目錄

簡介

必要條件

需求

採用元件

慣例

傳真傳輸/高速

傳真傳輸/快速處理的設定

傳真傳輸疑難排解

調試直通

傳真中繼

傳真中繼配置

傳真中繼故障排除

調試思科傳真中繼

超級G3傳真/資料機

摘要

相關資訊

簡介

本文檔作為Catalyst 6608刀片和VG248之間的傳真簡介和故障排除指南。還包括一些數據機和Super G3傳真資訊。

大多數現代傳真裝置符合G3標準。Fax Group 3是一種基於標準的技術，由ITU建議T.4和T.30組成 。T.4涉及到傳真裝置如何對傳真影象進行編碼，T.30詳細說明了傳真協商和通訊協定。

第3組傳真裝置設計為透過公共交換電話網路(PSTN)使用。 由於PSTN是為人類語音而設計的，第3組就像模擬數據機一樣使用模擬編碼或調制訊號。模擬數據機和傳真機都是數位設備，必須使用調製的模擬訊號通過PSTN傳遞數位資訊。此已調制訊號通常可作為不同的音訊音調聽到。

實施Cisco AVVID VoIP網路時，傳真可能會出現問題。這是因為語音上有時會使用高壓縮編解碼器，這會導致每個語音呼叫使用的頻寬更少。這些高壓縮編解碼器（如G.729）針對語音進行了最佳化。它們很好地將語音壓縮到低頻寬，同時保持品質。由於這些編解碼器針對語音而非傳真進行了最佳化，因此傳真傳輸的調制訊號通常不能正確通過，傳真呼叫會失敗。

通過要壓縮的編解碼器傳送傳真的方法稱為帶內傳真或傳真傳輸。已知傳真使用其他編解碼器（例如G.711）傳輸，壓縮比較低或者根本沒有壓縮。當更改帶內傳真時，這些編解碼器可用於使用Cisco VoIP網路排除傳真中繼或常規傳真問題。

傳真中繼是一種協定，它接收調制訊號，提取數位資訊，然後使用資料包通過資料網路中繼數位資訊。在終端端，數位資訊從分組中提取、調制和播放。這不同於帶內傳真，其中初始調制訊號由編解碼器編碼和壓縮，如同它是語音樣本。然後，終端路由器必須解壓縮和解碼該示例，然後將其播放到終端傳真機。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

傳真傳輸/高速

傳真直通表示使用語音編解碼器傳遞模擬傳真音。除了一些改動外，數位訊號處理器(DSP)將直通模式下的傳真音視為普通語音呼叫。傳真音就像語音一樣被取樣。脈衝編碼調制(PCM)用於數位化音調。出現的主要差異涉及抖動緩衝區（設定已針對傳真進行最佳化），並且DSP確保禁用靜音抑制。否則，從DSP的角度將呼叫作為普通語音呼叫處理。傳真傳輸允許傳真機彼此透明地通訊，而不會使閘道裝置干擾通訊。

傳真速度與傳真傳輸類似，只有一個例外。傳真加速的實施允許對語音通話使用高壓縮編解碼器，例如G.729。但是，當檢測到某些傳真音(如傳真高級資料鏈路控制(HDLC)標誌)時，編解碼器將升級或更改為G.711。6608和VG248使用特殊信令來相互通知所需的升級速度。在常規傳真傳輸中也會看到同樣的訊號。該訊號指示DSP切換到傳真抖動緩衝區設定並禁用靜音抑制。

傳真傳輸 — 使用G.711編解碼器將模擬傳真音傳入頻內

傳真傳輸/快速處理的設定

VG248和6608平台上的傳真直通配置非常簡單。在Cisco CallManager中註冊這些裝置後，只需進行最少的配置即可使傳真傳輸正常工作。

VG248上的傳真直通配置涉及禁用傳真中繼。這會強制對所有傳真呼叫使用傳真傳輸。完成以下步驟以停用傳真中繼：

- 選擇Configure > Telephony > Port specific parameters > <select port> > Fax relay > disabled。

還有其他一些配置設定可進一步調整VG248上的傳真傳輸。其中一項設定用於直通訊令。選項包括legacy和IOS模式。舊版模式允許與舊版AVVID產品和軟體版本互操作。IOS模式強制使用與較新AVVID軟體版本和所有IOS裝置相容的NSE信令資料包。完成以下步驟即可到達舊模式或IOS模式：

- 選擇Configure > Telephony > Advanced Settings > Passthrough signaling，然後選擇legacy或IOS模式。

另一個設定是用於直通模式。此設定允許對VG248進行硬編碼，以便其在聽到傳真和/或數據機音時如何反應。預設設定為自動。如果沒有聽到聲音，則將該呼叫作為常規語音呼叫處理。但是，如果聽到聲音，則VG248會根據音調型別使用適當的回聲消除器設定。

下一個設定僅用於語音。此設定強制VG248將所有呼叫作為語音呼叫處理，即使檢測到傳真/數據機音。下一個設定僅為直通：ECAN已禁用。這迫使VG248在檢測到2100 Hz音訊時禁用回聲消除器(ECAN)。大多數情況下，在禁用ECAN之前，必須看到具有相位反轉的2100 Hz音調。但是，此設定會強制VG248在檢測到傳真/數據機音且DSP進入直通模式時始終禁用ECAN。

最後一個設定，僅傳遞：啟用ECAN類似於僅傳遞：ECAN已禁用。例外情況是，每當檢測到傳真/數據機音，且VG248進入直通模式，ECAN始終啟用，即使檢測到具有相位反轉的2100 Hz音。這種音調通常禁用ECAN。

- 選擇Configure > Telephony > Port specific parameters > <select port> > Passthrough mode，然後選擇<default:automatic>, <voice only:no passthrough> , <passthrough only:ECAN disabled>或<passthrough only:ECAN enabled> 。

在6608上，傳真直通配置與禁用傳真中繼一樣簡單。Cisco Catalyst 6000 VoIP網關配置螢幕只列出兩個傳真選項（舊版Cisco CallManager代碼）。 確保未選中Fax Relay Enable框。這會強制6608僅使用傳真傳輸。請注意，此直通模式是使用NTE的舊式直通模式。因此，連線到6608並執行傳真直通的VG248必須將直通訊令設定為傳統。

在Cisco CallManager 3.2.2c spD及更高版本中，6608網關配置視窗中有更多傳真選項，如下圖所示。為了將6608配置為傳真傳輸，請確保「Fax Relay Enable（啟用傳真中繼）」框未選中（預設情況下為選中狀態）。 禁用傳真中繼後，就不需要使用傳真錯誤更正模式覆蓋。對於傳真傳輸，唯一重要的其它值是NSE Type欄位。您可以在此處將NSE設定為與舊裝置相容（這些裝置始終是運行舊代碼的非IOS AVVID裝置）。 或者，使用較新的IOS網關設定，使傳真傳輸與IOS裝置以及具有最新代碼的AVVID裝置相容。IOS網關的NSE型別是優良的，儘可能用於所有裝置。傳真/數據機資料包冗餘選項也可用於傳真傳輸。思科建議您檢查是否存在丟包和大量抖動的網路。

傳真傳輸疑難排解

當您排除6608和VG248上的傳真直通問題時，在繼續進行有限的調試之前，需要先驗證幾件事。

- 檢驗兩台裝置上的配置。

- 對於VG248，請確保禁用傳真中繼。確保設定了適當的NSE或NTE型別(在1.2(1)及更高版本中可用)。NSE或IOS模式是首選設定，除非VG248與僅支援NTE的裝置通訊。確保將直通模式設定為默認：自動，以便檢測並發出相應的聲調。

- 對於6608，請確保未選中「Fax Relay（傳真中繼）」框。此外，請確保正確設定NSE型別以匹配VG248。運行Cisco CallManager 3.2.2c spD及更高版本（此選項可用）時，NSE模式或IOS網關是首選設定。

- 語音呼叫工作正常嗎？

- 傳真是否適用於PSTN?

- 檢查6608並確保沒有任何錯誤。Dick Tracy可用於驗證6608埠上沒有任何錯誤。

連線到適當的6608埠IP地址，然後發出4 show status命令。輸出如下所示：

00:00:36.160 SPAN: CLI Request --> Show Span Summary Status

E1 6/1 is up

No alarms detected.

