目錄

簡介

必要條件

採用元件

限制和限制

瞭解PTP

最佳主時鐘(BMC)演算法

同步時鐘

實驗拓撲

基本配置：

步驟故障排除：

驗證PTP配置是否正確。

驗證PTP層次結構設定是否成功。

驗證PTP域中的父級和祖師資訊

驗證PTP糾正和錯誤糾正。

有用的集合：

常見問題：

Nexus 9000無法與巨型時鐘或上游邊界時鐘同步時間

要採取的操作：

意外的特級大師切換

要採取的操作

高錯誤更正

要採取的操作：

PTP埠在應該是從屬或被動時處於主狀態

要採取的操作：

最佳實踐

相關資訊

簡介

本檔案 d說明 如何對Nexus 9000交換機上的Precision時間協定(PTP)進行故障排除。

必要條件

思科建議您瞭解以下主題：

- PTP基礎知識

- 熟悉Cisco Nexus作業系統(NX-OS)

本文不涉及PTP(Precision Time Protocol)協定的設計和配置。如需此類資訊，建議您參閱組態設定指南。

Nexus 9000 PTP配置指南

適用於Cisco Nexus儀表板見解的Precision時間協定(PTP)

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊係根據以下軟體和硬體版本：

- N9K Spine01:N9K-C93180YC-FX NX-OS 10.3(4a)

- N9K Spine02:N9K-C93180YC-EX NX-OS 10.3(4a)

- N9K Leaf01:N9K-C92160YC-X NX-OS 9.3.12

- N9K主機：N9K-92160-YC-X NX-OS 9.3.12

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

限制和限制

- 要使PTP正常工作，必須使用最新的SUP和線卡FPGA版本。有關升級FPGA的資訊，請訪問版本說明(Release Notes)登入頁轉到FPGA/EPLD升級版本說明（NX-OS模式交換機）部分，並找到您的軟體版本的FPGA/EPLD升級版本說明。請參閱「安裝指南」主題。

- 在Nexus 9000上，PTP僅在邊界時鐘模式下運行。不支援端到端透明時鐘和對等透明時鐘模式。

- Cisco Nexus 92348GC-X平台交換機不支援PTP。

- QoS TCAM區域Ingress SUP [ingress-sup]必須設定為768或更高才能使PTP IPv6傳輸正常工作。

在對PTP問題進行故障排除之前，建議檢視給定平台和版本的Nexus 9000系統管理配置的PTP部分。

瞭解PTP

PTP過程包括兩個階段：建立主次層次和同步時鐘。

最佳主時鐘(BMC)演算法

BMCA用於選擇每條鏈路上的時間源時鐘，並最終為整個PTP域選擇主時鐘。它在普通時鐘和邊界時鐘的每個埠本地運行，將本地資料集與從通告消息接收的資料進行比較，以選擇鏈路上的最佳時鐘。

1. Priority1：使用者可配置的絕對優先順序（低值wins）

2. 時鐘分類：定義時鐘可跟蹤性的屬性（不可由使用者配置，取值較低）

3. 時鐘精度：定義時鐘的精度（不可由使用者配置，取值較低）

4. 時鐘差異：定義時鐘精度的屬性（不可由使用者配置）

5. 優先順序2：使用者可配置

6. 源埠ID：源埠的Mac地址

Announce消息用於建立同步層次結構。

同步時鐘

Sync、Delay_Req、Follow_Up和Delay_Resp消息用於計算時間。

PTP消息可以是組播或單播，組播是預設模式。根據IEEE 1588標準，PTP使用組播目標IP地址224.0.1.129 UDP319/320。

PTP配置檔案 — PTP支援預設(1588)、AES67和SMPTE 2059-2配置檔案。每個配置檔案具有不同的同步和延遲請求間隔範圍。有關這些配置檔案的詳細資訊，請參閱配置指南。

實驗拓撲

基本配置：

feature ptp

ptp source 192.168.1.3>>>>Define PTP packet source IP

ptp priority1 127     >>>>Define PTP priority 1

ptp priority2 127     >>>>Define PTP priority 2

interface Ethernet1/31

ptp                   >>>>Enable PTP in all interconnected ports.

interface Ethernet1/33

ptp

interface Ethernet1/34

ptp

步驟故障排除：

驗證PTP配置是否正確。

確保每台裝置具有唯一的源IP，並且所有裝置上的PTP域ID相同。

N9K_Spine01# show ptp clock

PTP Device Type : boundary-clock

PTP Source IPv4 Address : 192.168.1.3>>>>PTP source IP

PTP Source IPv6 Address : 0::

Clock Identity : 00:ee:ab:ff:fe:67:3e:9d

Clock Domain: 0                      >>>>PTP domain id. Must same in one PTP domain.

