目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

網路圖表

目標

初始驗證

組態

驗證

摘要

相關資訊

簡介

本檔案介紹在Nexus 9000系列上設定邊界閘道通訊協定(BGP)路由反射器的程式。

必要條件

需求

思科建議您瞭解以下主題：

- Nexus交換機

- BGP

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解計畫套用任何指令可能造成的影響。

背景資訊

BGP用來避免路由回圈的機制是將其自己的自治系統編號(ASN)新增到AS PATH屬性。對於IBGP拓撲，更新不會修改AS-PATH屬性，因為它們屬於同一個ASN，這可能會導致路由環路。

如果從IBGP對等點收到BGP首碼，則無法將這個首碼通告給另一個IBGP鄰居。 BGP使用其水準分割規則來防止同一ASN中的環路。

此規則強制您使用全網狀拓撲與每個IBGP鄰居交換字首。對於具有全網狀方案的大型網路，由於它使用過多的資源來建立對等網路，因此不能進行擴展。

iBGP的全網狀拓撲的替代方案有：

- 路由反射

- 聯盟

本文僅重點介紹BGP路由反射器的使用情況。

使用路由反射器克服了全網格的限制。路由反射器是AS（自治系統）內將iBGP字首反射給同一AS中其他路由器的指定裝置。

設定

要檢查BGP路由反射器配置指南，請參閱配置高級BGP

網路圖表

在此圖中，Nexus R2、Nexus R3、Nexus 4、Nexus R5和Nexus R6建立了iBGP鄰居關係。而且，Nexus R1和Nexus R5建立了eBGP鄰居關係。

目標

將Nexus R1生成的網路交換到同一ASN網路中的所有65000。

初始驗證

Nexus R1執行字首通告：

R1# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 78, Local Router ID is 192.168.1.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r192.168.1.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.2.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.3.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.4.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.5.0/30     0.0.0.0                  0        100      32768 ?

R1#

Nexus R5收到來自Nexus R1的通告，該通告是eBGP會話。

Nexus R5

R5# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 123, Local Router ID is 172.16.1.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.1.8/30        0.0.0.0                  0        100      32768 ?

*>r172.16.1.0/30      0.0.0.0                  0        100      32768 ?

*>e192.168.1.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.2.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.3.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.4.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.5.0/30     172.16.1.1               0                     0 64512 ?

R5#

Nexus R5向其iBGP對等體Nexus R2和R6通告字首。

R2# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 33, Local Router ID is 10.1.1.6

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i10.1.1.4/30        10.1.1.5                 0        100          0 ?

*>i10.1.1.8/30        10.1.1.5                 0        100          0 ?

*>i172.16.1.0/30      10.1.1.5                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R2#

R6# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 33, Local Router ID is 10.1.1.10

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i10.1.1.4/30        10.1.1.9                 0        100          0 ?

*>i10.1.1.8/30        10.1.1.9                 0        100          0 ?

*>i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R6#

根據環路迴避規則，BGP不會向其他iBGP對等體通告iBGP對等體獲取的任何字首。

R2# show ip bgp neighbors 10.1.2.2 advertised-routes

Peer 10.1.2.2 routes for address family IPv4 Unicast:

BGP table version is 88, Local Router ID is 10.150.0.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.0/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.8/30        0.0.0.0                  0        100      32768 ?

*>r10.150.0.0/30      0.0.0.0                  0        100      32768 ?

R2#

Nexus R3和Nexus R4不會接收Nexus R1生成的字首。

R3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 28, Local Router ID is 10.100.100.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l10.100.100.0/24    0.0.0.0                           100      32768 i

R4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 6, Local Router ID is 10.200.200.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l10.200.200.0/24    0.0.0.0                           100      32768 i

R4#

組態

對於上述拓撲，要轉換為路由反射器的選定裝置是Nexus R2和Nexus R6，因為這些裝置與同一ASN中的所有iBGP對等體都有連線。

注意：路由反射器配置會導致每個修改的bgp對等體都重置。此配置必須在維護視窗下完成。

註：通過拓撲設計，Nexus R2和R6成為ASN網路的路由反65000器。

Nexus R1

R1# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:43:31 2024

!Time: Wed Jan 31 23:24:28 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64512

address-family ipv4 unicast

redistribute direct route-map REDISTRIBUTE_LOCAL

neighbor 172.16.1.2

remote-as 65000

address-family ipv4 unicast

R1#

Nexus R2

R2# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 03:10:49 2024

!Time: Wed Jan 31 23:24:15 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

cluster-id 10.150.0.1

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.5

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.2

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.6

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.10

remote-as 65000

address-family ipv4 unicast

route-reflector-client

R2#

Nexus R3

R3# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:49:05 2024

!Time: Wed Jan 31 23:10:07 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

network 10.100.100.0/24

neighbor 10.1.2.5

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.3.5

remote-as 65000

address-family ipv4 unicast

R3#

Nexus R4

R4# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:56:11 2024

!Time: Wed Jan 31 23:00:44 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

network 10.200.200.0/24

neighbor 10.1.2.1

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.3.1

remote-as 65000

address-family ipv4 unicast

R4#

Nexus R5

R5# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:48:38 2024

!Time: Wed Jan 31 23:24:15 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.6