Alarm MIB Statistics

Yellow Alarms -------> 1

Blue Alarms ---------> 0

Frame Sync Losses ---> 0

Carrier Loss Count --> 0

Frame Slip Count ----> 0

D-chan Tx Frame Count ----> 5

D-chan Tx Frames Queued --> 0

D-chan Tx Errors ---------> 0

D-chan Rx Frame Count ----> 5

D-chan Rx Errors ---------> 0

發出4 show fdlintervals<intervals>命令，以取得更詳細的實體層資訊。

16:56:09.590 SPAN: CLI Request --> Dump local FDL 15-min interval history

96 Complete intervals stored.

Data in current interval (356 seconds elapsed):

0 Line Code Violations, 0 Path Code Violations

0 Slip Secs, 255 Fr Loss Secs, 0 Line Err Secs

0 Errored Secs, 0 Bursty Err Secs, 0 Severely Err Secs, 356 Unavail Secs

確保傳真路徑中的所有數字連結均無錯誤。

- 如果網路中有封包遺失，在6608上啟用封包備援。可以在Cisco CallManager Admin網關配置頁面啟用此選項。此功能允許傳送冗餘資料包。如果傳真直通資料包丟失，冗餘資料包會通過以保持傳真品質和呼叫成功。在VG248上對此沒有選項。

調試直通

在檢視傳真直通調試之前，必須瞭解網關之間發生的信令，以確保發生正確的直通通知。訊號很簡單。這是檢視直通調試時需要檢查的主要內容之一。此圖是兩個直通網關之間發生的命名服務事件(NSE)信令的簡單示例。NSE是基於標準的思科專有形式，即RFC 2833命名電話事件(NTE)。 在使用RTP負載型別100的媒體即時傳輸協定(RTP)流中找到了它們。

在傳真/數據機呼叫期間出現NSE消息（呼叫源自左側的傳真）

終止傳真閘道檢測到2100 Hz呼叫者輸入數字(CED)傳真音後，會傳送一個NSE-192訊號封包，該訊號封包是由三個相同的192封包所組成。此信令資料包通知對方檢測到傳真/數據機音。傳真和低速數據機音調均為2100 Hz，無相位反轉。由終端網關傳送的NSE-192指示始發網關準備傳真/數據機直通呼叫。兩個網關確保編解碼器設定為G.711或上速。網關還確保禁用靜音抑制或語音活動檢測(VAD)，並加深抖動緩衝區。

如果6608為非IOS網關設定了其NSE型別，並且VG248在直通訊令下為舊式設定了NTE信令，則使用NTE信令。不應使用這些NTE設定。NTE設定保留為選項，以便向後相容不運行更高版本代碼的裝置。

在VG248上，可以運行跟蹤來跟蹤傳真直通呼叫的進度。由於直通呼叫使用G.711編解碼器帶內傳輸，因此實際傳真消息不可檢視。但是，當檢測到傳真音調且進入傳真直通模式時，DSP中可看到更改。

此輸出顯示在VG248上終止的傳真直通呼叫。當您選擇Diagnostics > Event log > Set logging levels時，將啟用DSP、普通舊式電話服務(POTS)和使用者線路介面卡(SLIC)的事件日誌跟蹤。

#Time Delta Source Message

---- -------------- ------------ ----------------------

269 01:13:13 5003 T DSP 1 Tx:0 Rx:0,Seq:0,Hdr:0,Late:0,Early:0

270 01:13:18 4997 T DSP 1 Tx:0 Rx:0,Seq:0,Hdr:0,Late:0,Early:0

271 01:13:23 5003 T DSP 1 Tx:0 Rx:0,Seq:0,Hdr:0,Late:0,Early:0

!--- DSP statistics.

272 01:13:24 1576 I POTS 1 Incoming call

273 01:13:24 7 T SLIC 1 received cli - standard case, CID 1

274 01:13:24 6 T SLIC 1 number is ''

275 01:13:24 6 T SLIC 1 number too short - sending rfa

276 01:13:24 6 T SLIC 1 name is 'Private'

277 01:13:25 1003 T SLIC 1 off-hook event; time=3049110

278 01:13:25 7 T SLIC 1 Reporting off-hook

!--- Port goes off-hook when the call is received.

279 01:13:25 6 I POTS 1 Off hook

280 01:13:25 8 I DSP 1 Setting up G.711 mu law voice channel

281 01:13:25 7 T SLIC 1 echo canceller enabled

!--- Default DSP settings are loaded.

282 01:13:25 6 T SLIC 1 modem detection disabled

283 01:13:25 17 T POTS 1 Setting codec to G.711 mu law

284 01:13:25 6 T DSP 1 tx:0044

285 01:13:25 7 T DSP 1 tx:004C,0001,003C,0004,00C8,0064

286 01:13:25 6 T DSP 1 tx:005C,0002,EA50,30E2,0000,0000,0080,0000,000D,0064,9873,0000

287 01:13:25 6 T DSP 1 tx:0049,0001,00A0,0000,0100,0000,0421,0003,0000

288 01:13:25 7 T DSP 1 tx:005B,0000,0000

289 01:13:25 6 T DSP 1 tx:0042,0005

290 01:13:25 27 T POTS 1 Setting codec to G.711 mu law

291 01:13:25 7 I POTS 1 Call 1 connected

!--- Call is connected.

292 01:13:25 7 T POTS 1 Setting codec to G.711 mu law

293 01:13:28 2192 T DSP 1 Modem answer tone detected

!--- CED tone is detected.

294 01:13:28 5 I DSP 1 Entering passthrough mode

!--- Fax/modem passthrough mode is entered.

295 01:13:28 6 T SLIC 1 echo canceller enabled

!--- ECAN remains enabled for normal G3 fax.

296 01:13:28 8 T SLIC 1 modem detection enabled

297 01:13:28 16 T DSP 1 rx:00C1,0005,0001,0000

298 01:13:28 6 T DSP 1 tx:0044

299 01:13:28 7 T DSP 1 tx:004C,0004,003C,0004,0096,0064

300 01:13:28 7 T DSP 1 tx:0049,0001,00A0,0000,0100,0000,0461,0003,0000

301 01:13:28 6 T DSP 1 tx:005B,0000,0000

302 01:13:28 6 T DSP 1 tx:0042,0015

303 01:13:28 7 T DSP 1 tx:0067,C000,0000

304 01:13:28 7 T POTS 1 Modem in use

305 01:13:28 9 T DSP 1 Tx:99 Rx:99,Seq:0,Hdr:0,Late:0,Early:0

306 01:13:28 20 T DSP 1 rx:00D0

307 01:13:28 178 T DSP 1 Modem answer tone detected

308 01:13:28 6 T DSP 1 rx:00C1,0005,0001,0000

309 01:13:31 2843 T DSP 1 rx:00C1,0005,0000,0000

310 01:13:31 388 T DSP 1 V.21 fax tones detected

!--- V.21 fax tones are detected by DSP.

311 01:13:31 6 T SLIC 1 echo canceller enabled

312 01:13:31 6 T SLIC 1 modem detection enabled

313 01:13:31 18 T DSP 1 rx:00C1,0000,0001,0000

314 01:13:31 7 T DSP 1 tx:0067,C000,0000

315 01:13:31 44 T DSP 1 rx:00D0

316 01:13:31 39 T DSP 1 rx:00C1,0000,0000,0000

317 01:13:32 279 T DSP 1 V.21 fax tones detected

318 01:13:32 6 T SLIC 1 echo canceller enabled

319 01:13:32 7 T SLIC 1 modem detection enabled

320 01:13:32 17 T DSP 1 rx:00C1,0000,0001,0000

321 01:13:32 91 T DSP 1 rx:00C1,0000,0000,0000

322 01:13:33 1029 T DSP 1 Tx:250 Rx:247,Seq:0,Hdr:0,Late:0,Early:0

323 01:13:38 4998 T DSP 1 Tx:501 Rx:498,Seq:0,Hdr:0,Late:0,Early:0

324 01:13:39 1385 T DSP 1 Silence detected; duration=250ms

325 01:13:39 5 T DSP 1 rx:00C1,0006,0001,00FA

326 01:13:40 416 T DSP 1 V.21 fax tones detected

327 01:13:40 5 T SLIC 1 echo canceller enabled

328 01:13:40 7 T SLIC 1 modem detection enabled

329 01:13:40 17 T DSP 1 rx:00C1,0000,0001,0000

330 01:13:40 90 T DSP 1 rx:00C1,0000,0000,0000

331 01:13:40 260 T DSP 1 V.21 fax tones detected

332 01:13:40 6 T SLIC 1 echo canceller enabled

333 01:13:40 7 T SLIC 1 modem detection enabled

334 01:13:40 18 T DSP 1 rx:00C1,0000,0001,0000

335 01:13:40 49 T DSP 1 rx:00C1,0000,0000,0000

336 01:13:40 259 T DSP 1 V.21 fax tones detected

337 01:13:40 6 T SLIC 1 echo canceller enabled

338 01:13:40 7 T SLIC 1 modem detection enabled

339 01:13:40 17 T DSP 1 rx:00C1,0000,0001,0000

340 01:13:40 91 T DSP 1 rx:00C1,0000,0000,0000

341 01:13:43 2358 T DSP 1 Tx:751 Rx:748,Seq:0,Hdr:0,Late:0,Early:0

342 01:13:48 4996 T DSP 1 Tx:1001 Rx:998,Seq:0,Hdr:0,Late:0,Early:0

343 01:13:53 5004 T DSP 1 Tx:1251 Rx:1248,Seq:0,Hdr:0,Late:0,Early:0

344 01:13:58 4998 T DSP 1 Tx:1502 Rx:1498,Seq:0,Hdr:0,Late:0,Early:0

345 01:14:03 5001 T DSP 1 Tx:1752 Rx:1749,Seq:0,Hdr:0,Late:0,Early:0

346 01:14:08 4998 T DSP 1 Tx:2002 Rx:1999,Seq:0,Hdr:0,Late:0,Early:0

347 01:14:13 5003 T DSP 1 Tx:2252 Rx:2249,Seq:0,Hdr:0,Late:0,Early:0

348 01:14:18 4996 T DSP 1 Tx:2502 Rx:2499,Seq:0,Hdr:0,Late:0,Early:0

349 01:14:23 5004 T DSP 1 Tx:2753 Rx:2750,Seq:0,Hdr:0,Late:0,Early:0

350 01:14:28 4996 T DSP 1 Tx:3003 Rx:3000,Seq:0,Hdr:0,Late:0,Early:0

!--- Fax page is transmitted during this !--- time. Check DSP stats (late, early, and so forth) for errors.

