目錄

簡介

必要條件

需求

採用元件

設定

ATM模式

EFM模式

驗證

疑難排解

相關資訊

簡介

本檔案介紹在兩個EHWIC-4SHDSL-EA模組之間實作背對背多速率對稱高速數位使用者線路(G.SHDSL)連線所需的設定步驟。

您必須將連線的一端配置為中央辦公室(CO)模式，另一端配置為客戶端裝置(CPE)模式，才能建立SHDSL連線。這種背對背的SHDSL連線設定通常在園區網路中實現，以便在兩個建築物之間提供連線，而不需要在兩個DSL路由器之間設定數字使用者線接入複用器(DSLAM)。

必要條件

需求

思科建議您瞭解以下主題：

- EHWIC-4SHDSL-EA模組

- 固定整合式服務路由器(ISR)G2路由器（如C888EA-K9）在CO和CPE模式下與Cisco IOS®軟體15.2(2)T2和更新版本配合使用

採用元件

本文件所述內容不限於特定軟體和硬體版本。

但是，使用以下裝置構建設定：

- 兩台裝有Cisco IOS® 15.4.3M2的ISR第2代路由器(CISCO2901/K9)

- 兩台ISR G2路由器上都安裝了兩個EHWIC-4SHDSL-EA模組

- ANSI/TIA/EIA-568-B電纜，兩端均帶有RJ-45聯結器

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

在此設定中，您將使用安裝有EHWIC-4SHDSL-EA模組的相同路由器。名為CO_Router的裝置配置了SHDSL控制器，以便在CO模式下運行；而名為CPE_Router的裝置配置了SHDSL控制器，以便在CPE模式下運行。

EHWIC-4SHDSL-EA模組可設定為在第一哩(EFM)和非同步傳輸模式(ATM)下的乙太網路。 本文說明如何在EFM和ATM模式下建立背對背SHDSL連線。

此處的示例說明如何在ATM模式下建立背靠背SHDSL連線。

ATM模式

設定背對背SHDSL連線時，您可以實作IP over ATM(IPoA)或PPP over ATM(PPPoA)解決方案。

1. IPoA解決方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 1624 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

redundancy

!

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.1 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 1538 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

voice-card 0

!

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.2 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

2. PPPoA解決方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 1779 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.1 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

control-plane

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 1693 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

3.使用ATM的PPPoE解決方案

- CO路由器：

CO_Router#show running-configuration

Building configuration...

Current configuration : 2299 bytes

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot-end-marker

!

no aaa new-model

!

username cisco password 0 cisco

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

bba-group pppoe global

virtual-template 1

!

!

interface Loopback0

ip address 10.1.1.1 255.255.255.255

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

protocol pppoe group global

!

!

interface Virtual-Template1

ip unnumbered Loopback0

ip mtu 1492

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 10.1.1.2 10.1.1.254

!

line con 0

line aux 0

line vty 0 4

login

transport input all

end

CO_Router#

Verification:

CO_Router#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi1.1          -          10.1.1.2        -               -               in

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 2554 bytes

!

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/2

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

pppoe-client dial-pool-number 1

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco

ppp chap password 0 cisco

!

!

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CPE_Router#

Verification:

CPE_Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Embedded-Service-Engine0/0 unassigned      YES NVRAM  administratively down down

ATM0/1/0                   unassigned      YES unset  up                    up

ATM0/1/0.1                 unassigned      YES unset  up                    up

Dialer1                    10.1.1.2        YES IPCP   up                    up

Virtual-Access1            unassigned      YES unset  up                    up

CPE_Router#

EFM模式

配置背對背的SHDSL連線時，可以實施IPoE或PPPoE解決方案。

1. IPoE解決方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 2194 bytes

!

! Last configuration change at 14:56:53 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

cts logging verbose

!

!

redundancy

!

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

ip address 1.1.1.1 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 1646 bytes

!

! Last configuration change at 14:50:55 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

redundancy

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

2. PPPoE解決方案

- CO路由器：

CO_Router#show running-config

Building configuration...

Current configuration : 1851 bytes

!

! Last configuration change at 15:00:06 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

bba-group pppoe global

virtual-template 1

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

pppoe enable group global

!

interface Virtual-Template1

mtu 1492

ip unnumbered Ethernet0/3/0

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 1.1.1.1

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- CPE路由器：

CPE_Router#show running-config

Building configuration...

Current configuration : 2310 bytes

!

! Last configuration change at 15:10:04 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

!

!

!

!

cts logging verbose

!

!

voice-card 0

!

!

!

!

!

redundancy

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

!

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

!

!

control-plane

!

!

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

驗證

使用本節內容，確認您的組態是否正常運作。

1.若要確認路由器是否處於CO模式，請執行show命令。輸出中的CO終端行（示例中為粗體）表示路由器處於CO模式。預設模式為CPE。為簡潔起見，此處未顯示部分輸出。

CO# show controllers shdSL 0/1/0

Controller SHDSL 0/1/0 is UP

Hardware is EHWIC-4SHDSL-EA, rev 0 on slot 0, hwic slot 1

Capabilities: EFM: 2-wire, EFM-Bond, Annex A, B, F & G

ATM: 2-wire, Mpair, IMA, Annex A, B, F & G

- CO終止：

cdb=0x3CF085F0, plugin=0x21C33C1C, ds=0x21C33C68 base=0x10200000

FPGA Version is A14

NPU Source: System

NPU Firmware version: SHDSL_EA_FW_20130116053038

Vendor: Infineon, Chipset: SOCRATES-4e

PHY Source: System

IDC Firmware version: 1.7.5.0

DFE Firmware version: 1.1-1.7.5__002

Firmware reload mode: Auto

<Output abbreviated due to space constraints>

2.在EFM模式下，運行show controllers ethernet命令進行驗證。

3.在ATM模式中，執行show controllers atm 命令以進行驗證。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 有關排除SHDSL連線故障的詳細資訊，請參閱在Cisco路由器中配置Cisco G.SHDSL EFM/ATM EHWIC

- 有關PPP相關的故障排除，請參閱PPP故障排除流程圖

- 技術支援與文件 - Cisco Systems