目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

計時

設定

網路圖表

組態

驗證

在路由器asj3640-1上

在路由器asj3640-2上

疑難排解

相關資訊

簡介

本文檔提供用於背對背連線並測試與兩台Cisco 3640路由器的T1連線的配置示例。

在此配置示例中，我們將Cisco路由器asj3640-1的時鐘源設定為內部。這意味著服務提供商或電話公司(telco)不提供時鐘，因此T1需要在內部派生時鐘，並且在此情況下是「主時鐘」。我們還需要配置直接連線到此T1的所有其它裝置，以便從主路由器（思科路由器asj3640-1）獲得時鐘，並充當「從路由器」。 在我們的設定中，從屬路由器是Cisco路由器asj3640-2。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- asj3640-1上的Cisco IOS®軟體版本11.3(10)T。此處使用NM-1CT1-CSU網路模組。

- asj3640-2上的Cisco IOS軟體版本12.2(1)。此處使用NM-2CT1-CSU網路模組。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

計時

在T1網路中，計時是一項重要的功能。計時指的是T1載波的計時和同步。定時在傳輸的資料訊號內編碼，用於確保整個網路的同步。在典型情況下，T1的一側提供主時鐘，而另一側是主時鐘的從時鐘。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

圖1 — 網路圖

組態

本檔案會使用以下設定：

- asj3640-1

- asj3640-2

asj3640-1

asj3640-1#show running-config

Building configuration...

Current configuration:

!

version 11.3

!

hostname asj3640-1

!

!

controller T1 1/0

framing esf

clock source internal

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

!

interface Serial1/0:1

ip address 10.10.10.1 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.116 255.255.255.240

!

!

line con 0

transport input none

line aux 0

line vty 0 4

exec-timeout 60 0

login

!

end

asj3640-2

asj3640-2#show running-config

Building configuration...

!

version 12.2

!

hostname asj3640-2

!

!

controller T1 1/0

framing esf

linecode b8zs

channel-group 1 timeslots 1 speed 64

!

controller T1 1/1

shutdown

!

interface Serial1/0:1

ip address 10.10.10.2 255.255.255.192

encapsulation ppp

!

interface Ethernet2/0

ip address 171.68.186.117 255.255.255.240

!

!

line con 0

transport input none

line 1 18

line aux 0

line vty 0 4

login

!

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show interfaces serial — 顯示有關串列介面的資訊。

- show controllers — 顯示有關物理埠裝置的資訊。

- show diag — 顯示環境統計資訊和加電診斷狀態。

以下是在圖1所示的裝置上輸入的這些命令的輸出。此輸出表明網路運行正常。

在路由器asj3640-1上

asj3640-1#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.1/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set, keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:02, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/2 (size/max/drops); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

56408 packets input, 3194092 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

52431 packets output, 1988028 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-1#show controllers t1

T1 1/0 is up.

T1 with CSU interface.

Cable Length is LONG, Rcv gain is 36 db and Tx gain is 0 db.

No alarms detected.

Framing is ESF, Line Code is B8ZS, Clock Source is Internal.

Data in current interval (765 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

asj3640-1#show diag

Slot 1:

CT1 (CSU) port adapter, 1 port

Port adapter is analyzed

Port adapter insertion time unknown

Hardware revision 1.1           Board revision A0

Serial number     5706080       Part number    800-01228-03

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 26 01 01 00 57 11 60 50 04 CC 03 00 00 00 00

0x30: 50 00 00 00 97 10 11 17 FF FF FF FF FF FF FF FF

在路由器asj3640-2上

asj3640-2#show interfaces serial 1/0:1

Serial1/0:1 is up, line protocol is up

Hardware is DSX1

Internet address is 10.10.10.2/26

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:03, output 04:23:19, output hang never

Last clearing of "show interface" counters 1d20h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 8

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 48 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34363 packets input, 1305984 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

37049 packets output, 2090260 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Timeslot(s) Used:1, Transmitter delay is 0 flags

asj3640-2#show controllers t1

T1 1/0 is up.

Applique type is Channelized T1

Cablelength is long gain36 0db

No alarms detected.

alarm-trigger is not set

Framing is ESF, Line Code is B8ZS, Clock Source is Line.

Data in current interval (557 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 0 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 0 Unavail Secs

Total Data (last 24 hours)

0 Line Code Violations, 0 Path Code Violations,

0 Slip Secs, 1 Fr Loss Secs, 0 Line Err Secs, 0 Degraded Mins,

0 Errored Secs, 0 Bursty Err Secs, 1 Severely Err Secs, 0 Unavail Secs

asj3640-2#show diag

Slot 1:

CT1 (CSU) Port adapter, 2 ports

Port adapter is analyzed

Port adapter insertion time unknown

EEPROM contents at hardware discovery:

Hardware revision 1.1           Board revision B0

Serial number     16809907      Part number    800-01229-04

Test history      0x0           RMA number     00-00-00

EEPROM format version 1

EEPROM contents (hex):

0x20: 01 27 01 01 01 00 7F B3 50 04 CD 04 00 00 00 00

0x30: 58 00 00 00 99 11 02 00 FF FF FF FF FF FF FF FF

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 存取技術支援頁面

- 技術支援 - Cisco Systems