351 01:14:29 1119 T DSP 1 V.21 fax tones detected

352 01:14:29 5 T SLIC 1 echo canceller enabled

353 01:14:29 7 T SLIC 1 modem detection enabled

354 01:14:29 17 T DSP 1 rx:00C1,0000,0001,0000

355 01:14:29 51 T DSP 1 rx:00C1,0000,0000,0000

356 01:14:29 259 T DSP 1 V.21 fax tones detected

357 01:14:29 6 T SLIC 1 echo canceller enabled

358 01:14:29 7 T SLIC 1 modem detection enabled

359 01:14:29 18 T DSP 1 rx:00C1,0000,0001,0000

360 01:14:29 49 T DSP 1 rx:00C1,0000,0000,0000

361 01:14:30 260 T DSP 1 V.21 fax tones detected

362 01:14:30 6 T SLIC 1 echo canceller enabled

363 01:14:30 6 T SLIC 1 modem detection enabled

364 01:14:30 18 T DSP 1 rx:00C1,0000,0001,0000

365 01:14:30 90 T DSP 1 rx:00C1,0000,0000,0000

366 01:14:32 2039 T SLIC 1 on-hook event; time=3115460

367 01:14:32 290 T DSP 1 Silence detected; duration=250ms

368 01:14:32 6 T DSP 1 rx:00C1,0006,0001,00FA

369 01:14:32 356 I POTS 1 Drop call 1

370 01:14:32 7 I DSP 1 Setting up G.711 mu law voice channel

371 01:14:32 7 T SLIC 1 echo canceller enabled

372 01:14:32 6 T SLIC 1 modem detection disabled

373 01:14:32 16 T DSP 1 tx:0044

374 01:14:32 7 T DSP 1 tx:004C,0001,003C,0004,00C8,0064

375 01:14:32 6 T DSP 1 tx:0049,0001,00A0,0000,0100,0000,0421,0003,0000

376 01:14:32 7 T DSP 1 tx:005B,0000,0000

377 01:14:32 6 T DSP 1 tx:0042,0005

378 01:14:33 331 T DSP 1 Tx:3233 Rx:3230,Seq:0,Hdr:0,Late:0,Early:0

379 01:14:33 94 T SLIC 1 line polarity is normal

380 01:14:33 7 T SLIC 1 Reporting on-hook

!--- Call disconnected - on-hook.

381 01:14:33 6 I POTS 1 On hook

382 01:14:38 4892 T DSP 1 Tx:3233 Rx:3230,Seq:0,Hdr:0,Late:0,Early:0

383 01:14:43 5003 T DSP 1 Tx:3233 Rx:3230,Seq:0,Hdr:0,Late:0,Early:0

384 01:14:48 4996 T DSP 1 Tx:3233 Rx:3230,Seq:0,Hdr:0,Late:0,Early:0

Dick Tracy故障排除實用程式可用於檢視6608上的傳真直通呼叫期間的DSP更改。Dick Tracy中用於排除6608上的傳真直通故障的適當設置是6 set mask 0x32b。此輸出顯示Dick Tracy如何查詢運行DSP負載D00403010051的傳真直通呼叫的始發端。這是本文檔前面所看到的傳真直通呼叫，但是從6608的始發網關的角度來看。

22:50:27.680 (DSP) CRCX -> Port<19>

22:50:27.680 (DSP6) Current PID(D): S<0xc1b7> E<0x9d52> Last PID(D): S<0x9d52> E<0x9d52>

Mode : RECVONLY

22:50:27.690 (DSP) RTP RxOpen -> Port<19> UDP Port<0x7066 (28774)>

22:50:27.690 (DSP) RTCP RxOpen -> Port<19> UDP Port<0x7067 (28775)>

22:50:27.690 (DSP) Voice Mode -> Port<19> Comp<G711_ULAW_PCM> agcEnable<0>

!--- The call is setup. The MGCPP CRCX is received, User Datagram Protocol (UDP) ports !--- are opened for RTP and RTP Control Protocol (RTCP), !--- and the call is initially set up for voice with g711ulaw.

22:50:27.690 (DSP6) Current PID(D): S<0xc1ba> E<0xc1b9> Last PID(D): S<0xc1b9> E<0xc1b9>

22:50:27.690 (DSP6) Current PID(D): S<0xc1bc> E<0xc1bb> Last PID(D): S<0xc1bb> E<0xc1bb>

22:50:27.690 (DSP6) This port<19> is used for FAX calls

22:50:27.690 (DSP6) This port<19> is used for VOICE calls

!--- This 6608 port is only enabled for voice and fax calls !--- from the Cisco CallManager Admin gateway configuration page. !--- MODEM also appears here if enabled.

22:50:27.690 (DSP) RQNT -> Port<19> From<GMSG>

Enabling Digit Detection

Generating CP Tone<RINGBACK>

22:50:27.690 (DSP) Set DSP voice Mode Hold_state<2> previous state<1>

22:50:27.940 (DSP6) dspChangeChannelState<19>

22:50:27.940 (DSP6) This port<19> is used for VOICE calls

22:50:28.310 (DSP) DSP<6> Chan<3> voicePkts<0> CN<0> rxDur<620> OOS<0> Bad<0>

Late<0> Early<0>

22:50:29.310 (DSP) DSP<6> Chan<3> LevSt TxP<64743> TxM<0> RxP<64743> RxM<0>

NL<0> ACOM<0> ERL<256> ACT<2> RMNoise<32639>

22:50:30.310 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<1>consecutive loss<0>

RFC 2198 loss<0> time<0> max duration<0> min duration<0>

22:50:30.430 (DSP) RQNT -> Port<19> From<GMSG>

Enabling Digit Detection

Stopping Tones

22:50:30.450 (DSP) MDCX -> Port<19>

Enabling Digit Detection

Mode : SENDRECV

22:50:30.450 (DSP) RTP TxOpen -> Port<19> Remote IP<14.80.52.17> UDP Port<0x411A (16666)>

22:50:30.450 (DSP) RTCP TxOpen -> Port<19> Remote IP<14.80.52.17> UDP Port<0x411B (16667)>

!--- MGCP MDCX opens the audio path in both directions and !--- terminating gateway IP connection information is displayed.

22:50:32.310 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<44> Lo<44>Hi<45>

22:50:33.310 (DSP) DSP<6> Chan<3> VPOESt PR<0> Sil<0>Ret<0> Ov<0> TSE<0>

22:50:34.320 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<272>Tx<195> drTx<0> drRx<0>

22:50:35.320 (DSP) DSP<6> Chan<3> voicePkts<381> CN<0> Dur<7630>, vTxDur<7630> faxTxDur<0>

22:50:36.320 (DSP) DSP<6> Chan<3> voicePkts<292> CN<0> rxDur<5850> OOS<0> Bad<0>

Late<0> Early<0>

22:50:37.320 (DSP) DSP<6> Chan<3> LevSt TxP<64791> TxM<0> RxP<64743> RxM<0> NL<0>

ACOM<0> ERL<256> ACT<2> RMNoise<65535>

22:50:38.320 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive

loss<0> RFC 2198 loss<0> time<0> max duration<0> min duration<0>

22:50:40.100 (DSP) Report P2P Msg -> Port<19> Event<192>

Duration<0> Volume<0>

22:50:40.100 (DSP) Fax Pass-thru Mode -> Port<19>

22:50:40.100 (DSP6) Current PID(D): S<0xc3ae> E<0xc387> Last PID(D): S<0xc387> E<0xc387>

22:50:40.100 (DSP6) Current PID(D): S<0xc3b1> E<0xc3b0> Last PID(D): S<0xc3b0> E<0xc3b0>

22:50:40.100 (DSP6) Current PID(D): S<0xc3b3> E<0xc3b2> Last PID(D): S<0xc3b2> E<0xc3b2>

22:50:40.100 (DSP6) Port<19> P2P<192> <NONE> ->

!--- The messages highlighted here are the most important in !--- a fax passthrough transmission. These are the NSEs that are !--- received by the 6608 from the terminating gateway.

22:50:40.320 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:50:41.320 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:50:42.320 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<288>Tx<203> drTx<0> drRx<0>

22:50:43.110 (DSP) Report P2P Msg -> Port<19> Event<192>

Duration<0> Volume<0>

22:50:43.110 (DSP6) Port<19> P2P<192>

->

!--- For some reason, the terminating gateway sent another !--- set of NSE-192 packets and that is why more NSE-192 !--- messages are seen.

22:50:43.320 (DSP) DSP<6> Chan<3> voicePkts<161> CN<0> Dur<3220>, vTxDur<3220>

faxTxDur<0>

22:50:44.320 (DSP) DSP<6> Chan<3> voicePkts<696> CN<0> rxDur<13860> OOS<0> Bad<0>

Late<0> Early<1>

22:50:45.320 (DSP) DSP<6> Chan<3> LevSt TxP<64791> TxM<0> RxP<65386>

RxM<0> NL<0> ACOM<90> ERL<271> ACT<2> RMNoise<65535>

22:50:45.520 (DSP6) Port<19> Tone<0>

->

22:50:45.520 (DSP) DSP<6> Port<19> Fax Tone Detected

!--- This should be notification that fax V.21 tones are seen.

22:50:46.320 (DSP6) Current PID(D): S<0xc4f9> E<0xc4d0> Last PID(D): S<0xc4d0> E<0xc4d0>

22:50:46.320 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<6> max duration<0> min duration<0>

22:50:48.320 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:50:49.320 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:50:50.320 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<297>Tx<212> drTx<0> drRx<0>

22:50:51.320 (DSP) DSP<6> Chan<3> voicePkts<561> CN<0> Dur<11230>, vTxDur<11230>

faxTxDur<0>

22:50:52.330 (DSP) DSP<6> Chan<3> voicePkts<1097> CN<0> rxDur<21870> OOS<0>

Bad<0> Late<0> Early<1>

22:50:53.330 (DSP) DSP<6> Chan<3> LevSt TxP<64847> TxM<0> RxP<65387> RxM<0>

NL<0> ACOM<90> ERL<272> ACT<2> RMNoise<21678>

22:50:54.330 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<14> max duration<0> min duration<0>

!--- DSP statistics can be seen over the next minute as the page !--- is transmitted. Check to make sure that there are no errors.