Slave Clock Operation : Two-step

Master Clock Operation : Two-step    >>>>N9K EX/FX/FX2/FX3 only support two-step mode.

Slave-Only Clock Mode : Disabled

Number of PTP ports: 3

Priority1 : 127

Priority2 : 127

Clock Quality:

Class : 248

Accuracy : 254

Offset (log variance) : 65535

Steps removed : 1                    >>>>Hops from GM

驗證PTP層次結構設定是否成功。

從埠連線到上游時鐘裝置。master連線埠連線到下游裝置。

N9K_Spine01# show ptp brief

PTP port status

--------------------------------------------

Port State

-------------------------------------------

Eth1/31 Slave      >>>>Connected to GM

Eth1/33 Master     >>>>Connected to N9K Spine 2

Eth1/34 Master     >>>>Connected to N9K leaf

N9K_Spine02# show ptp brief

PTP port status

--------------------------------------------

Port State

------------------------------- ------------

Eth1/48 Passive   >>>>Connected to N9K leaf. The Port should be in the passive state to avoid loop

Eth1/50 Master    >>>>Connected to GM02

Eth1/53 Slave     >>>>Connected to N9K Spine 1

N9K_Leaf01# show ptp brief

PTP port status

--------------------------------------------

Port State

------------------------------- ------------

Eth1/48 Master    >>>>Connected to Spine02

Eth1/50 Master    >>>>Connected to host

Eth1/51 Slave     >>>>Connected to Spine01

GM01# show system internal ptp info announce-pkts

2024-01-02T13:36:23.242624000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [TX] If Eth1/35 (0x1a004400): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:37:e9-0x89 CORR:0 (0x0) SEQ:bda4 (48548) Int:1; TS

:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:0 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

2024-01-02T13:36:15.238816000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [TX] If Eth1/35 (0x1a004400): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:37:e9-0x89 CORR:0 (0x0) SEQ:bda0 (48544) Int:1; TS

:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:0 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

N9K_Spine01# show system internal ptp info announce-pkts

2024-01-02T13:36:20.826735000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [TX] If Eth1/33 (0x1a004000): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:3e:9d-0x81 CORR:0 (0x0) SEQ:bbfc (48124) Int:1; TS

:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:1 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

2024-01-02T13:36:17.231080000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [TX] If Eth1/34 (0x1a004200): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:3e:9d-0x85 CORR:0 (0x0) SEQ:bdac (48556) Int:1; TS

:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:1 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

2024-01-02T13:36:16.239728000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [RX] If Eth1/31 (0x1a003c00): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:37:e9-0x89 CORR:0 (0x0) SEQ:bda1 (48545) Int:1; TS

:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:0 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

N9K_Spine02# show system internal ptp info announce-pkts

2024-01-02T13:36:21.368978000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [RX] If Eth1/48 (0x1a005e00): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:4c:77:6d:ff:fe:d5:35:35-0xbd CORR:0 (0x0) SEQ:bcd7 (48343) Int:1; TS

:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

2024-01-02T13:36:19.363095000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [TX] If Eth1/50 (0x1a006200): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:c0:14:fe:ff:fe:89:9b:77-0xc5 CORR:0 (0x0) SEQ:00e8 (232) Int:1; TS:0

s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

2024-01-02T13:36:16.828573000+08:00 [M 1] [ptp] E_DEBUG [ptp_ev_hist_ann_pkt:5469] [RX] If Eth1/53 (0x1a006800): MSG: Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:3e:9d-0x81 CORR:0 (0x0) SEQ:bbfa (48122) Int:1; TS

:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:1 PRIO1:1 PRIO2:1 CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9;

N9K_Leaf01# show system internal ptp info announce-pkts

2024 Jan 02 13:36:23.893622: E_PTP_ANN_PKT_EV[TX] I/f Eth1/50 (0x1a006200): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:4c:77:6d:ff:fe:d5:35:35-0xc5 CORR:0 (0x0) SEQ:1354 (4948) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2

PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

2024 Jan 02 13:36:23.369089: E_PTP_ANN_PKT_EV[TX] I/f Eth1/48 (0x1a005e00): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:4c:77:6d:ff:fe:d5:35:35-0xbd CORR:0 (0x0) SEQ:bcd8 (48344) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2

PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

2024 Jan 02 13:36:23.233889: E_PTP_ANN_PKT_EV[RX] I/f Eth1/51 (0x1a006400): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:3e:9d-0x85 CORR:0 (0x0) SEQ:bdaf (48559) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:1

PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

Host# show system internal ptp info announce-pkts

2024 Jan 02 13:36:23.898218: E_PTP_ANN_PKT_EV[RX] I/f Eth1/50 (0x1a006200): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:4c:77:6d:ff:fe:d5:35:35-0xc5 CORR:0 (0x0) SEQ:1354 (4948) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2

PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

V:2

PTP版本2

LEN:64

PTP消息長度64

D:0

PTP域0

UC:0

0:PTP組播資料包，1:PTP單播資料包

2S:0

也許leap 59/61

UTCVAL:0

UTC偏移量有效標誌。0表示false。GM設定的。

PTPTS:1

PTP TimeScale標誌。1表示true

TT:0

PTP TimeTrace標誌。 0表示false

FT:0

PTP FreqTrace標誌。0表示假

源：

PTP資料包源MAC

CORR:0

更正

序號：

PTP序列ID

INT:1

日誌消息週期。1平均2秒

TS:

時間戳

UTC_OFF

UTC偏移值。 GM設定此值。

TM_SRC

0x20 GPS、0x40 PTP、0x50 NTP、0x60手持裝置0xa內建振盪器。  GM設定此值。

步驟：2

兩步模式下的時鐘操作（N9K在主埠上僅支援兩步模式）

PRIO1:1 PRIO2:1類：248 ACC:fe LOG_VAR:ffff

GM優先順序， GM時鐘等級， GM時鐘精度

GM

GM 時鐘識別.來自mac地址。

驗證PTP域中的父級和祖師資訊

確保父時鐘裝置和特級時鐘裝置穩定。

N9K_Spine01# show ptp parent

Parent Clock:

Parent Clock Identity: 00:ee:ab:ff:fe:67:37:e9       >>>>upstream clock identity. 37:e9 is GM in lab topology

Parent Port Number: 137

Observed Parent Offset (log variance): N/A

Observed Parent Clock Phase Change Rate: N/A

Parent IP: 192.168.1.1                               >>>>upstream clock source IP

Grandmaster Clock:

Grandmaster Clock Identity: 00:ee:ab:ff:fe:67:37:e9  >>>>GM clock identity

Grandmaster Clock Quality:                           >>>>GM clock attributes

Class: 248

Accuracy: 254

Offset (log variance): 65535

Priority1: 1                                         >>>>GM priority1

Priority2: 1

N9K_Spine02# show ptp parent

Parent Clock:

Parent Clock Identity: 00:ee:ab:ff:fe:67:3e:9d>>>upstream clock identity. 37:9d is N9K Spine01 in lab topology

Parent Port Number: 129

Observed Parent Offset (log variance): N/A

Observed Parent Clock Phase Change Rate: N/A

Parent IP: 192.168.1.3                                >>>>upstream clock source IP. 192.168.1.3 is N9K Spine01

Grandmaster Clock:

Grandmaster Clock Identity: 00:ee:ab:ff:fe:67:37:e9

Grandmaster Clock Quality:

Class: 248

Accuracy: 254

Offset (log variance): 65535

Priority1: 1

Priority2: 1

N9K_Leaf01# show ptp parent

PTP PARENT PROPERTIES

Parent Clock:

Parent Clock Identity: 00:ee:ab:ff:fe:67:3e:9d

Parent Port Number: 133

Observed Parent Offset (log variance): N/A

Observed Parent Clock Phase Change Rate: N/A

Parent IP: 192.168.1.3

Grandmaster Clock:

Grandmaster Clock Identity: 00:ee:ab:ff:fe:67:37:e9

Grandmaster Clock Quality:

Class: 248

Accuracy: 254

Offset (log variance): 65535

Priority1: 1

Priority2: 1

驗證PTP糾正和錯誤糾正。

Sync-SeqID必須隨每個條目增加。校正必須小於10000納秒(ns)。

N9K_Spine02# show system internal ptp corrections

PTP past corrections

---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

Slave Port   SUP Time                                   Correction(ns) MeanPath Delay(ns) MasterTimestamp (sec, nsec) Slave Timestamp (sec, nsec) Sync-SeqID   PTPLC ts_corr(ns)

