目錄

簡介

必要條件

採用元件

恢復管理員帳戶密碼

程式

驗證

相關資訊

簡介

本文檔提供在交換矩陣互聯第4代和第5代上恢復丟失密碼的過程的全面指南。

必要條件

對交換矩陣互聯的物理訪問。

採用元件

交換矩陣互聯6536。

RJ45到DB9串列電纜。

筆記型電腦。

恢復管理員帳戶密碼

程式

1. 連線到控制檯埠。 將串列管理電纜的RJ-45端插入交換矩陣互聯上的控制檯埠，並將DB-9凸端連線到筆記型電腦或其它電腦上的串列埠。

2. 重新通電交換矩陣互聯：

1. 關閉交換矩陣互聯的電源。

2. 開啟交換矩陣互聯的電源。

3. 啟動時按控制檯中的組合鍵： Ctrl + C。

4. 在載入程式提示符下，找到與命令dir一起使用的系統映像。

loader > dir

bootflash::

lost+found

ucs-manager-k9.4.2.3e.bin

.rpmstore

ucs_chassis_imgs

installables

ucs-6400-k9-system.9.3.5.I42.3d.bin   <----

nuova-sim-mgmt-nsg.0.1.0.001.bin

5. 運行命令cmdline recoverymode=1以啟用恢復模式。

loader > cmdline recoverymode=1

6. 啟動交換矩陣互聯上的系統映像。

loader > boot ucs-6400-k9-system.9.3.5.I42.3d.bin

7. 然後進入config terminal模式。

switch(boot)# config terminal

Enter configuration commands, one per line.  End with CNTL/Z.

switch(boot)(config)#

8. 重置管理員密碼。

switch(boot)(config)# admin-password

注意：選擇至少包含一個大寫字母和一個數字的強密碼。密碼不能為空。

注意：新密碼將以明文模式顯示。

9.退出配置終端模式。

10.載入系統映像。

switch(boot)(config)# exit

switch(boot)# load ucs-6400-k9-system.9.3.5.I42.3d.bin

如果是群集配置。重複步驟以進入載入程式提示。

1. 連線到控制檯埠。

2. 重新通電交換矩陣互聯：

1. 關閉交換矩陣互聯的電源。

2. 開啟交換矩陣互聯的電源。

3. 啟動時按控制檯中的組合鍵： Ctrl + C。

4. 在載入程式提示下級交換矩陣互聯時，啟動映像將其啟動。

loader > boot ucs-6400-k9-system.9.3.5.I42.3d.bin

提示：交換矩陣互聯必須處於相同的韌體版本才能形成群集。

驗證

通過SSH與交換矩陣的管理IP建立連線，並使用更新的密碼登入。

login as: admin

Pre-authentication banner message from server:

| Cisco UCS 6500 Series Fabric Interconnect

End of banner message from server

admin@X.X.X.X's password: N3wp4ssw0rd

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2009, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

FI-6536-A#

相關資訊

https://www.cisco.com/c/en/us/td/docs/unified_computing/ucs/hw/6454-install-guide/6454/6454_chapter_011.html