22:50:56.330 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:50:57.330 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:50:58.330 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<305>Tx<219> drTx<0> drRx<0>

22:50:59.330 (DSP) DSP<6> Chan<3> voicePkts<961> CN<0> Dur<19230>, vTxDur<19230>

faxTxDur<0>

22:51:00.330 (DSP) DSP<6> Chan<3> voicePkts<1497> CN<0> rxDur<29880> OOS<0> Bad<0>

Late<0> Early<1>

22:51:01.330 (DSP) DSP<6> Chan<3> LevSt TxP<64827> TxM<0> RxP<65387> RxM<0> NL<0>

ACOM<0> ERL<272> ACT<2> RMNoise<48312>

22:51:02.330 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<22> max duration<0> min duration<0>

22:51:04.330 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:51:05.330 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:51:06.330 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<313>Tx<226> drTx<0> drRx<0>

22:51:07.330 (DSP) DSP<6> Chan<3> voicePkts<1362> CN<0> Dur<27240>, vTxDur<27240>

faxTxDur<0>

22:51:08.330 (DSP) DSP<6> Chan<3> voicePkts<1898> CN<0> rxDur<37880> OOS<0> Bad<0>

Late<0> Early<1>

22:51:09.330 (DSP) DSP<6> Chan<3> LevSt TxP<64803> TxM<0> RxP<65381> RxM<0> NL<0>

ACOM<90> ERL<272> ACT<2> RMNoise<52280>

22:51:10.340 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<30> max duration<0> min duration<0>

22:51:12.340 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:51:13.340 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:51:14.340 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<321>Tx<233> drTx<0> drRx<0>

22:51:15.340 (DSP) DSP<6> Chan<3> voicePkts<1762> CN<0> Dur<35250>, vTxDur<35250>

faxTxDur<0>

22:51:16.340 (DSP) DSP<6> Chan<3> voicePkts<2298> CN<0> rxDur<45890> OOS<0> Bad<0>

Late<0> Early<1>

22:51:17.340 (DSP) DSP<6> Chan<3> LevSt TxP<64833> TxM<0> RxP<65391> RxM<0> NL<0>

ACOM<0> ERL<272> ACT<2> RMNoise<22856>

22:51:18.340 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<38> max duration<0> min duration<0>

22:51:20.340 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:51:21.340 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:51:22.340 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<329>Tx<240> drTx<0> drRx<0>

22:51:23.340 (DSP) DSP<6> Chan<3> voicePkts<2163> CN<0> Dur<43260>, vTxDur<43260>

faxTxDur<0>

22:51:24.340 (DSP) DSP<6> Chan<3> voicePkts<2698> CN<0> rxDur<53900> OOS<0> Bad<0>

Late<0> Early<1>

22:51:25.340 (DSP) DSP<6> Chan<3> LevSt TxP<64812> TxM<0> RxP<65381> RxM<0> NL<0>

ACOM<90> ERL<272> ACT<2> RMNoise<11873>

22:51:26.340 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<46> max duration<0> min duration<0>

22:51:28.350 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:51:29.350 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:51:30.350 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<337>Tx<247> drTx<0> drRx<0>

22:51:31.350 (DSP) DSP<6> Chan<3> voicePkts<2563> CN<0> Dur<51270>, vTxDur<51270>

faxTxDur<0>

22:51:32.350 (DSP) DSP<6> Chan<3> voicePkts<3099> CN<0> rxDur<61910> OOS<0> Bad<0>

Late<0> Early<1>

22:51:33.350 (DSP) DSP<6> Chan<3> LevSt TxP<64827> TxM<0> RxP<65391> RxM<0> NL<0>

ACOM<0> ERL<272> ACT<2> RMNoise<51013>

22:51:34.350 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<54> max duration<0> min duration<0>

22:51:36.350 (DSP) DSP<6> Chan<3> VPODSt Clk<0> Del<25> Lo<25>Hi<25>

22:51:37.350 (DSP) DSP<6> Chan<3> VPOESt PR<30> Sil<0>Ret<0> Ov<10> TSE<0>

22:51:38.350 (DSP) DSP<6> Chan<3> ErrSt drRxH<0> drTxOV<0> Rx<345>Tx<254> drTx<0> drRx<0>

22:51:39.350 (DSP) DSP<6> Chan<3> voicePkts<2963> CN<0> Dur<59270>, vTxDur<59270>

faxTxDur<0>

22:51:40.350 (DSP) DSP<6> Chan<3> voicePkts<3499> CN<0> rxDur<69920> OOS<0> Bad<0>

Late<0> Early<1>

22:51:41.350 (DSP) DSP<6> Chan<3> LevSt TxP<65096> TxM<0> RxP<64842> RxM<0> NL<0>

ACOM<64436> ERL<272> ACT<2> RMNoise<62835>

22:51:42.350 (DSP) DSP<6> Chan<3> fill<0> drain<0> overall loss<0>consecutive loss<0>

RFC 2198 loss<0> time<62> max duration<0> min duration<0>

22:51:43.120 (DSP) DSP<6> Port<19> Silence Detected

22:51:43.770 (DSP) MDCX -> Port<19>

Enabling Digit Detection

Mode : RECVONLY

22:51:43.770 (DSP) Set DSP Idle<HOLD>, hold_state<1> previous state<2>

22:51:43.770 (DSP) RTP TxClose -> Port<19>

22:51:43.800 (DSP) DLCX -> Port<19> From<GMSG >

22:51:43.800 (DSP) RTP RxClose -> Port<19>

22:51:43.800 Pkts Rcvd<3671> Pkts Lost<0> Total Pkts Lost<0>

22:51:43.800 Underrun<0> Overrun<0>

22:51:43.800 (DSP6) Current PID(D): S<0xd06e> E<0xd058> Last PID(D): S<0xd058> E<0xd058>

!--- MGCP DLCX tears down the call and there are !--- no lost packets recorded.

傳真中繼

傳真中繼與傳真傳輸的不同之處在於DSP解碼來自傳真機的傳真信令，然後使用傳真中繼協定將資訊傳輸到另一個傳真網關。DSP在與各端傳真機通訊時扮演主動角色。它可以被視為與直接連線的傳真網關進行傳真會話的每個傳真機。然後，網關通過傳真中繼協定通訊。

思科傳真中繼是傳真中繼期間網關之間使用的專有協定。

通過VoX網路的傳真中繼呼叫

傳真中繼配置

在VG248和6608中配置傳真中繼非常簡單。這也是兩台裝置的預設操作。如果預設值未更改，則沒有可配置的內容。在VG248上，確保配置此選項：

- 選擇Configure > Telephony > Port specific parameters > <select port> > Fax relay > enabled。

此選單下是傳真中繼選項傳真中繼糾錯模式(ECM)和傳真中繼NSF。可以使用這些選項來禁止傳真呼叫的ECM，或操縱NSF值。如需這些引數的詳細資訊，請參閱本檔案的傳真中繼疑難排解一節。

配置Configure > Telephony > Advanced settings時，可在VG248上配置其他傳真中繼選項：

- 傳真中繼負載大小允許使用者調整每個資料包中傳輸的位元組數。預設值為20位元組，最多可輸入48位元組的值。

- 傳真中繼最大速度允許將傳真中繼事務限制在一定速度，從而佔用較少的頻寬。

- 傳真中繼播放延遲可用於調整傳真中繼抖動緩衝區。

在6608上，確保在Cisco CallManager的6608網關配置視窗中選中了傳真中繼框。

啟用傳真中繼後，還有其他可用選項。配置傳真直通時，這些選項不可用。但是，從技術角度而言，您可以斷定選項是可用的，因為無論是否啟用傳真中繼，都可以配置這些選項。只有在啟用傳真中繼時，它們才會產生影響。以下是啟用傳真中繼時6608上提供的其他選項：

- 傳真糾錯模式覆蓋允許6608禁用ECM，即使傳真裝置能夠進行ECM傳輸。

- 最大傳真速率允許控制最大連線速率。此選項可用於將傳真呼叫限製為特定頻寬。

- 傳真負載大小允許控制傳真封包中放置的傳真樣本數量。

- 非標準設施國家/地區代碼允許覆蓋NSF國家/地區欄位，以防止專有編碼。

- 非標準設施供應商代碼允許覆蓋NSF供應商欄位以防止專有編碼。

- V.21標誌序列檢測計數允許配置切換到傳真中繼所需的標誌數量。

大多數傳真中繼設定都可以保留為預設值，除非需要更改以解決特定問題或頻寬問題。

傳真中繼故障排除

排除傳真中繼故障時，請檢查以下專案。請注意，傳真中繼的許多初始故障排除步驟與傳真直通相同。在大多數情況下，導致一個失敗的問題也會導致另一個失敗。

1. 確認兩個網關上均啟用了傳真中繼。

在6608上，確保在Cisco CallManager網關配置視窗上的傳真中繼旁選中該框。在VG248上，確保在Telephony設定下的埠特定引數上啟用它。此外，請確保語音呼叫通過相同的埠工作，並且傳真裝置可以通過PSTN成功工作。此外，請嘗試傳真傳輸，看看是否有效。

2. 檢查6608是否存在任何錯誤。這與之前傳真傳輸中的步驟相同。

3. 檢查ECM設定。

當傳真裝置同意使用ECM時，它們往往不能容忍任何延遲、抖動或丟包。當傳真連線但無法成功完成傳輸時，請在傳真機本身或網關上禁用ECM。在6608上，當您在VG248上選中ECM Override選項時可以完成此操作。當您訪問Telephony配置選單下的埠特定引數時，可以禁用ECM。