---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

Eth1/53    Wed Jan  3 15:29:05 2024  15928                  -8                 204          1704266945   14551936          1704266945   14552148      31871                   0

Eth1/53    Wed Jan  3 15:29:04 2024 765051                  24                 204          1704266944  764413040          1704266944  764413220    31870                   0

Eth1/53    Wed Jan  3 15:29:04 2024 509436                  24                 204          1704266944  513679576          1704266944  513679756    31869                   0

Eth1/53    Wed Jan  3 15:29:04 2024 264139                   0                 204          1704266944  263204688          1704266944  263204892     31868                   0

Eth1/53    Wed Jan  3 15:29:04 2024  13239                  -8                 204          1704266944   12722952          1704266944   12723164        31867                   0

Eth1/53    Wed Jan  3 15:29:03 2024 762756                  24                 212          1704266943  761756520          1704266943  761756708    31866                   0

錯誤更正記錄

預設情況下，校正閾值為100000納秒(100us)。超出此範圍的更正將記錄為錯誤更正。

N9K_Spine02(config)# show system internal ptp bad-corrections

PTP past corrections

---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

Slave Port   SUP Time                                Correction(ns) MeanPath Delay(ns) MasterTimestamp (sec, nsec) Slave Timestamp (sec, nsec) Sync-SeqID   PTPLC ts_corr(ns)

---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

Eth1/48     Tue Jan  2 13:28:30 2024 692911            17111776               172          1704173310  705666212          1704173310  688554608    52942                   0

Eth1/48     Tue Jan  2 13:28:30 2024 443146            17111808                 172          1704173310  454735796          1704173310  437624160    52941                   0

Eth1/48     Tue Jan  2 13:28:30 2024 188850            17111784                 172          1704173310  203243428          1704173310  186131816    52940                   0

Eth1/48     Tue Jan  2 13:28:29 2024 949432            51292504                 172          1704173309  952419348          1704173309  901127016    52939                   0

有用的集合：

show running-config ptp

show ptp brief

show ptp counters all

show ptp clock

show system internal ptp info all

show system internal ptp info global

show ptp clock foreign-masters record

show system internal ptp corrections entries 2000

show system internal ptp bad-corrections entries 2000

show system internal ptp trouble-shooting all

show tech ptp

常見問題：

Nexus 9000無法與巨型時鐘或上游邊界時鐘同步時間

在大多數情況下，這些是配置問題。

要採取的操作：

1. 檢查所有啟用PTP的裝置上的PTP域號是否相同。確保在所有裝置上配置了唯一的PTP源IP。

show ptp clock

TP Device Type : boundary-clock

PTP Device Encapsulation : NA

PTP Source IP Address : 192.168.1.4

Clock Identity : c0:14:fe:ff:fe:89:9b:77

Clock Domain: 0

Slave Clock Operation : Two-step

Master Clock Operation : Two-step

<snip>

Local clock time : Thu Jan 4 19:34:26 2024

PTP Clock state : Locked

2. 驗證介面上是否已啟用PTP。預設情況下，該選項處於禁用狀態。

N9K_Spine02# show ptp brief

--------------------------------------------

Port State

------------------------------- ------------

Eth1/48 Passive   >>>>Connected to N9K leaf. Port in the passive state to prevent loop

Eth1/50 Master    >>>>Connected to GM02

Eth1/53 Slave     >>>>Connected to N9K Spine 1

3. 檢查PTP介面引數。確保使用的PTP VLAN與對等體相同。

N9K_Spine02# show ptp port interface e1/48

PTP Port Dataset: Eth1/48

Port identity: clock identity: c0:14:fe:ff:fe:89:9b:77

Port identity: port number: 188

PTP version: 2

Port state: Master

VLAN info: 1

Delay request interval(log mean): 0

Announce receipt time out: 3

Peer mean path delay: 0

Announce interval(log mean): 1

Sync interval(log mean): -2

Delay Mechanism: End to End

Cost: 255

Domain: 0

意外的特級大師切換

2024 Jan 4 19:27:05 N9K_Spine02 %PTP-2-PTP_GM_CHANGE: Grandmaster clock has changed from 00:ee:ab:ff:fe:67:37:e9 to c0:14:fe:ff:fe:a3:c4:67 for the PTP protocol

