目錄

簡介

必要條件

需求

採用元件

背景資訊

問題：在帶有連線的Nexus 2000交換矩陣擴展器的Nexus 7000上，由於LDB分配失敗，VLAN進入掛起狀態。

解決方案

簡介

本檔案將說明在Nexus 7000系列交換器上將M1父卡使用光纖通路擴充模組(FEX)時，如何排解由於配光箱(LDB)分配失敗而暫停的VLAN的疑難。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案中的資訊是根據以下軟體和硬體版本：

- Cisco NX-OS版本6.2(x)

- Cisco Nexus 7000系列交換器

- Cisco Nexus 2000系列光纖通路擴充模組

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

背景資訊

LDB是一個硬體表，它儲存轉發引擎接收的幀的屬性，包括FEX埠通道的中繼到VLAN對映。失敗的LDB分配表示此資料庫已用盡。

當FEX模組連線到N7K-M132XP-12（非XL）時，LDB條目的最大數量約為228k。對於XL模組，限制大約為512K。

總LDB條目是在每個FEX HIF上定義的VLAN範圍的總和（在HIF上定義的最高和最低VLAN之間的差異）。

例如：

switchport trunk allowed vlan 1-4 = 4 LDB條目

switchport trunk allowed vlan 1-4, 70-80, 800 = 800 LDB條目

switchport trunk allowed vlan 200-800 = 600 LDB條目

switchport trunk allowed vlan 200, 800 = 600 LDB條目

如果埠101/1/1到101/1/10配置了switchport trunk allowed vlan 200，則800消耗的LDB條目總數為6000(10x600)。

存取連線埠消耗一個LDB專案（在HIF上定義的存取VLAN）。

使用以下命令檢查每個模組的LDB條目：

N7K-A# attach mod 1

Attaching to module 1 ...

To exit type 'exit', to abort type '$.'

module-1#

module-1# show system internal eltmc info ldb summary

LDB allocation summary:

Max dynamic ldb entries:      203776

Total number of entries:      199680

Number of free entries:       197

Number of free regions:       2

Number of allocated entries:  199483

Number of allocated regions:  280

Number of fail allocations:   21

在此示例中，有21個LDB分配失敗。由於雜湊機制用於將特定條目雜湊到資料庫的特定部分，因此條目總數無需達到最大動態LDB條目數即可看到分配失敗。

此輸出顯示每個埠通道或介面使用的LDB條目數（十六進位制）：

module-1# show system internal eltmc info ldb all

LDB allocation maps :

base          size        allocation

0xd400        0x1000        Shared

0xe400        0x1000        Shared

0xf400        0x1000        Shared

0x10400        0x1000        Ethernet1/4

0x11400        0x1000        Ethernet1/7

0x12400        0x1        Ethernet179/1/30

0x12401        0x1        port-channel1093

0x12402        0x1        port-channel1564

0x12403        0x1        port-channel1550

0x12404        0x1        port-channel1527

0x12405        0x1        port-channel1546

0x12426        0x1        Ethernet169/1/47

0x12427        0x1        Ethernet169/1/48

0x12428        0x1        Ethernet181/1/33

0x12429        0x1        Ethernet181/1/34

0x1242a        0x1        Ethernet163/1/4

0x1242b        0x1        Ethernet163/1/5

0x1242c        0x506        Ethernet183/1/7

0x12932        0x1        port-channel1096

0x12933        0x1        port-channel1095

0x12934        0x1        port-channel1092

0x12935        0x2c8        port-channel1084

0x12bfd        0x506        Ethernet183/1/8

0x13103        0x2c8        port-channel1086

0x133cb        0x1        port-channel1589

0x133cc        0x1        port-channel1063

0x133cd        0x1        port-channel1654

0x133ce        0x1        port-channel1652

0x133d4        0x1        port-channel1520

0x133d5        0x1        port-channel1560

0x133d6        0x1        port-channel1561

0x133d7        0x506        Ethernet167/1/4

0x138dd        0x506        Ethernet167/1/2

0x13de3        0x403        Ethernet165/1/2

0x141e6        0x403        Ethernet151/1/1

<snip>

附註：以上兩個命令在NX-OS 6.0.3和5.2.4中為N7K-M132XP-12（非XL）提供錯誤的LDB值。

NX-OS 5.2.5和6.1將更正此問題。

問題：在帶有連線的Nexus 2000交換矩陣擴展器的Nexus 7000上，由於LDB分配失敗，VLAN進入掛起狀態。

症狀：

1.日誌中的錯誤消息指示LDB分配失敗

2015 Feb  3 00:01:27.260 N7k1 %ETHPORT-5-IF_SEQ_ERROR: Error ("LDB Allocation Failed") communicating with MTS_SAP_ELTM for opcode MTS_OPC_ETHPM_PORT_LOGICAL_BRINGUP (RID_PORT: port-channel1001)

2015 Feb  3 00:01:27.261 N7k1 %ETHPORT-3-IF_ERROR_VLANS_SUSPENDED: VLANs 268,1261-1262,1268 on Interface port-channel1001 are being suspended. (Reason: LDB Allocation Failed)

2.連線到FEX的多台主機連線丟失

3. show interface status err-vlan的輸出顯示VLAN因LDB分配失敗而掛起

N7kA# show interface status err-vlans

--------------------------------------------------------------------------------

Port         Name               Err-Vlans                     Status

--------------------------------------------------------------------------------

Po1001       ***dcn2pclx01a**   268,1261-1262,1268            LDB Allocation

*LOG                                             Failed

解決方案

這是與線路卡相關的硬體限制，因此軟體升級無法解決此問題。

建議從HIF修剪VLAN或減少FEX HIF上的VLAN範圍，以減少LDB條目總數。

每個介面上的每個VLAN例項將使用LDB條目（例如，如果portchannel 1定義了100個VLAN，並且在portchannel中有四個物理埠，則使用的LDB條目總數將為每個埠400個100個例項）。