4. 檢查NSF設定。

某些傳真機如果識別來自另一個傳真裝置的相容NSF引數，則嘗試使用專有編碼和消息。這會中斷傳真中繼，後者根據T.30標準對傳真消息進行解碼。如果使用專有消息傳送，則思科傳真中繼不知道如何解碼這些訊號。此問題的主要症狀是傳真機最初連線，但在傳送任何頁面之前放棄呼叫。NSF問題不會經常發生。通過傳真或將NSF更改為偽造ID可以輕鬆解決任何NSF問題。在6608上，初始NSF國家/地區和供應商代碼設定為65535。如果將這些代碼更改為0，則會阻止將連線的傳真裝置標識為支援任何專有消息傳送的裝置。對於VG248，配置Telephony埠特定引數以將傳真NSF設定為000000時也可以執行相同操作。

5. 在VG248上，有一個選項可以編輯傳真中繼播放緩衝區。與預設的300 ms相比，這一點極少發生。但是，在存在高抖動或延遲的情況下，它可能會有用。

它位於「配置」選單的「高級」設定下。必須注意的是，6608傳真/數據機抖動緩衝區固定為300毫秒，似乎沒有更改該值的方法。6608 Gateway Configuration頁上的Playout Delay Parameters僅適用於語音呼叫。

調試思科傳真中繼

與傳真傳輸一樣，6608和VG248轉換到傳真中繼模式時會發出信令通知。使用直通時，主要消息是NSE-192的傳送。思科傳真中繼也會出現此消息，其中也交換PT-96和PT-97消息型別。NSE-192使用RTP負載型別100傳送，事件型別為192。使用思科傳真中繼，在聽到2100 Hz ANS/CED音調時，RTP PT-100中的NSE-192事件仍然會發生。但是，當檢測到由V.21調製的傳真HDLC標誌時，思科傳真中繼轉換會使用RTP負載型別96和97（如圖所示）。

傳真中繼調試正在發生的基本T.30傳真消息的輸出。在此圖中，顯示了簡單的1頁非ECM傳真的T.30基本消息傳送。有其他T.30訊息，但這應能提供訊息流程和傳真中繼偵錯中可預期的資訊。對於其他T.30消息，請參考T.30規範。

G3傳真消息，用於簡單的一頁傳真

當您檢視傳真中繼偵錯時，了解消息方向很有用。此圖根據T.30訊息之前是fr-msg-det 還是fr-msg-tx來說明訊息方向。

用於調試傳真中繼t30 all的DSP消息方向

在VG248上，可將事件日誌中的記錄級別設定為收集指定埠的傳真中繼。此輸出是VG248埠13上終止傳真呼叫的傳真中繼事件日誌跟蹤。啟用的唯一跟蹤是FaxRelay。

#Time Delta Source Message

---- -------------- ------------ ----------------------

0 23:08:25 0 I OS Event log cleared

1 23:09:09 44s I POTS 13 Incoming call

2 23:09:12 2515 I POTS 13 Off hook

!--- Incoming call received on POTS port 13.

3 23:09:12 16 I DSP 13 Setting up G.711 mu law voice channel

4 23:09:12 50 I POTS 13 Call 1 connected

!--- Call connected using g711ulaw.

5 23:09:22 9850 I DSP 13 Entering passthrough mode

!--- Passthrough mode started, NSE-192 sent, CED detected.

6 23:09:25 3118 I DSP 13 Entering Cisco fax relay mode

!--- Fax relay negotiation started, PT-96 & PT-97.

7 23:09:25 41 T FaxRelay13 2591101559 0 80 0 2 1277 0 0 0

8 23:09:25 14 T FaxRelay13 2591101559 0 49 0 2 1277 0 0 0

9 23:09:25 15 T FaxRelay13 2591101559 0 40 0 2 1277 1 0 0

10 23:09:25 13 T FaxRelay13 2591101559 0 1 0 2 1277 A 0 0

11 23:09:25 14 I FaxRelay13 2591101559 fr-entered (10 ms)

!--- Fax relay transition complete.

12 23:09:25 14 T FaxRelay13 2591101560 0 C2 0 2 1278 2 0 0

13 23:09:25 13 T FaxRelay13 2591101560 0 C3 0 2 1278 0 0 0

14 23:09:25 15 T FaxRelay13 2591101560 0 C1 0 2 1278 2 0 0

15 23:09:25 94 T FaxRelay13 2591101751 0 C7 0 2 1337 2 0 0

16 23:09:25 16 T FaxRelay13 2591101760 0 83 0 2 1340 3 0 0

17 23:09:25 14 T FaxRelay13 2591101760 0 49 0 2 1340 3 0 0

18 23:09:26 587 T FaxRelay13 2591102370 0 8B 0 2 15A2 FF 0 0

19 23:09:26 13 T FaxRelay13 2591102370 0 4B 0 2 15A2 21 0 0

20 23:09:26 36 T FaxRelay13 2591102420 0 8C 0 2 15D4 2 0 0

21 23:09:26 13 I FaxRelay13 2591102420 fr-msg-det CSI

!--- Called Subscriber Identification (CSI) received on local POTS.

22 23:09:26 527 T FaxRelay13 2591102960 0 49 0 2 17F0 6 0 0

23 23:09:27 210 T FaxRelay13 2591103170 0 8B 0 2 18C2 FF 0 0

24 23:09:27 30 T FaxRelay13 2591103200 0 90 0 2 18E0 0 0 0

25 23:09:27 20 T FaxRelay13 2591103220 0 8C 0 2 18F4 1 0 0

26 23:09:27 14 I FaxRelay13 2591103220 fr-msg-det DIS

!--- Digital Identification Signal (DIS) received on local POTS port.

27 23:09:27 225 T FaxRelay13 2591103460 0 49 0 2 19E4 6 0 0

28 23:09:27 122 T FaxRelay13 2591103580 0 C4 0 2 1A5C 2 0 0

29 23:09:27 13 T FaxRelay13 2591103580 0 C2 0 2 1A5C 2 0 0

30 23:09:27 15 T FaxRelay13 2591103580 0 C3 0 2 1A5C 0 0 0

31 23:09:27 14 T FaxRelay13 2591103590 0 49 0 2 1A66 0 0 0

32 23:09:27 14 T FaxRelay13 2591103590 0 83 0 2 1A66 1 0 0

33 23:09:27 13 T FaxRelay13 2591103590 0 C2 0 2 1A66 2 0 0

34 23:09:27 14 T FaxRelay13 2591103590 0 C3 0 2 1A66 0 0 0

35 23:09:28 885 T FaxRelay13 2591104550 0 47 0 2 1E26 1 0 0

36 23:09:28 289 T FaxRelay13 2591104840 0 83 0 2 1F48 6 0 0

37 23:09:28 14 T FaxRelay13 2591104840 0 C2 0 2 1F48 4 0 0

38 23:09:28 14 T FaxRelay13 2591104840 0 C3 0 2 1F48 0 0 0

39 23:09:28 13 T FaxRelay13 2591104840 0 C1 0 2 1F48 3 0 0

40 23:09:28 39 T FaxRelay13 2591104920 0 C9 0 2 1F98 352 0 0

41 23:09:29 589 T FaxRelay13 2591105510 0 47 0 2 21E6 2 0 0

42 23:09:29 14 T FaxRelay13 2591105510 0 48 0 2 21E6 1 0 0

43 23:09:29 276 T FaxRelay13 2591105800 0 8B 0 2 2308 FF 0 0

44 23:09:29 51 T FaxRelay13 2591105850 0 8C 0 2 233A 42 0 0

45 23:09:29 13 I FaxRelay13 2591105850 fr-msg-tx TSI

!--- Transmitting Subscriber Identification (TSI) sent out local POTS.

46 23:09:29 13 T FaxRelay13 2591105850 0 D0 0 2 233A 23 0 0

47 23:09:29 15 T FaxRelay13 2591105850 0 C1 0 2 233A 4 0 0

48 23:09:29 208 T FaxRelay13 2591106100 0 4D 0 2 2434 0 0 0

49 23:09:30 390 T FaxRelay13 2591106490 0 C1 0 2 25BA 3 0 0

50 23:09:30 109 T FaxRelay13 2591106600 0 8B 0 2 2628 FF 0 0

51 23:09:30 14 T FaxRelay13 2591106610 0 4D 0 2 2632 0 0 0

52 23:09:30 14 T FaxRelay13 2591106620 0 90 0 2 263C 0 0 0

53 23:09:30 22 T FaxRelay13 2591106650 0 8C 0 2 265A 41 0 0

54 23:09:30 14 I FaxRelay13 2591106650 fr-msg-tx DCS

!--- Digital Command Signal (DCS) transmitted out local POTS.

