目錄

簡介

問題

解決方案

相關資訊

簡介

本文件說明一種新型 CLI，可追蹤撥號介面上點對點通訊協定 (PPP) 作業階段的狀態。

問題

撥號器介面廣泛應用於數位使用者線路(DSL)領域，用於不同型別的部署，例如乙太網路上的點對點通訊協定(PPPoE)、非同步傳輸模式上的點對點通訊協定(PPPoA)等。無論撥號器介面頂部的PPP會話是開啟還是關閉，撥號器介面始終處於開啟狀態。這種行為的一個已知問題是，如果您有多個傳出連線，則可能導致路由中出現黑洞，除非您使用一些附加功能(如網際網路協定服務級別協定(IP SLA)跟蹤來檢查撥號器介面的可達性。

解決方案

最近的IOS版本中引入了一個新的CLI dialer down-with-vInterface，當PPP會話關閉時，撥號器介面將關閉。

來自DSL路由器的配置片段：

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco@cisco.com

ppp chap password 0 cisco

即使PPPoE會話已關閉，撥號器介面仍處於up狀態。

Router#show pppoe session

1 client session

Uniq ID  PPPoE  RemMAC          Port                    VT  VA         State

SID  LocMAC                                      VA-st      Type

N/A     58  00c1.64d5.41d1  Gi0/1                   Di1 N/A        PADISNT

0006.f657.67b1

Router#show interface dialer1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:49:48

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

CLIENT(config-if)

您可以在Dialer介面配置下新增新的CLI，如下所示：

Router(config)#int dialer1

Router(config-if)# dialer down-with-vInterface

輸入dialer down-with-vInterface CLI後，撥號器介面會在PPP作業階段處於關閉狀態時移至關閉狀態，如範例所示：

Router#show interface dialer1

Dialer1 is down, line protocol is down (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:50:36

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

這有助於避免使用撥號器介面時需要額外的配置（如IP SLA、跟蹤等），以便路由故障切換正常工作。

相關資訊

- PPPoE配置指南