目錄

概觀

什麼是ARP探測？

疑難排解

因應措施

參考錯誤

概觀

本文檔旨在幫助瞭解和修復錯誤消息的原因。

2013 Oct 25 15:23:17 N7K  %ARP-3-DUP_VADDR_SRC_IP_PROBE:  arp [4650]  Duplicate address Detected. Probe  packet received from 34bd.c8a3.ce30 on Vlan99(port-channel46) with destination set to our local Virtual ip, 10.10.10.1

2013 Oct 25 15:23:35 N7K  %ARP-3-DUP_SRC_IP_PROBE:  arp [4650]  Duplicate address Detected. Probe  packet received from 34bd.c8a3.ce30 on Vlan109(port-channel46) with destination set to our local ip, 10.10.10.2

什麼是ARP探測？

ARP探測是使用全零傳送方IP地址構造的ARP請求。該術語用於IPv4地址衝突檢測規範(RFC 5227)。 在開始使用IPv4地址（無論是通過手動配置、DHCP還是其他某種方式接收的）之前，實施此規範的主機必須通過廣播ARP探測資料包，測試以檢視地址是否已在使用中。[8]

疑難排解

這些ARP探測由屬於該Vlan中沒有SVI的交換機的Mac地址傳送。

進一步調查後，這些是運行IP裝置跟蹤功能的IOS裝置傳送的ARP探測資料包。

以下是資料包的Ethanalyzer捕獲示例：

N7K# ethanalyzer local interface inband capture-filter "ether src 34:bd:c8:a3:ce:30 and arp and host 10.10.10.2" detail

Capturing on inband

Frame 1 (60 bytes on wire, 60 bytes captured)

Arrival Time: Oct 25, 2013 15:28:59.577664000

[Time delta from previous captured frame: 0.000000000 seconds]

[Time delta from previous displayed frame: 0.000000000 seconds]

[Time since reference or first frame: 0.000000000 seconds]

Frame Number: 1

Frame Length: 60 bytes

Capture Length: 60 bytes

[Frame is marked: False]

[Protocols in frame: eth:arp]

Ethernet II, Src: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30), Dst: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

Destination: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

Address: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

.... ..0. .... .... .... .... = LG bit: Globally unique address (factory default)

Source: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30)

Address: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

.... ..0. .... .... .... .... = LG bit: Globally unique address (factory default)

Type: ARP (0x0806)

Trailer: 000000000000000000000000000000000000

Address Resolution Protocol (request)

Hardware type: Ethernet (0x0001)

Protocol type: IP (0x0800)

Hardware size: 6

Protocol size: 4

Opcode: request (0x0001)

[Is gratuitous: False]

Sender MAC address: 34:bd:c8:a3:ce:30 (34:bd:c8:a3:ce:30)

Sender IP address: 0.0.0.0 (0.0.0.0)

Target MAC address: c0:62:6b:ae:03:c1 (c0:62:6b:ae:03:c1)

Target IP address: 10.10.10.2 (10.10.10.2)

因應措施

某些IOS交換機現在預設啟用IP裝置跟蹤功能

要解決此問題，您可以在從以下裝置進入nexus的物理介面上禁用IPDT:

附註：不能全域性禁用，必須為每個介面執行此操作。 如果這是埠通道，您應在埠通道邏輯介面而不是物理介面上配置此設定。

IOSswitch(config)# no ip device tracking

% IP device tracking is disabled at the interface level by removing the relevant configs

IOSswitch(config)# interface gi1/0/1

IOSswitch(config-if)# ip device tracking maximum 0

IOSswitch(config-if)# end

在搭載3.2.3SE的3850上，以下組態會停用該功能：

3850(config)# interface gi1/0/1

3850(config-if)# ip device tracking maximum 1

3850(config-if)# NMSP attach suppress

3850(config-if)# end

3850# wr mem

在搭載3.3.3SE的3850上，以下組態將停用該功能(ip device tracking max 0 works now):

3850(config)# interface gi1/0/1

3850(config-if)# ip device tracking maximum 0

3850(config-if)# NMSP attach suppress

3850(config-if)# end

3850# wr mem

參考錯誤

CSCud96554抑制系統日誌%ARP-3-DUP_VADDR_SRC_IP_PROBE

CSCul20441 在6.2(2)中取消系統日誌%ARP-3-DUP_VADDR_SRC_IP_PROBE