55 23:09:30 13 T FaxRelay13 2591106650 0 D0 0 2 265A 5 0 0

56 23:09:30 15 T FaxRelay13 2591106650 0 C1 0 2 265A 4 0 0

57 23:09:30 27 T FaxRelay13 2591106720 0 47 0 2 26A0 0 0 0

58 23:09:30 14 T FaxRelay13 2591106720 0 48 0 2 26A0 0 0 0

59 23:09:30 87 T FaxRelay13 2591106820 0 47 0 2 2704 3 0 0

60 23:09:30 70 T FaxRelay13 2591106890 0 8E 0 2 274A 9 0 0

61 23:09:30 110 T FaxRelay13 2591107000 0 C1 0 2 27B8 3 0 0

62 23:09:30 19 T FaxRelay13 2591107020 0 83 0 2 27CC 1 0 0

63 23:09:30 41 T FaxRelay13 2591107060 0 83 0 2 27F4 8 0 0

64 23:09:31 70 T FaxRelay13 2591107130 0 C2 0 2 283A 0 0 0

65 23:09:31 14 T FaxRelay13 2591107130 0 C3 0 2 283A 0 0 0

66 23:09:31 14 T FaxRelay13 2591107130 0 C1 0 2 283A 0 0 0

67 23:09:31 14 T FaxRelay13 2591107140 0 C9 0 2 2844 3C 0 0

68 23:09:31 29 T FaxRelay13 2591107200 0 C2 0 2 2880 1 0 0

69 23:09:31 13 T FaxRelay13 2591107200 0 C3 0 2 2880 C 0 0

70 23:09:31 14 T FaxRelay13 2591107200 0 C1 0 2 2880 1 0 0

71 23:09:31 14 T FaxRelay13 2591107211 0 C2 0 2 288B 3 0 0

72 23:09:31 14 T FaxRelay13 2591107211 0 C3 0 2 288B C 0 0

73 23:09:31 14 T FaxRelay13 2591107211 0 C1 0 2 288B 5 0 0

74 23:09:32 1118 T FaxRelay13 2591108390 0 47 0 2 2D26 4 0 0

75 23:09:32 15 T FaxRelay13 2591108390 0 48 0 2 2D26 2 0 0

76 23:09:32 265 T FaxRelay13 2591108670 0 8A 0 2 2E3E 0 0 0

!--- High speed training takes place but this debug !--- only decodes low speed messaging.

77 23:09:32 180 T FaxRelay13 2591108850 0 D0 0 2 2EF2 A 0 0

78 23:09:32 14 T FaxRelay13 2591108850 0 C1 0 2 2EF2 6 0 0

79 23:09:33 1075 T FaxRelay13 2591109940 0 47 0 2 3334 0 0 0

80 23:09:33 13 T FaxRelay13 2591109940 0 48 0 2 3334 0 0 0

81 23:09:34 267 T FaxRelay13 2591110220 0 83 0 2 344C 1 0 0

82 23:09:34 180 T FaxRelay13 2591110400 0 C1 0 2 3500 7 0 0

83 23:09:34 20 T FaxRelay13 2591110420 0 C2 0 2 3514 0 0 0

84 23:09:34 14 T FaxRelay13 2591110420 0 C3 0 2 3514 0 0 0

85 23:09:34 15 T FaxRelay13 2591110420 0 C1 0 2 3514 0 0 0

86 23:09:34 13 T FaxRelay13 2591110430 0 C2 0 2 351E 1 0 0

87 23:09:34 14 T FaxRelay13 2591110430 0 C3 0 2 351E 8 0 0

88 23:09:34 14 T FaxRelay13 2591110430 0 C1 0 2 351E 1 0 0

89 23:09:34 292 T FaxRelay13 2591110781 0 C7 0 2 367D 1 0 0

90 23:09:34 14 T FaxRelay13 2591110790 0 83 0 2 3686 3 0 0

91 23:09:34 14 T FaxRelay13 2591110790 0 49 0 2 3686 3 0 0

92 23:09:34 14 T FaxRelay13 2591110791 0 C2 0 2 3687 2 0 0

93 23:09:34 15 T FaxRelay13 2591110791 0 C3 0 2 3687 0 0 0

94 23:09:34 13 T FaxRelay13 2591110791 0 C1 0 2 3687 2 0 0

95 23:09:34 118 T FaxRelay13 2591110971 0 C7 0 2 373A 2 0 0

96 23:09:34 14 T FaxRelay13 2591110980 0 85 0 2 3744 0 0 0

97 23:09:35 685 T FaxRelay13 2591111670 0 8B 0 2 39F6 FF 0 0

98 23:09:35 14 T FaxRelay13 2591111670 0 4B 0 2 39F6 21 0 0

99 23:09:35 14 T FaxRelay13 2591111700 0 90 0 2 3A14 0 0 0

100 23:09:35 32 T FaxRelay13 2591111730 0 8C 0 2 3A32 21 0 0

101 23:09:35 14 I FaxRelay13 2591111730 fr-msg-det CFR

!--- Confirmation to Receive (CFR) message received on local POTS.

102 23:09:35 13 T FaxRelay13 2591111730 0 49 0 2 3A32 6 0 0

103 23:09:35 92 T FaxRelay13 2591111850 0 C4 0 2 3AAA 2 0 0

104 23:09:35 14 T FaxRelay13 2591111860 0 49 0 2 3AB4 0 0 0

105 23:09:35 14 T FaxRelay13 2591111860 0 83 0 2 3AB4 1 0 0

106 23:09:35 14 T FaxRelay13 2591111860 0 C2 0 2 3AB4 1 0 0

107 23:09:35 14 T FaxRelay13 2591111860 0 C3 0 2 3AB4 8 0 0

108 23:09:35 14 T FaxRelay13 2591111860 0 C1 0 2 3AB4 1 0 0

109 23:09:36 779 T FaxRelay13 2591112700 0 47 0 2 3DFC 3 0 0

110 23:09:36 290 T FaxRelay13 2591112990 0 83 0 2 3F1E 7 0 0

111 23:09:36 14 T FaxRelay13 2591112991 0 C2 0 2 3F1F 3 0 0

112 23:09:36 15 T FaxRelay13 2591112991 0 C3 0 2 3F1F 8 0 0

113 23:09:36 14 T FaxRelay13 2591112991 0 C1 0 2 3F1F 5 0 0

114 23:09:36 14 T FaxRelay13 2591113010 0 47 0 2 3F32 4 0 0

115 23:09:36 14 T FaxRelay13 2591113010 0 48 0 2 3F32 2 0 0

116 23:09:37 289 T FaxRelay13 2591113350 0 8A 0 2 4086 0 0 0

117 23:09:37 21 T FaxRelay13 2591113370 0 D0 0 2 409A B 0 0

118 23:09:37 13 T FaxRelay13 2591113371 0 C1 0 2 409B 6 0 0

119 23:10:22 45s T FaxRelay13 2591158870 0 47 0 2 F256 0 0 0

120 23:10:22 14 T FaxRelay13 2591158870 0 48 0 2 F256 0 0 0

121 23:10:23 247 T FaxRelay13 2591159130 0 47 0 2 F35A 1 0 0

122 23:10:23 59 T FaxRelay13 2591159190 0 CF 0 2 F396 4236 0 0

123 23:10:23 14 T FaxRelay13 2591159200 0 CF 0 2 F3A0 4236 0 0

124 23:10:23 15 T FaxRelay13 2591159210 0 CF 0 2 F3AA 4236 0 0

!--- Fax page is sent using high speed negotiated modulation.

125 23:10:23 14 T FaxRelay13 2591159220 0 83 0 2 F3B4 1 0 0

126 23:10:23 14 T FaxRelay13 2591159220 0 D1 0 2 F3B4 4236 0 0

127 23:10:23 14 T FaxRelay13 2591159220 0 C1 0 2 F3B4 7 0 0

128 23:10:23 14 T FaxRelay13 2591159240 0 C2 0 2 F3C8 0 0 0

129 23:10:23 14 T FaxRelay13 2591159240 0 C3 0 2 F3C8 0 0 0

130 23:10:23 14 T FaxRelay13 2591159240 0 C1 0 2 F3C8 0 0 0

131 23:10:23 14 T FaxRelay13 2591159250 0 C9 0 2 F3D2 3C 0 0

132 23:10:23 15 T FaxRelay13 2591159280 0 83 0 2 F3F0 6 0 0

133 23:10:23 13 T FaxRelay13 2591159310 0 C2 0 2 F40E 1 0 0

134 23:10:23 14 T FaxRelay13 2591159310 0 C3 0 2 F40E 8 0 0

135 23:10:23 14 T FaxRelay13 2591159310 0 C1 0 2 F40E 1 0 0

136 23:10:23 13 T FaxRelay13 2591159321 0 C2 0 2 F419 4 0 0

137 23:10:23 14 T FaxRelay13 2591159321 0 C3 0 2 F419 0 0 0

138 23:10:23 14 T FaxRelay13 2591159321 0 C1 0 2 F419 3 0 0

139 23:10:23 15 T FaxRelay13 2591159400 0 C9 0 2 F468 352 0 0

140 23:10:23 630 T FaxRelay13 2591160060 0 47 0 2 F6FC 2 0 0

141 23:10:23 14 T FaxRelay13 2591160060 0 48 0 2 F6FC 1 0 0

142 23:10:23 46 T FaxRelay13 2591160120 0 4D 0 2 F738 0 0 0

143 23:10:24 120 T FaxRelay13 2591160240 0 47 0 2 F7B0 0 0 0

144 23:10:24 13 T FaxRelay13 2591160240 0 48 0 2 F7B0 0 0 0

145 23:10:24 156 T FaxRelay13 2591160410 0 8B 0 2 F85A FF 0 0

146 23:10:24 29 T FaxRelay13 2591160440 0 90 0 2 F878 0 0 0

147 23:10:24 20 T FaxRelay13 2591160460 0 8C 0 2 F88C 74 0 0

148 23:10:24 15 I FaxRelay13 2591160460 fr-msg-tx EOP

!--- End Of Procedure (EOP) transmitted out of local POTS.

