目錄

簡介

必要條件

需求

採用元件

設定

組態

根據DHCP對客戶端分類

根據17.18之前的OUI對客戶端進行分類

根據OUI對客戶端進行分類（從17.18開始）

驗證

疑難排解

參考資料

簡介

本文說明如何使用裝置分類器動態XML支援功能更新Catalyst 9800 WLC上的裝置分類器。

必要條件

需求

Cisco 9800 WLC基礎知識和裝置分類。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- C9800-CL v17.12.4、v17.15.4ES和v17.18.2ES

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

設定

組態

附註：從v17.10.1開始支援此功能。

在WLC上的dc_profile_dir資料夾下可以找到.xml檔案的示例：

C9800#dir bootflash:dc_profile_dir

Directory of bootflash:/dc_profile_dir/

393224 -rw- 443023 Dec 23 2025 07:14:35 +00:00 dc_embedded_profiles.txt.bkp

393233 -rw- 303835 Dec 23 2025 07:14:35 +00:00 dc_default_profiles.txt

393222 -rw- 443023 Dec 23 2025 07:14:35 +00:00 dc_embedded_profiles.txt

393223 -rw- 1367 Dec 23 2025 07:14:35 +00:00 dc_user_profiles.xml

393221 -rw- 303835 Dec 18 2025 07:13:57 +00:00 dc_default_profiles.txt.bkp

例如，在進行任何更改之前，需要先提供以下客戶端詳細資訊：

C9800#show wireless client mac-address 74da.38eb.c01f detail

Client MAC Address : 74da.38eb.c01f

Client MAC Type : Universally Administered Address

Client DUID: NA

Client IPv4 Address : 10.14.42.101

...

Device Classification Information:

Device Type : Microsoft-Workstation

Device Name : DESKTOP-R2CH8G5

Protocol Map : 0x000009 (OUI, DHCP)

Device Vendor : MSFT 5.0

Device Protocol : DHCP

Type : 12 19

Data : 13

00000000 00 0c 00 0f 44 45 53 4b 54 4f 50 2d 52 32 43 48 |....DESKTOP-R2CH|

00000010 38 47 35 |8G5 |

Type : 60 12

Data : 0c

00000000 00 3c 00 08 4d 53 46 54 20 35 2e 30 |.<..MSFT 5.0 |

Type : 55 18

Data : 12

00000000 00 37 00 0e 01 03 06 0f 1f 21 2b 2c 2e 2f 77 79 |.7.......!+,./wy|

00000010 f9 fc |.. |

...

C9800#show device classifier mac-address 74da.38eb.c01f detail

Client Mac: 74da.38eb.c01f

Device Type: Microsoft-Workstation

Confidence Level: 10

Device Name: DESKTOP-R2CH8G5

Device Vendor: MSFT 5.0

可以根據不同的協定對客戶端進行分類。

根據DHCP對客戶端分類

編輯.xml檔案，在此示例中，將應用以下規則：

<?xml version="1.0" encoding="UTF-8"?>

<裝置清單>

<CopyRight>版權所有(c)2021-2022 by Cisco Systems， Inc.保留所有權利。</CopyRight>

<Version>1.0</Version>

<裝置>

<DeviceType>Sample_Profile_2</DeviceType>

<RuleName>Sample_Rule_1</RuleName>

<RuleOperator>OR</RuleOperator>

<RuleDetailabilityMetric>20</RuleDetailabilityMetric>

<檢查>

<Protocol>DHCP</Protocol>

<TLV-Type>60</TLV-Type>

<TLV-Value-Type>String</TLV-Value-Type>

<TLV-Value>MSFT</TLV-Value>

</Check>

</Device>

</DeviceList>

此處使用的值與從上一個show wireless client mac-address [mac] detail輸出中擷取的值相同。

選擇粗體部分是為了避免出現空格，因為它們可能會導致解析錯誤。但它可能是產出的開始、中間或最後部分。

對於度量：選擇20為其提供更高的度量，因此它優先。度量越高，首選項就越高。

將檔案直接複製到bootflash。

在CLI上：

複製{ftp: | tftp:} {flash:}

或在GUI上：

管理>管理>檔案管理器

bootflash:

上傳

之後，檔案必須在WLC上可用：

C9800#more bootflash:dc_user_profiles.xml

<?xml version="1.0" encoding="UTF-8"?>

<DeviceList>

<CopyRight>Copyright (c) 2021-2022 by Cisco Systems, Inc. All rights reserved.</CopyRight>

<Version>1.0</Version>

<Device>

<DeviceType>Sample_Profile_2</DeviceType>

<RuleName>Sample_Rule_1</RuleName>

<RuleOperator>OR</RuleOperator>

<RuleCertaintyMetric>20</RuleCertaintyMetric>

<Check>

<Protocol>DHCP</Protocol>

<TLV-Type>60</TLV-Type>

<TLV-Value-Type>String</TLV-Value-Type>

<TLV-Value>MSFT</TLV-Value>

</Check>

</Device>

</DeviceList>

啟用裝置分類器：

C9800#config t

C9800(config)#device classifier

現在，建立的配置檔案將顯示在此輸出下：

C9800#show device classifier profile type custom

Valid Type Profile Name mCon ID

----------------------------------------------------------------------------

Valid Custom Sample_Profile_2 1 0

之後，客戶分類必須改變：

如果客戶端已連線，請斷開連線，然後重新連線客戶端。

C9800#clear wireless client device cache

!--- To clear any classification cache

C9800#show wireless client mac-address 74da.38eb.c01f detail

Client MAC Address : 74da.38eb.c01f

Client MAC Type : Universally Administered Address

Client DUID: NA

Client IPv4 Address : 10.14.42.101

...

Device Classification Information:

Device Type : Sample_Profile_2

Device Name : DESKTOP-R2CH8G5

Protocol Map : 0x000009 (OUI, DHCP)

Device Vendor : MSFT 5.0

Device Protocol : DHCP

Type : 12 19

Data : 13

00000000 00 0c 00 0f 44 45 53 4b 54 4f 50 2d 52 32 43 48 |....DESKTOP-R2CH|

00000010 38 47 35 |8G5 |

Type : 60 12

Data : 0c

00000000 00 3c 00 08 4d 53 46 54 20 35 2e 30 |.<..MSFT 5.0 |

Type : 55 18

Data : 12

00000000 00 37 00 0e 01 03 06 0f 1f 21 2b 2c 2e 2f 77 79 |.7.......!+,./wy|

00000010 f9 fc |.. |

...

C9800#show device classifier mac-address 74da.38eb.c01f detail

Client Mac: 74da.38eb.c01f

Device Type: Sample_Profile_2

Confidence Level: 20

Device Name: DESKTOP-R2CH8G5

Device Vendor: MSFT 5.0

根據17.18之前的OUI對客戶端進行分類

警告：此問題目前在Cisco錯誤ID CSCws中修正66837 .追蹤錯誤以修正錯誤。

編輯.xml檔案，在此示例中，將應用以下規則：

<?xml version="1.0" encoding="UTF-8"?>

<裝置清單>

<CopyRight>版權所有(c)2021-2022 by Cisco Systems， Inc.保留所有權利。</CopyRight>

<Version>4.3</Version>

<裝置>

<DeviceType>Test-3</DeviceType>

<RuleName>Cisco-Rule</RuleName>

<RuleOperator>AND</RuleOperator>

<RuleDetailabilityMetric>20</RuleDetailabilityMetric>

<檢查>

<Protocol>MAC</Protocol>

<TLV-Value-Type>String</TLV-Value-Type>

<TLV-Value>Edimax</TLV-Value>

</Check>

</Device>

</DeviceList>

此處的字串是基於MAC地址的字首選擇的。可從IEEE定義的標準OUI檢查此問題。

將檔案直接複製到bootflash。

在CLI上：

複製{ftp: | tftp:} {flash:}

或在GUI上：

管理>管理>檔案管理器

bootflash:

