA Auth Failure count: 0

MAC Spoofing Block count: 0

Roaming without AAA Auth count: 0

Roaming with full AAA Auth count:0

Fast Secured Roaming count: 0

MSC Failure count: 0

KSC Failure count: 0

MIC Failure count: 0

RN Mismatch count: 0

WDS客戶端AP上的CLI驗證輸出

以下過程顯示如何驗證WDS客戶端AP配置：

MAIB-WDS-Client#sh wlccp ap

WDS = bc16.6516.62c4, IP: 10.106.54.146 , IPV6: ::

state = wlccp_ap_st_registered

IN Authenticator = IP: 10.106.54.146 IPV6: ::

MN Authenticator = IP: 10.106.54.146 IPv6::

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。