目錄

簡介

必要條件

需求

採用元件

慣例

動態NAT與靜態NAT

使用cable-modem dhcp-proxy nat命令進行配置

組態驗證

相關資訊

簡介

本檔案將說明如何使用cable-modem dhcp-proxy nat指令。此命令的主要功能是使用網路提供商的DHCP伺服器提供的IP位址設定網路位址轉譯(NAT)位址池。

如需詳細資訊，請參閱纜線IOS CMTS命令中的cable-modem dhcp-proxy。

注意：請注意Cisco錯誤ID CSCdt32356(僅供註冊客戶使用)，該錯誤已在Cisco IOS®軟體版本系列12.2及更新版本中修正。使用cable-modem dhcp-proxy nat pool-name cable interface命令的動態NAT無法正常工作。如果沒有正確分配IP地址或子網掩碼和預設網關（如果有的話）。輸入命令後，分配給NAT池的地址不會響應地址解析協定(ARP)。 建立的IP NAT池來自電纜數據機作用域，而不是客戶端裝置(CPE)作用域，因此它將不可路由的IP地址放入NAT池中。請注意，此問題發生在多個纜線資料機的Cisco IOS軟體版本中，尤其是12.1(5)T。建議您在uBR924上使用Cisco IOS軟體版本系列12.2，在uBR905、uBR925和CVA數據機上使用版本12.2T、12.3和更高版本的系列。如需更多資訊，請參閱Cisco錯誤ID CSCdt32356(僅限註冊客戶)。

注意：還要注意以下注意事項：

1. 由於uBR904平台不支援Cisco IOS軟體版本12.1(1)T，因此無法在此平台上配置cable-modem dhcp-proxy命令。

2. 要在uBR924上啟用dhcp-proxy功能，通常建議您使用Cisco IOS軟體版本12.2(6j)。

3. 對於CVA122，命令記錄為cable dhcp-proxy nat。此命令與uBR900系列纜線資料機上的cable-modem dhcp-proxy nat命令相同。

從CVA122中可以看到以下輸出：

Router(config)# interface cable 0

Router(config-if)# cable?

cable-modem

必要條件

需求

本文檔的讀者應瞭解以下主題：

- 對網路地址轉換及其使用原因的基本瞭解

- 有線電纜資料服務介面規範(DOCSIS)1.0通訊協定

- Cisco IOS軟體命令列介面

採用元件

下表顯示對每個Cisco纜線資料機平台支援此命令的Cisco IOS軟體版本：

引入cable-modem dhcp-proxy命令的版本

平台

12.1(1)T

uBR924

12.1(3)XL

uBR905

12.2(2)XA

uBR925

12.1(5)XU1

CVA122

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

動態NAT與靜態NAT

使用動態NAT時，在路由器收到需要轉換的流量之前，NAT轉換表中不會存在轉換。動態轉換具有超時時間，超過此時間後，它們將從轉換表中清除。但是，使用靜態NAT時，一旦配置靜態NAT命令，轉換就會存在於NAT轉換表中，並且它們會保留在轉換表中，直到刪除靜態NAT命令為止。

確定您在電纜數據機中配置了動態NAT的最簡單方法是在電纜數據機的配置中搜尋以下命令：

ip nat inside source list 100 interface cable-modem0 overload

通過將NAT源指向訪問清單，您可以動態構建NAT轉換表。cable-modem dhcp-proxy nat命令使用此動態NAT功能。

使用cable-modem dhcp-proxy nat命令進行配置

使用cable-modem dhcp-proxy nat命令時，從電纜運營商的DHCP伺服器自動分配用於NAT池的地址。

使用此選項時，請包含以下NAT配置命令：

- ip nat inside interface — 用於將乙太網介面配置為「內部」介面。

- ip nat outside interface — 用於將電纜介面配置為「outside」介面。

- overload — 使用IP NAT全域性配置命令指定此選項，因為由cable-modem dhcp-proxy nat命令建立的NAT池僅包含一個IP地址。

使用cable-modem dhcp-proxy nat命令配置路由器後，重新啟動路由器。在DOCSIS調配過程中，路由器會傳送DHCP客戶端請求來獲取電纜介面的IP地址。然後路由器使用乙太網介面的MAC地址向DHCP伺服器傳送代理DHCP請求。DHCP伺服器使用第二個IP地址進行應答，路由器將該IP地址分配給動態配置的環回介面，該環回介面只指向一個地址的動態配置的NAT池。

有關處理DHCP後自動新增到配置中的資訊，請參閱本文檔中的配置輸出。

要配置NAT以便動態建立池，請在您的路由器上發出以下命令。請記住，為了配置NAT，您的路由器必須處於路由模式。

Router# config t

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)# interface ethernet 0

Router(config-if)# ip address 192.168.1.1 255.255.255.0

!--- Assign an IP address to interface Ethernet 0.

Router(config-if)# no bridge-group 59

!--- Remove bridging so that you can configure for routing.

Router(config-if)# no bridge-group 59 spanning

!--- Remove bridging spanning.

Router(config-if)# ip nat inside

!--- Enable NAT inside for the Ethernet interface.

Router(config-if)# exit

Router(config)#

Router(config)# interface cable 0

Router(config-if)# no bridge-group 59

!--- Remove bridging so that you can configure for routing.

Router(config-if)# no bridge-group 59 spanning

!--- Remove bridging spanning.

Router(config-if)# no cable compliant bridge

!--- Remove bridging so that you can configure for routing.

Router(config-if)# ip nat outside

!--- Enable NAT outside for the cable interface.

Router(config-if)# cable-modem dhcp-proxy nat TEST_POOL

!--- Define dhcp-proxy nat for the TEST_POOL pool.