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.1.10

remote-as 65000

address-family ipv4 unicast

neighbor 172.16.1.1

remote-as 64512

address-family ipv4 unicast

R5#

Nexus R6

R6# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 03:12:40 2024

!Time: Wed Jan 31 23:24:18 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

cluster-id 10.160.0.1

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.9

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.9

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.3.2

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.3.6

remote-as 65000

address-family ipv4 unicast

route-reflector-client

R6#

驗證

將Nexus R2和Nexus R6轉換為路由反射器後，字首將通告給iBGP對等體。  .

R2# show ip bgp neighbors 10.1.2.2 advertised-routes

Peer 10.1.2.2 routes for address family IPv4 Unicast:

BGP table version is 22, Local Router ID is 10.150.0.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>i10.1.1.8/30        10.1.1.5                 0        100          0 ?

*>r10.1.2.0/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.8/30        0.0.0.0                  0        100      32768 ?

*>i10.100.100.0/24    10.1.2.6                          100          0 i

*>r10.150.0.0/30      0.0.0.0                  0        100      32768 ?

*>i172.16.1.0/30      10.1.1.5                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R2#

Nexus R3和Nexus R4接收Nexus R1生成的字首。

R3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 108, Local Router ID is 10.100.100.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

* i10.1.1.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

*>i10.1.1.8/30        10.1.3.5                 0        100          0 ?

* i                   10.1.2.10                0        100          0 ?

* i10.1.2.0/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.2.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.2.8/30        10.1.3.5                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.3.0/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

* i10.1.3.4/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

*>l10.100.100.0/24    0.0.0.0                           100      32768 i

* i10.150.0.0/30      10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.160.0.0/30      10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

* i10.200.200.0/24    10.1.3.2                          100          0 i

*>i                   10.1.2.2                          100          0 i

* i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i                   10.1.1.5                 0        100          0 ?

* i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

R3#

R4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 78, Local Router ID is 10.200.200.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

* i10.1.1.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

*>i10.1.1.8/30        10.1.3.1                 0        100          0 ?

* i                   10.1.2.10                0        100          0 ?

* i10.1.2.0/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.2.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.2.8/30        10.1.3.1                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.3.0/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

* i10.1.3.4/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

* i10.100.100.0/24    10.1.3.6                          100          0 i

*>i                   10.1.2.6                          100          0 i

* i10.150.0.0/30      10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.160.0.0/30      10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

*>l10.200.200.0/24    0.0.0.0                           100      32768 i

* i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i                   10.1.1.5                 0        100          0 ?

* i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

R4#

路由反射器學習的字首顯示BGP對等體IP和集群ID。

R4# show ip bgp 192.168.2.0

BGP routing table information for VRF default, address family IPv4 Unicast

BGP routing table entry for 192.168.2.0/30, version 63

Paths: (2 available, best #2)

Flags: (0x8000001a) (high32 00000000) on xmit-list, is in urib, is best urib route, is in HW

Path type: internal, path is valid, not best reason: Neighbor Address, no labeled nexthop

AS-Path: 64512 , path sourced external to AS

172.16.1.1 (metric 0) from 10.1.3.1 (10.160.0.1)      >>>>>>> Peer IP (Cluster ID)

Origin incomplete, MED 0, localpref 100, weight 0

Originator: 172.16.1.2 Cluster list: 10.160.0.1

Advertised path-id 1

Path type: internal, path is valid, is best path, no labeled nexthop, in rib

AS-Path: 64512 , path sourced external to AS

172.16.1.1 (metric 0) from 10.1.2.1 (10.150.0.1)

Origin incomplete, MED 0, localpref 100, weight 0

Originator: 172.16.1.2 Cluster list: 10.150.0.1

Path-id 1 not advertised to any peer

R4#

注意：路由反射器接收的Nexus R3和Nexus R4路由不會作為環路避免規則的一部分通告給其他iBGP對等體。

摘要

路由反射器組態不需要複雜組態即可將路由反射到其iBGP使用者端，只需在位址系列下新增關鍵字「route-reflector-client」，即可通知系統充當該鄰居的路由反射器。

注意：要檢視Nexus中的BGP聯盟，請參閱在Nexus 9000上配置BGP聯盟

相關資訊

- 思科技術支援與下載