149 23:10:24 13 T FaxRelay13 2591160470 0 D0 0 2 F896 28 0 0

150 23:10:24 14 T FaxRelay13 2591160470 0 C1 0 2 F896 4 0 0

151 23:10:24 70 T FaxRelay13 2591160570 0 C1 0 2 F8FA 3 0 0

152 23:10:24 19 T FaxRelay13 2591160590 0 83 0 2 F90E 1 0 0

153 23:10:24 120 T FaxRelay13 2591160710 0 C2 0 2 F986 0 0 0

154 23:10:24 14 T FaxRelay13 2591160710 0 C3 0 2 F986 0 0 0

155 23:10:24 14 T FaxRelay13 2591160710 0 C1 0 2 F986 0 0 0

156 23:10:24 14 T FaxRelay13 2591160720 0 C9 0 2 F990 3C 0 0

157 23:10:24 28 T FaxRelay13 2591160780 0 C2 0 2 F9CC 1 0 0

158 23:10:24 14 T FaxRelay13 2591160780 0 C3 0 2 F9CC 8 0 0

159 23:10:24 14 T FaxRelay13 2591160780 0 C1 0 2 F9CC 1 0 0

160 23:10:24 242 T FaxRelay13 2591161051 0 C7 0 2 FADB 1 0 0

161 23:10:24 14 T FaxRelay13 2591161060 0 83 0 2 FAE4 3 0 0

162 23:10:24 14 T FaxRelay13 2591161060 0 49 0 2 FAE4 3 0 0

163 23:10:24 14 T FaxRelay13 2591161061 0 C2 0 2 FAE5 2 0 0

164 23:10:24 14 T FaxRelay13 2591161061 0 C3 0 2 FAE5 0 0 0

165 23:10:24 14 T FaxRelay13 2591161061 0 C1 0 2 FAE5 2 0 0

166 23:10:25 110 T FaxRelay13 2591161231 0 C7 0 2 FB8E 2 0 0

167 23:10:25 14 T FaxRelay13 2591161240 0 85 0 2 FB98 0 0 0

168 23:10:25 715 T FaxRelay13 2591161960 0 8B 0 2 FE68 FF 0 0

169 23:10:25 14 T FaxRelay13 2591161960 0 4B 0 2 FE68 21 0 0

170 23:10:25 16 T FaxRelay13 2591161990 0 90 0 2 FE86 0 0 0

171 23:10:25 20 T FaxRelay13 2591162010 0 8C 0 2 FE9A 31 0 0

172 23:10:25 14 I FaxRelay13 2591162010 fr-msg-det MCF

!--- Message Confirmation (MCF) received on local POTS port.

173 23:10:25 14 T FaxRelay13 2591162010 0 49 0 2 FE9A 6 0 0

174 23:10:26 92 T FaxRelay13 2591162130 0 C4 0 2 FF12 2 0 0

175 23:10:26 14 T FaxRelay13 2591162140 0 49 0 2 FF1C 0 0 0

176 23:10:26 14 T FaxRelay13 2591162140 0 83 0 2 FF1C 1 0 0

177 23:10:26 14 T FaxRelay13 2591162140 0 C2 0 2 FF1C 1 0 0

178 23:10:26 14 T FaxRelay13 2591162140 0 C3 0 2 FF1C 8 0 0

179 23:10:26 14 T FaxRelay13 2591162140 0 C1 0 2 FF1C 1 0 0

180 23:10:27 958 T FaxRelay13 2591163160 0 47 0 2 318 1 0 0

181 23:10:27 291 T FaxRelay13 2591163450 0 83 0 2 43A 6 0 0

182 23:10:27 13 T FaxRelay13 2591163451 0 C2 0 2 43B 4 0 0

183 23:10:27 14 T FaxRelay13 2591163451 0 C3 0 2 43B 0 0 0

184 23:10:27 15 T FaxRelay13 2591163451 0 C1 0 2 43B 3 0 0

185 23:10:27 37 T FaxRelay13 2591163530 0 C9 0 2 48A 352 0 0

186 23:10:27 510 T FaxRelay13 2591164040 0 47 0 2 688 2 0 0

187 23:10:27 13 T FaxRelay13 2591164040 0 48 0 2 688 1 0 0

188 23:10:27 47 T FaxRelay13 2591164100 0 4D 0 2 6C4 0 0 0

189 23:10:28 139 T FaxRelay13 2591164240 0 47 0 2 750 0 0 0

190 23:10:28 14 T FaxRelay13 2591164240 0 48 0 2 750 0 0 0

191 23:10:28 277 T FaxRelay13 2591164530 0 8B 0 2 872 FF 0 0

192 23:10:28 19 T FaxRelay13 2591164550 0 90 0 2 886 0 0 0

193 23:10:28 29 T FaxRelay13 2591164580 0 8C 0 2 8A4 5F 0 0

194 23:10:28 15 I FaxRelay13 2591164580 fr-msg-tx DCN

!--- Disconnect (DCN) sent out local POTS.

195 23:10:28 13 T FaxRelay13 2591164600 0 D0 0 2 8B8 28 0 0

196 23:10:28 14 T FaxRelay13 2591164600 0 C1 0 2 8B8 4 0 0

197 23:10:28 79 T FaxRelay13 2591164700 0 C1 0 2 91C 3 0 0

198 23:10:28 141 T FaxRelay13 2591164840 0 C2 0 2 9A8 0 0 0

199 23:10:28 14 T FaxRelay13 2591164840 0 C3 0 2 9A8 0 0 0

200 23:10:28 15 T FaxRelay13 2591164840 0 C1 0 2 9A8 0 0 0

201 23:10:28 13 T FaxRelay13 2591164850 0 C9 0 2 9B2 3C 0 0

202 23:10:28 27 T FaxRelay13 2591164910 0 CC 0 2 9EE 0 0 0

203 23:10:28 14 T FaxRelay13 2591164920 0 83 0 2 9F8 9 0 0

204 23:10:28 15 T FaxRelay13 2591164920 0 5 0 2 9F8 1 0 0

205 23:10:28 14 I FaxRelay13 2591164920 fr-end 1

206 23:10:28 13 I DSP 13 Setting up G.711 mu law voice channel

!--- Cisco fax relay terminated and DSP switches to G.711.

207 23:10:28 25 T FaxRelay13 2591164920 0 C2 0 2 9F8 0 0 0

208 23:10:28 13 T FaxRelay13 2591164920 0 C3 0 2 9F8 0 0 0

209 23:10:29 266 I POTS 13 Drop call 1

210 23:10:29 830 I POTS 13 On hook

!--- Hang-up - call is over.

在6608上，迪克·特雷西需要再次被使用。這些設定通常會提供調試傳真中繼呼叫的最佳輸出。發出6 set mask 0x303和6 set fr-debug 24 1命令。這些傳真調試用於與VG248上相同的呼叫。但是，雖然VG248在終端端，但6608調試是從始發端的角度進行的。請注意，實際消息方向是相同的。然而，從6608 DSP的角度來看，fr-msg-tx實際上是fr-msg-det，反之亦然。

00:24:06.340 (DSP) CRCX -> Port<22>

00:24:06.340 (DSP7) Current PID(D): S<0x296a> E<0x2969> Last PID(D): S<0x2969> E<0x2969>

Mode : RECVONLY

00:24:06.340 (DSP) Set DSP Idle<HOLD>, hold_state<1> previous state<2>

00:24:06.340 (DSP) Voice Mode -> Port<22> Comp<G711_ULAW_PCM> agcEnable<0>

00:24:06.340 (DSP7) Current PID(D): S<0x296d> E<0x296c> Last PID(D): S<0x296c> E<0x296c>

00:24:06.340 (DSP7) Current PID(D): S<0x296f> E<0x296e> Last PID(D): S<0x296e> E<0x296e>

00:24:06.340 (DSP7) This port<22> is used for MODEM calls

00:24:06.340 (DSP7) This port<22> is used for FAX calls

00:24:06.340 (DSP7) This port<22> is used for VOICE calls

00:24:06.350 (DSP) RQNT -> Port<22> From<GMSG>

Enabling Digit Detection

Generating CP Tone<RINGBACK>

00:24:06.350 (DSP) Set DSP voice Mode Hold_state<2> previous state<1>

00:24:06.590 (DSP7) dspChangeChannelState<22>

00:24:06.600 (DSP7) This port<22> is used for VOICE calls

00:24:08.910 (DSP) RQNT -> Port<22> From<GMSG>

Enabling Digit Detection

Stopping Tones

00:24:08.920 (DSP) MDCX -> Port<22>

Enabling Digit Detection

Mode : SENDRECV

00:24:18.860 (DSP) Report P2P Msg -> Port<22> Event<192> Duration<0> Volume<0>

00:24:18.860 (DSP) Modem Pass-thru Mode -> Port<22>

!--- NSE-192 received from the terminating gateway. Just like !--- in passthrough, it cannot transition to fax relay mode !--- until fax flags are detected on the far end.

00:24:18.860 (DSP7) Current PID(D): S<0x2b71> E<0x2b6d> Last PID(D): S<0x2b6d> E<0x2b6d>

00:24:18.870 (DSP7) Current PID(D): S<0x2b74> E<0x2b73> Last PID(D): S<0x2b73> E<0x2b73>

00:24:18.870 (DSP7) Current PID(D): S<0x2b76> E<0x2b75> Last PID(D): S<0x2b73> E<0x2b73>

00:24:18.870 (DSP7) Port<22> P2P<192> <NONE> -> <ANS>

00:24:21.890 (DSP) RTP->Port<22> Received IOS_IND

Current State <NONE> New State <RECV_IND1>

00:24:21.890 (DSP) RTP->Port<22> Sending IOS_ACK

Current State <RECV_IND1> New State <SEND_ACK1>

00:24:21.900 (DSP) RTP->Port<22> Sending IOS_IND

Current State <SEND_ACK1> New State <SEND_IND2>

00:24:21.900 (DSP) RTP->Port<22> Received IOS_ACK

Current State <SEND_IND2> New State <RECV_ACK2>

!--- RTP PT-96 and PT-97 packets are seen which signal the !--- transition to Cisco fax relay.

00:24:21.900 (DSP) Fax Relay Mode -> Port<22> faxFeature<0x2>

00:24:21.900 (DSP7) Current PID(D): S<0x2c16> E<0x2c15> Last PID(D): S<0x2c10> E<0x2c10>

00:24:21.900 (FAX) DSP<7> Chan<3> -> 1461962 fr-entered (10ms)

!--- DSP enters Cisco fax relay mode.