上傳

之後，檔案必須在WLC上可用：

C9800#more bootflash:dc_user_profiles.xml

<?xml version="1.0" encoding="UTF-8"?>

<DeviceList>

<CopyRight>Copyright (c) 2021-2022 by Cisco Systems, Inc. All rights reserved.</CopyRight>

<Version>4.3</Version>

<Device>

<DeviceType>Test-3</DeviceType>

<RuleName>Cisco-Rule</RuleName>

<RuleOperator>AND</RuleOperator>

<RuleCertaintyMetric>20</RuleCertaintyMetric>

<Check>

<Protocol>MAC</Protocol>

<TLV-Value-Type>String</TLV-Value-Type>

<TLV-Value>Edimax</TLV-Value>

</Check>

</Device>

</DeviceList>

啟用裝置分類器：

C9800#config t

C9800(config)#device classifier

現在，建立的配置檔案將顯示在此輸出下：

C9800#show device classifier profile type custom

Valid Type Profile Name mCon ID

----------------------------------------------------------------------------

Valid Custom Test-3 1 0

之後，客戶分類必須改變：

如果客戶端已連線，請斷開連線，然後重新連線客戶端。

C9800#clear wireless client device cache

!--- To clear any classification cach

C9800#show wireless client mac-address 74da.38eb.c01f detail

Client MAC Address : 74da.38eb.c01f

Client MAC Type : Universally Administered Address

Client DUID: NA

Client IPv4 Address : 10.14.42.101

...

Device Classification Information:

Device Type : Test-3

Device Name : EDIMAX TECHNOLOGY CO. LTD.

Protocol Map : 0x000001 (OUI)

Day Zero Classification : EDIMAX TECHNOLOGY CO. LTD.

...

C9800#show device classifier mac-address 74da.38eb.c01f detail

Client Mac: 74da.38eb.c01f

Device Type: Sample_Profile_2

Confidence Level: 20

Device Name: DESKTOP-R2CH8G5

Device Vendor: MSFT 5.0

根據OUI對客戶端進行分類（從17.18開始）

警告：此問題目前正在Cisco錯誤 IDCSCws66837中修復。請追蹤該錯誤以便進行修復。

編輯.xml檔案，在此示例中，將應用以下規則：

<?xml version="1.0" encoding="UTF-8"?>

<裝置清單>

<CopyRight>版權所有(c)2021-2022 by Cisco Systems， Inc.保留所有權利。</CopyRight>

<Version>4.3</Version>

<裝置>

<DeviceType>Test-1</DeviceType>

<RuleName>Cisco-Rule</RuleName>

<RuleOperator>AND</RuleOperator>

<RuleDetailabilityMetric>20</RuleDetailabilityMetric>

<檢查>

<Protocol>MAC</Protocol>

<TLV-Value-Type>Regex</TLV-Value-Type>

<TLV-Value>74da.38*</TLV-Value>

</Check>

</Device>

</DeviceList>

從17.18開始，您可以使用MAC地址的字首分類。

此處的星號（*符號）表示在本示例中以74da.38開頭的所有MAC地址將根據此規則進行分類。

另一個選項：完整的MAC地址可放在此處，這樣便有機會單獨對MAC地址進行分類。

將檔案直接複製到bootflash。

在CLI上：

複製{ftp: | tftp:} {flash:}

或在GUI上：

管理>管理>檔案管理器

bootflash:

上傳

之後，檔案必須在WLC上可用：

C9800#more bootflash:dc_user_profiles.xml

<?xml version="1.0" encoding="UTF-8"?>

<DeviceList>

<CopyRight>Copyright (c) 2021-2022 by Cisco Systems, Inc. All rights reserved.</CopyRight>