要採取的操作

1. 檢查PTP通告歷史記錄，瞭解優先順序更改或其他時鐘屬性更改。

show system internal ptp info announce-pkts

2024 Jan 04 19:27:07.408293: E_PTP_ANN_PKT_EV[RX] I/f Eth1/48 (0x1a005e00): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:4c:77:6d:ff:fe:d5:35:35-0xbd CORR:0 (0x0) SEQ:3673 (13939) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2 PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

2024 Jan 04 19:27:06.321569: E_PTP_ANN_PKT_EV[RX] I/f Eth1/50 (0x1a006200): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:c0:14:fe:ff:fe:a3:c4:67-0xc9 CORR:0 (0x0) SEQ:0005 (5) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:0 PRIO1:0 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:c0:14:fe:ff:fe:a3:c4:67

2024 Jan 04 19:27:05.427431: E_PTP_ANN_PKT_EV[RX] I/f Eth1/53 (0x1a006800): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:00:ee:ab:ff:fe:67:3e:9d-0x81 CORR:0 (0x0) SEQ:3593 (13715) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:1 PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

2024 Jan 04 19:27:05.407196: E_PTP_ANN_PKT_EV[RX] I/f Eth1/48 (0x1a005e00): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:4c:77:6d:ff:fe:d5:35:35-0xbd CORR:0 (0x0) SEQ:3672 (13938) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2 PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

2024 Jan 04 19:27:04.822821: E_PTP_ANN_PKT_EV[TX] I/f Eth1/50 (0x1a006200): MSG:Announce TS:0 V:2 LEN:64 D:0 UC:0 2S:0 UTCVAL:0 PTPTS:1 TT:0 FT:0 SRC:c0:14:fe:ff:fe:89:9b:77-0xc4 CORR:0 (0x0) SEQ:0506 (1286) Int:1; TS:0 s 0 ns; UTC_OFF:37 TM_SRC:a0 STEP:2  PRIO1:1 PRIO2:1

CLASS:248 ACC:fe LOG_VAR:ffff GM:00:ee:ab:ff:fe:67:37:e9

高錯誤更正

由於缺乏資料，隨機錯誤更正可能很難進行分析。Nexus 9000提供自動日誌功能，可在後端捕獲PTP日誌，而不會影響效能。

要採取的操作：

1.識別錯誤更正。

N9K_Spine02# show system internal ptp bad-corrections entries 2000

---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

Slave Port   SUP Time                                 Correction(ns) MeanPath Delay(ns) MasterTimestamp (sec, nsec) Slave Timestamp (sec, nsec) Sync-SeqID   PTPLC ts_corr(ns)

---------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

Eth1/48     Thu Jan  4 18:41:07 2024 140073            19167640                 172          1704364867  151916416          1704364867  132748948    28473                   0

Eth1/48     Thu Jan  4 18:41:06 2024 889689            19167624                 172          1704364866  901509720          1704364866  882342268    28472                   0

Eth1/48     Thu Jan  4 18:41:06 2024 634900            19167604                 172          1704364866  651177596          1704364866  632010164    28471                   0

Eth1/48     Thu Jan  4 18:41:06 2024 386534            19167636                 172          1704364866  399944588          1704364866  380777124    28470                   0

Eth1/48     Thu Jan  4 18:41:05 2024 732409           425695900                 172          1704364866  148959160          1704364865  723263432    28469                   0

Eth1/48     Thu Jan  4 18:41:05 2024 480431           425695932                 172          1704364865  898386456          1704364865  472690696    28468                   0

Eth1/48     Thu Jan  4 18:41:05 2024 225514           425695908                 172          1704364865  647736096          1704364865  222040360    28467                   0

Eth1/48     Thu Jan  4 18:41:04 2024 977564           425695924                 172          1704364865  396727464          1704364864  971031712    28466                   0

2.啟用PTP自動日誌

test system internal ptp auto-log correction-limit 10000   >> Set a threshold of correction to trigger if the switch starts log collection. In this case, it’s 10000ns

test system internal ptp auto-log file-max-count 5         >> Maximum Auto-log files quantity

no test system internal ptp auto-log file-rollover         >> Disable auto-log rollover

test system internal ptp auto-log                          >> Start auto-log in backend

3.如果發生PTP錯誤更正，則在bootflash中建立PTP日誌。

N9K_Spine02# dir bootflash:

4096 Jan 04 19:57:44 2024 ptp_autolog/

N9K_Spine02# dir ptp_autolog

1115095 Jan 04 19:27:06 2024 auto_ptp_dbg_log_1.log

1099741 Jan 04 19:57:43 2024 auto_ptp_dbg_log_2.log

53631 Jan 04 19:57:43 2024 auto_ptp_dbg_log_3.log

87478 Jan 04 19:57:44 2024 auto_ptp_dbg_log_4.log

在此檔案中，可以找到T1-T4以執行計算。

19:26:56 056993 ptp_calc_mean_path_delay t1/m sec 1704367616 ns 54142980 t2/s sec 1704367616 ns 54143180 t3/ds sec 1704367616 ns 54888476 t4/dm sec 1704367616 ns 54888676 diff corr 0 ns

19:26:57 060081 ptp_calc_mean_path_delay t1/m sec 1704367617 ns 56716444 t2/s sec 1704367617 ns 56716636 t3/ds sec 1704367617 ns 57466060 t4/dm sec 1704367617 ns 57466284 diff corr 0 ns

19:26:58 062591 ptp_calc_mean_path_delay t1/m sec 1704367618 ns 59552956 t2/s sec 1704367618 ns 59553164 t3/ds sec 1704367618 ns 60248804 t4/dm sec 1704367618 ns 60249012 diff corr 0 ns

19:26:59 061974 ptp_calc_mean_path_delay t1/m sec 1704367619 ns 61891376 t2/s sec 1704367619 ns 61891632 t3/ds sec 1704367619 ns 62503968 t4/dm sec 1704367619 ns 62504128 diff corr 0 ns

PTP埠在應該是從屬或被動時處於主狀態

如果PTP埠在RX（接收）路徑端遇到消息交換問題，該埠會變為主狀態。

要採取的操作：

1. 檢查有問題的埠上的PTP RX（接收）計數器是否增master加。

N9K_Spine01# show ptp counters all

PTP Packet Counters of Interface Eth1/31:

----------------------------------------------------------------

Packet Type                  TX                     RX

----------------    --------------------    --------------------

Announce                       0                       3

Sync                           0                      21

FollowUp                       0                      21

Delay Request                  5                       0

Delay Response                 0                       5

2. 如果沒有增加，請檢查SUP重新導向ACL（存取控制清單）的統計資料。

N9K_Spine01# show system internal access-list sup-redirect-stats | in PTP|Slice

Instance: 0  [Unit: 0 Slice: 0]

3118                                PTP EVENT REDIRECT    3358695

3119                        ETH PTP EVENT TX TIMESTAMP    0

3120                            PTP EVENT TX TIMESTAMP    5046146

3167                                  PTP MSG REDIRECT    3088156

3183                          PTP UNICAST MSG REDIRECT    0

3184                        PTP UNICAST EVENT REDIRECT    0

Instance: 1  [Unit: 0 Slice: 1]

3118                                PTP EVENT REDIRECT    0

3119                        ETH PTP EVENT TX TIMESTAMP    0

3120                            PTP EVENT TX TIMESTAMP    0

3167                                  PTP MSG REDIRECT    0

3183                          PTP UNICAST MSG REDIRECT    0

3184                        PTP UNICAST EVENT REDIRECT    0

3. 檢查控制階段管制(CoPP)是否正在丟棄PTP消息。如果這裡有一個投幣計數器，那麼請確認刻度。

N9K_Spine01# show policy-map interface control-plane class copp-system-p-class-redirect

Service-policy  input: copp-system-p-policy-strict

class-map copp-system-p-class-redirect (match-any)

match access-group name copp-system-p-acl-ptp

match access-group name copp-system-p-acl-ptp-l2

match access-group name copp-system-p-acl-ptp-uc

set cos 1

police cir 280 kbps , bc 32000 bytes

module 1 :

transmitted 875343860 bytes;

5-minute offered rate 1650 bytes/sec

conformed 1932 peak-rate bytes/sec

at Thu Jan 04 22:08:20 2024

dropped 0 bytes;                >>>> Check if any counter increasing

5-min violate rate 0 byte/sec

violated 0 peak-rate byte/sec

最佳實踐

- 確保所有內容都位於同一個PTP域中。

- 鏈路兩端的同步、通告和延遲間隔必須匹配。

- CLI命令可確保枝葉接入埠保持狀態，即使收件人配置錯誤或祖母意外連線到此埠下也是如此master :

interface Ethernet1/1

ptp multicast master-only

- 檢視經驗證的可擴充性指南，瞭解交換機每型號的最大埠數量master。

相關資訊

Nexus 9000 PTP配置指南

適用於Cisco Nexus儀表板見解的Precision時間協定(PTP)