00:24:21.900 (DSP) Report P2P Msg -> Port<22> Event<192> Duration<0> Volume<0>

00:24:21.900 (DSP7) Port<22> P2P<192> <FAX> -> <FAX>

00:24:22.450 (FAX) DSP<7> Chan<3> -> 1462510 STATE_CHANGE from <0xff> to <0x6>

00:24:23.110 (FAX) DSP<7> Chan<3> -> 1463170 fr-msg-tx CSI

00:24:23.910 (FAX) DSP<7> Chan<3> -> 1463970 fr-msg-tx DIS

!--- CSI and DIS passed to the locally attached fax device.

00:24:24.280 (FAX) DSP<7> Chan<3> -> 1464340 STATE_CHANGE from <0x6> to <0x1>

00:24:24.910 (FAX) DSP<7> Chan<3> -> 1464970 STATE_CHANGE from <0x1> to <0x3>

00:24:25.920 (FAX) DSP<7> Chan<3> -> 1465980 fr-msg-det TSI

00:24:26.720 (FAX) DSP<7> Chan<3> -> 1466780 fr-msg-det DCS

!--- TSI and DCS received from local fax device and sent to the other fax gateway.

00:24:27.080 (FAX) DSP<7> Chan<3> -> 1467150 STATE_CHANGE from <0x3> to <0x1>

00:24:27.180 (FAX) DSP<7> Chan<3> -> 1467250 STATE_CHANGE from <0x1> to <0x5>

00:24:30.290 (FAX) DSP<7> Chan<3> -> 1470350 STATE_CHANGE from <0x5> to <0x1>

00:24:31.480 (FAX) DSP<7> Chan<3> -> 1471540 STATE_CHANGE from <0x1> to <0x6>

00:24:32.610 (FAX) DSP<7> Chan<3> -> 1472680 fr-msg-tx CFR

!--- CFR forwarded to local POTS port in response to high speed training.

00:24:32.740 (FAX) DSP<7> Chan<3> -> 1472810 STATE_CHANGE from <0x6> to <0x1>

00:24:33.050 (FAX) DSP<7> Chan<3> -> 1473120 STATE_CHANGE from <0x1> to <0x4>

00:25:19.200 (FAX) DSP<7> Chan<3> -> 1519290 STATE_CHANGE from <0x4> to <0x1>

00:25:19.460 (FAX) DSP<7> Chan<3> -> 1519550 STATE_CHANGE from <0x1> to <0x3>

00:25:20.440 (FAX) DSP<7> Chan<3> -> 1520530 fr-msg-det EOP

!--- EOP received from local POTS port. This indicates that !--- page transmission is complete.

00:25:20.570 (FAX) DSP<7> Chan<3> -> 1520660 STATE_CHANGE from <0x3> to <0x1>

00:25:21.720 (FAX) DSP<7> Chan<3> -> 1521810 STATE_CHANGE from <0x1> to <0x6>

00:25:22.870 (FAX) DSP<7> Chan<3> -> 1522960 fr-msg-tx MCF

!--- MCF confirms reception of page on terminating side sent out local POTS.

00:25:23.000 (FAX) DSP<7> Chan<3> -> 1523090 STATE_CHANGE from <0x6> to <0x1>

00:25:23.490 (FAX) DSP<7> Chan<3> -> 1523580 STATE_CHANGE from <0x1> to <0x3>

00:25:24.420 (FAX) DSP<7> Chan<3> -> 1524510 fr-msg-det DCN

!--- DCN received from local POTS terminating the fax transmission.

00:25:24.570 (FAX) DSP<7> Chan<3> -> 1524660 STATE_CHANGE from <0x3> to <0x9>

00:25:25.410 (DSP) Report P2P Msg -> Port<22> Event<194> Duration<0> Volume<0>

00:25:25.410 (DSP7) Port<22> P2P<194> <?> -> <VOICE>

00:25:25.610 (DSP) MDCX -> Port<22>

Enabling Digit Detection

Mode : RECVONLY

00:25:25.610 (DSP) Set DSP Idle<HOLD>, hold_state<1> previous state<2>

00:25:25.640 (DSP) DLCX -> Port<22> From<GMSG >

超級G3傳真/資料機

超級G3傳真類似於普通的G3傳真，但它使用V.34調制。V.34調制能夠以高達33.6 kbps的速度傳送。從網關的角度來看，超級G3呼叫看起來更像高速數據機呼叫，而不是傳真呼叫。因此，必須使用數據機直通才能成功傳輸超級G3傳真呼叫。與通常的低速數據機呼叫的G3傳真呼叫不同，超級G3傳送2100 Hz的ANSam音，並帶有相位反轉，這會禁用路徑中的所有回聲消除器。此外，在常規G3傳真呼叫中還找不到V.8協商，而超級G3不使用HDLC標誌來幀V.8消息。因此，沒有已調製的HDLC標誌可觸發傳真中繼。在檢測到調製的HDLC標誌之前，不會觸發傳真中繼。

如果在VG248和6608上啟用了數據機直通，則超級G3的工作方式與高速數據機呼叫類似，應該不會出現任何問題。但是，如果沒有啟用數據機直通，或者超級G3在啟動時出現問題，則它應該回退到正常的G3傳真程式。然後，可以使用傳真直通或傳真中繼。如果超級G3導致問題，請注意超級G3傳真需要ECM。在傳真機上禁用ECM時，可以關閉超級G3，傳真機充當常規的G3傳真裝置。

超級G3消息傳送 — 請注意，只有啟動不同（ANSam、CM和JM）

與本文檔前面介紹的普通G3傳真消息相比，呼叫選單(CM)和聯合選單的V.8消息與ANSam音調是主要區別。在ANSam音調（2100 Hz，相位反轉）之後，超級G3需要來自始發方的響應。但是，在正常G3下，CED應答音（2100 Hz無相位反轉）後立即出現DIS消息。 因此，當超級G3終端傳真裝置向另一端傳送ANSam音而不從始發端接收CM消息（響應超時為4秒）時，它會假設必須發生正常的G3傳真傳輸。終端傳真裝置傳送一個正常的DIS（除了第6位被設定為1以使始發端知道超級G3仍是一個選項之外），傳真傳輸繼續傳送正常的G3消息。

當您啟用SG3傳真機以協商至G3速度時，就實現了通過傳真中繼網路進行互通的功能。這是通過抑制SG3 V.8傳真呼叫選單(CM)訊號來實現的。對SG3 V.8傳真CM訊號（或消息）的抑制也稱為SG3欺騙。Cisco IOS®軟體版本12.4T支援該功能，並且可以在H323、SIP和MGCP協定中啟用。但是，無法使用SCCP啟用它，因為CallManager不支援Super G3欺騙。有關SG3欺騙的詳細資訊，請參閱適用於G3速度的SG3傳真機的傳真中繼支援。

從NSE信令的角度來看，呼叫最初看起來像是傳送了NSE-192的傳真通過或低速數據機呼叫。一旦檢測到2100 Hz的相位反轉，還會傳送NSE-193通知對方需要禁用回聲消除器。有關圖形說明，請參見passthrough部分中的NSE信令流。

需要記住的重要一點是，高速數據機（V.34、V.90等）呼叫和超級G3呼叫的處理方式必須與6608和VG248相同，並且必須啟用數據機直通才能正常工作。兩個平台上的數據機直通預設啟用。除非已禁用，否則這不應成為問題。在VG248上，檢查埠特定引數是否已將直通模式設定為默認值：自動。在6608上，確保選中「Port Used for Modem Calls(用於數據機呼叫的線路埠)」覈取方塊。執行本檔案疑難排解傳真傳輸一節所述的相同偵錯。

摘要

此清單詳細列出需記住的一些重要概念：

- Fax passthrough使用G.711編解碼器將語音訊段中的模擬傳真音調數位化。除了少量DSP更改（禁用靜音抑制、加深抖動緩衝區等），這看起來像是到網關的正常語音呼叫。唯一需要調試的是NSE信令和DSP資料包統計資訊。

- 傳真中繼最初看起來就像傳真直通呼叫(NSE-192)。 檢測到V.21已調制標誌後，就會切換到傳真中繼。無法更早地切換到傳真中繼，因為低速數據機呼叫看起來完全相同，直到檢測到標誌。

- 傳真中繼調試更加深入，並且可以檢視低速傳真消息。調試中只顯示低速消息。因此，省略了訓練和頁面傳輸等事項。

- 超級G3傳真無法與思科傳真中繼配合使用。代碼中沒有支援。由於V.21調制標誌不會在終端網關上的2100 Hz音調後出現，因此無法區分超級G3和高速數據機呼叫。為了成功傳遞超級G3傳真呼叫，必須使用數據機傳輸。如果超級G3無法協商，那麼它應該返回到正常的G3傳真消息。

- 高速資料機（和超級G3傳真）需要在傳輸路徑中禁用回聲消除器（與低速資料機呼叫和普通G3傳真不同）。 因此，這些裝置傳送的2100 Hz音調包括相位反轉。此音在傳輸路徑中禁用回聲消除器，還使網關傳送NSE-193消息以通知另一個網關需要禁用回聲消除器。

- 本檔案中的概念（RTP NSE訊號傳送、傳真中繼訊號傳送、超級G3等）同樣適用於其他平台。所有AVVID產品（大多數情況下）的報文傳送和協定都相同。 調試可能看起來略有不同，但協定、其操作和故障排除是相同的。

相關資訊

- 語音技術支援

- 語音和IP通訊產品支援

- Cisco IP電話故障排除

- 技術支援與文件 - Cisco Systems