目錄

簡介

vPC物件追蹤

網路圖表

基線Show命令

簡介

本文介紹vPC對象跟蹤、使用原因及工作原理。

vPC物件追蹤

網路圖表

以下是用於此演示的網路圖：

vPC對等鏈路是埠通道1。乙太網5/1是vPC對等保持連線鏈路。 每個N7K機箱上都有兩個通過L3 /30鏈路e3/3和e3/4連線的核心路由器。 N5KA和N5KB正在模擬vPC 100和vPC 101上連線的L2交換機vPC。N7KA是vPC主裝置。

基線Show命令

N7KA:

N7KA-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:51:57 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.2 source 1.1.1.1 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KA-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:51:59 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KA-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:24:08

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:26:59

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:48

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:53:17 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.1 source 1.1.1.2 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KB-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:53:20 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KB-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:25:51

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:29:09

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:55

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:56

Tracked by:

Track List  1

N7KB-vdc2#

vPC對象跟蹤用於此類場景。 有一個M132模組用於vPC對等鏈路以及到核心的L3上行鏈路。 如果由於硬體故障而丟失M132模組，您將丟失vPC對等鏈路以及L3上行鏈路。 如果在vPC輔助盒(N7KB)上發生這種情況，這不會造成問題，因為運行中的主對等體將接管暫停運行中的輔助裝置上的vPC埠通道和Vlan介面。 問題在於運行中的主裝置(N7KA)發生硬體故障時。如果未使用對象跟蹤，我們將掛起N7KB上的所有vPC埠通道以及Vlan介面。 對等鏈路也會關閉。 在此案例中，您沒有將核心層流量路由到我們的vPC VLAN的方法。

對象跟蹤通過關閉運行主節點上的vPC來繞過這一點，這樣我們就不會進入這種場景，即關閉盒子上的Vlan介面和vPC埠通道，該盒子具有到核心的其餘上行鏈路。

此處您會看到使用ethanalyzer的vPC對等保持連線消息：

N7KA# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:01:09.629309      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:09.954909      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.639097      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.954944      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KA#

N7KB# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:00:22.606593      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:22.922517      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.616427      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.922557      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KB#

現在，您通過關閉模組電源在N7KA上模擬模組3故障：

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:03:25 N7KA %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

日誌：

N7KA:

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_INITIALIZING: Interface port-channel1 is down (Initializing)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/3 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/4 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel101 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel100 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel101: Ethernet4/7 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel100: Ethernet4/6 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel101: first operational port changed from Ethernet4/7 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel100: first operational port changed from Ethernet4/6 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

N7KB:

2013 Sep 26 20:02:39 N7KB-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:02:40 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:02:40 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/2 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/1 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

現在您處於此狀態。 N7KA是vPC主要對等體，但它停止向N7KB傳送vPC對等體保持連線消息，以便N7KB不會掛起。 N7KB是唯一具有上行鏈路的系統。

附註：N7KB上的E3/4連線到N7KA上的另一個VDC，這也是它發生故障的原因。 重點是，您已在N7KB上跟蹤介面，而在N7KA上未跟蹤，因此它會停止在對等保持連線鏈路上向N7KB傳送消息。

N7KA的Ethanalyzer輸出：

（請注意，在TRACK_INTFS_DOWN系統日誌之後，我們不再向N7KB傳送對等加密鎖，我們僅從1.1.1.2的N7KB接收它們）

2013-09-26 20:03:23.684887      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:23.685766      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.684863      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.685580      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:25 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:03:25 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:03:25.684869      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:25.685771      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.684835      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.685716      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.690661      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.691367      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013-09-26 20:03:28.700594      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:29.700538      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:30.700603      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:31.710665      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:32.720601      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:33.715295      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:34.713112      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:35.713177      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Ethanalyzer輸出(N7KB):

2013-09-26 20:02:36.651007      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:36.651534      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651053      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651644      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.650967      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.651579      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.656523      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.657500      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

(Here we stop receiving keepalive messages from N7KA or 1.1.1.1):

2013-09-26 20:02:40.666531      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:41.666442      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:42.666479      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:43.676461      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:44.686478      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:02:45 N7KB-vdc2 %$ VDC-2 %$ %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013-09-26 20:02:45.681050      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:46.678911      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:47.678918      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:48.678961      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

N7KA:

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  down   success     success                    -

101  Po101  down   success     success                    -

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is DOWN

3 changes, last change 00:20:50

Track List Members:

object 4 DOWN

object 3 DOWN

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:20:50

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:57:10

Track List Members:

object 4 DOWN

object 3 UP

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:22:04

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:22:04

Tracked by:

Track List  1

N7KB-vdc2#

現在您可以還原安裝程式：

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# no poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:26:53 N7KA %PLATFORM-2-PFM_MODULE_POWER_ON: Manual power-on of Module 3  from Command Line Interface

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_DETECT: Module 3 detected (Serial number JAF1703ALTD) Module-Type 10 Gbps Ethernet XL Module Model N7K-M132XP-12L

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_PWRUP: Module 3 powered up (Serial number JAF1703ALTD)

2013 Sep 26 20:26:56 N7KA %PLATFORM-5-MOD_STATUS: Module 3 current-status is MOD_STATUS_POWERED_UP

N7KA:

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary, operational secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

4 changes, last change 00:01:44

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:01:40

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:43

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:44

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 1d00h

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:02:07

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:02:09

Tracked by:

Track List  1

N7KB-vdc2#

有關vPC對等保持連線故障的詳細資訊：

重新運行測試以檢視對等keepalive鏈路發生的情況。

雙向傳送keepalive — 目前一切正常，正常運行：

2013-09-26 20:32:12.532319      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:12.533083      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.532485      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.533147      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

現在再次關閉N7KA上的M132模組3:

2013 Sep 26 20:32:14 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:32:14.532364      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:14.533217      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.532453      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.533158      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.532452      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.536224      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:32:17 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:17 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:16 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:32:17 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

現在您看到只有N7KB(1.1.1.2)正在向N7KA(1.1.1.1)傳送keepalive消息：

2013-09-26 20:32:17.549161      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:18.549352      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:19.549294      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:20.549358      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:21.549303      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:22.549991      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

此處您會看到N7KB上的狀態顯示對等體keepalive已失敗：

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is not reachable through peer-keepalive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#

現在，經過短時間後（90秒），您又開始收到來自N7KA的對等保持連線消息：

<snip>

2013-09-26 20:33:42.630255      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:43.630199      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:44.630263      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:45.640201      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:46.650262      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.652445      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.660318      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.652768      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.653347      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652409      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652705      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652423      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652773      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652401      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652839      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

然後您會看到N7KB上的最新狀態（顯示對等體處於活動狀態）：

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#