<Version>4.3</Version>

<Device>

<DeviceType>Test-1</DeviceType>

<RuleName>Cisco-Rule</RuleName>

<RuleOperator>AND</RuleOperator>

<RuleCertaintyMetric>20</RuleCertaintyMetric>

<Check>

<Protocol>MAC</Protocol>

<TLV-Value-Type>Regex</TLV-Value-Type>

<TLV-Value>74da.38*</TLV-Value>

</Check>

</Device>

</DeviceList>

啟用裝置分類器：

C9800#config t

C9800(config)#device classifier

現在，建立的配置檔案將顯示在此輸出下：

C9800#show device classifier profile type custom

Valid Type Profile Name mCon ID

----------------------------------------------------------------------------

Valid Custom Test-1 1 0

之後，客戶分類必須改變：

如果客戶端已連線，請斷開連線，然後重新連線客戶端。

C9800#clear wireless client device cache

!--- To clear any classification cache

C9800#show wireless client mac-address 74da.38eb.c01f detail

Client MAC Address : 74da.38eb.c01f

Client MAC Type : Universally Administered Address

Client DUID: NA

Client IPv4 Address : 10.14.42.101

...

Device Classification Information:

Device Type : Test-1

Device Name : EDIMAX TECHNOLOGY CO. LTD.

Protocol Map : 0x000001 (OUI)

Day Zero Classification : EDIMAX TECHNOLOGY CO. LTD.

...

C9800#show device classifier mac-address 74da.38eb.c01f detail

Client Mac: 74da.38eb.c01f

Device Type: Test-1

Confidence Level: 20

Day Zero Classification: EDIMAX TECHNOLOGY CO. LTD.

Device Name: EDIMAX TECHNOLOGY CO. LTD.

驗證

在 CLI 上：

more bootflash:dc_user_profiles.xml

show device classifier profile type custom

show wireless client mac-address [mac] detail

show device classifier mac-address [mac] detail

在 GUI 上：

1.定位至監控>無線>客戶端。

2. Device Type可以視為列。

「監控」頁下的裝置型別

按一下客戶端，Client 360 View下也顯示Device Type。

客戶端360下的裝置型別

疑難排解

確保客戶端正在傳送您用於分類客戶端的協定。

對於DHCP分類，客戶端必須傳送一個唯一的TLV，該TLV可作為WLC區分客戶端型別的字串。

在OUI分類方面，請瞭解MAC隨機化。

在客戶端啟動第一個連線時收集其放射性跟蹤。

https://www.cisco.com/c/en/us/support/docs/wireless/catalyst-9800-series-wireless-controllers/213949-wireless-debugging-and-log-collection-on.html#toc-hId-2010809796

為了進一步調查，可以收集以下跟蹤：

request platform soft trace rotate all

delete /force bootflash:tracelogs/*

set platform software trace smd chassis active R0 dc-profile noise

set platform software trace smd chassis active R0 dc-sub noise

set platform software trace smd chassis active R0 dc-sm noise

set platform software trace smd chassis active R0 dc-mem noise

set platform software trace smd chassis active R0 dc noise

重現問題，然後使用以下命令收集輸出：

show logging process smd internal start last 20 minutes to-file flash:cls_logging.log

附註：如果已在使用此功能，而.xml自定義檔案已存在於bootflash下，但您希望編輯該檔案，則無論何時編輯該檔案，如果配置檔案未更新，請應用以下步驟：

1)從快閃記憶體中刪除現有的dc_user_profiles.xml

2)禁用裝置分類器（無裝置分類器）

3)再次啟用裝置分類器（裝置分類器）

4)將新的dc_user_profiles.xml檔案複製到快閃記憶體

參考資料

https://www.cisco.com/c/en/us/td/docs/wireless/controller/9800/17-18/config-guide/b_wl_17_18_cg/m_device_classifier_dynamic_xml_support.html