Router(config-if)# exit

Router(config)#

Router(config)# ip routing

!--- Enable routing.

Router(config)# ip nat inside source list 1 pool TEST_POOL overload

!--- Configure dynamic NAT.

Router(config)# access-list 1 permit 192.168.1.0 0.0.0.255

!--- Define interesting traffic for NAT.

配置如下所示：

router# show run

Building configuration...

Current configuration : 953 bytes

!

version 12.2

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname router

!

logging rate-limit console 10 except errors

!

ip subnet-zero

no ip finger

!

ip audit notify log

ip audit PO max-events 100

no ip dhcp-client network-discovery

!

interface Ethernet0

ip address 192.168.1.1 255.255.255.0

ip nat inside

no ip mroute-cache

!

interface cable-modem0

ip nat outside

no ip mroute-cache

no cable-modem compliant bridge

cable-modem dhcp-proxy nat TEST_POOL

!

ip nat inside source list 1 pool TEST_POOL overload

ip classless

no ip http server

no ip http cable-monitor

!

access-list 1 permit 192.168.1.0 0.0.0.255

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

output attenuation 0

!

voice-port 1

input gain -2

output attenuation 0

!

!

line con 0

transport input none

line vty 0 4

login

!

end

router#

bold命令是輸入的命令；其他的是違約。請注意，此時尚未建立NAT池。需要重新載入電纜數據機，或者通過發出shut命令後發出no shut命令來重置電纜介面。

router# reload

Proceed with reload? [confirm]

133.CABLEMODEM.CISCO: 00:06:16: %SYS-5-RELOAD: Reload requested

System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

Copyright (c) 1999 by Cisco Systems, Inc.

UBR924 platform with 16384 Kbytes of main memory

program load complete, entry point: 0x80010000, size: 0x398070

Self decompressing the image : #################################

################################################################

################################################################

################################################################

################################################################

################################################################

########################################################## [OK]

!--- Output suppressed.

Press RETURN to get started!

注意：在配置輸出中，處理DHCP後自動新增到配置的資訊會附帶註釋。

本文以uBR7114和uBR924為例。安裝在其上的Cisco IOS軟體版本分別為12.1(5)EC1和12.1(3a)T4。下圖顯示了使用的連線和IP地址。

圖1:使用cable dhcp-proxy nat命令在配置中使用的圖表

uBR924 — 使用服務提供商的DHCP伺服器提供的IP地址配置NAT地址池

router# show run

Building configuration...

Current configuration : 1273 bytes

!

! Last configuration change at 13:12:52 - Tue Feb 29 2000

!

version 12.2

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname router

!

logging rate-limit console 10 except errors

!

clock timezone - -8

ip subnet-zero

no ip finger

!

ip audit notify log

ip audit PO max-events 100

no ip dhcp-client network-discovery

!

!

interface Loopback0

ip address 111.111.111.8 255.255.255.255

!--- Lookback interface added automatically by DHCP configuration.

!

interface Ethernet0

ip address 192.168.1.1 255.255.255.0

ip nat inside

no ip mroute-cache

!

interface cable-modem0

ip nat outside

no ip mroute-cache

no cable-modem compliant bridge

cable-modem dhcp-proxy nat TEST_POOL

cable-modem boot admin 2

cable-modem boot oper 5

cable-modem downstream saved channel 525000000 37 1

!

ip nat pool TEST_POOL 111.111.111.8 111.111.111.8 netmask 255.255.255.0

!--- NAT pool added automatically by DHCP configuration.

ip nat inside source list 1 pool TEST_POOL overload

ip classless

no ip http server

no ip http cable-monitor

!

access-list 1 permit 192.168.1.0 0.0.0.255

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

output attenuation 0

!

voice-port 1

input gain -2

output attenuation 0

!

!

line con 0

transport input none

line vty 0 4

login

!

end

組態驗證

本節介紹如何使用show命令輸出來檢驗電纜數據機的配置。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

發出show arp命令以顯示ARP表中的條目。

router# show arp

Protocol  Address         Age (min) Hardware Addr   Type   Interface

Internet  111.111.111.111      56   0002.b9ff.8c1c  ARPA   cable-modem0

Internet  10.4.1.1             59   0002.b9ff.8c1c  ARPA   cable-modem0

!--- IP address of the interface cable 1/0 !--- of the cable modem termination system (CMTS).

Internet  192.168.1.1           -   0030.1976.771a  ARPA   Ethernet0

Internet  192.168.1.5          34   00a0.243c.eff5  ARPA   Ethernet0

!--- IP address of the PC behind the cable modem.

Internet  10.4.1.114            -   0030.1976.771b  ARPA   cable-modem0

電纜數據機後面的PC靜態配置了IP地址192.168.1.5。不過，很容易使電纜數據機成為DHCP伺服器，動態地為其LAN主機分配IP地址；使用以下設定：

ip dhcp excluded-address 192.168.1.1

ip dhcp pool pool name

network 192.168.1.0 255.255.255.0

default-router 192.168.1.1

要測試NAT是否正常工作，請從電纜數據機後面連線的PC發出ping命令以嘗試到達電纜介面。

如果您檢視NAT轉換表，可以看到成功的轉換。

router# show ip nat translations

Pro  Inside global      Inside local       Outside local    Outside global

icmp 111.111.111.8:512  192.168.1.5:512    10.4.1.114:512   10.4.1.114:512

如需詳細資訊，請參閱纜線IOS CMTS命令中的cable-modem dhcp-proxy。

相關資訊

- NAT（網路位址轉譯）支援頁面

- 思科uBR904電纜數據機的橋接和路由功能

- 電纜CPE命令

- 技術支援 - Cisco Systems