目錄

簡介

拓撲

確定入口轉發引擎

配置觸發器

開始捕獲

解釋結果

其他驗證

簡介

本文檔介紹在Cisco Nexus 7000(N7K)F2模組上執行ELAM的步驟，說明最相關的輸出，並說明如何解釋結果。

提示：有關ELAM的概述，請參閱ELAM概述文檔。

拓撲

在本範例中，VLAN 10(10.1.1.101,MAC位址為0050.56a1.1a01)上的主機(10.1.1.102MAC位址為0050.56a1.1aef)上的連線埠Eth6/3會透過連線埠Eth6/3將網際網路控制訊息通訊協定(ICMP)要求傳送到位於VLAN1010上的主機從10.1.1.101到10.1.1.102的單個幀。請務必記住，ELAM僅允許您捕獲單個幀。

要在N7K上執行ELAM，必須首先連線到相應的模組（這需要網路管理員許可權）：

N7K# attach module 6

Attaching to module 6 ...

To exit type 'exit', to abort type '$.'

module-6#

確定入口轉發引擎

預計流量會進入埠Eth6/4上的交換機。檢查系統中的模組時，您會看到Module 6是F2模組。請務必記住，N7K是全分佈的，並且由模組（而不是管理引擎）為資料平面流量做出轉發決策。

N7K# show module 6

Mod  Ports  Module-Type                 Model              Status

---  -----  --------------------------- ------------------ -------

6    48     1/10 Gbps Ethernet Module   N7K-F248XP-25E     ok

對於F2模組，請使用內部代號Clipper在第2層(L2)轉發引擎(FE)上執行ELAM。請注意，L2 FE資料匯流排(DBUS)包含L2和第3層(L3)查詢之前的原始報頭資訊，而結果匯流排(RBUS)包含L3和L2查詢之後的結果。

N7K F2每個模組有12個FE，因此您必須確定埠Eth6/4上用於FE的Clipper ASIC。輸入以下命令以驗證：

module-6# show hardware internal dev-port-map

--------------------------------------------------------------

CARD_TYPE:         48 port 10G

>Front Panel ports:48

--------------------------------------------------------------

Device name             Dev role              Abbr num_inst:

--------------------------------------------------------------

> Clipper FWD            DEV_LAYER_2_LOOKUP     L2LKP  12

+-----------------------------------------------------------------------+

+----------------+++FRONT PANEL PORT TO ASIC INSTANCE MAP+++------------+

+-----------------------------------------------------------------------+

FP port |  PHYS | MAC_0 | L2LKP | L3LKP | QUEUE |SWICHF

...

3       0       0       0       0       0       0

4       0       0       0       0       0       0

在輸出中，您可以看到埠Eth6/4位於Clipper(L2LKP)例項0上。

module-6# elam asic clipper instance 0

module-6(clipper-elam)# layer2

module-6(clipper-l2-elam)#

配置觸發器

Clipper ASIC支援多種幀型別的ELAM觸發器。ELAM觸發器必須與幀型別對齊。如果該幀是IPv4幀，則觸發器也必須是IPv4。IPv4幀不會通過其他觸發器被捕獲。同樣的邏輯也適用於IPv6。

Clipper ASIC支援以下幀型別：

module-6(clipper-l2-elam)# trigger dbus ?

arp    ARP Frame Format

fc     Fc hdr Frame Format

ipv4   IPV4 Frame Format

ipv6   IPV6 Frame Format

other  L2 hdr Frame Format

pup    PUP Frame Format

rarp   Rarp hdr Frame Format

valid  On valid packet

在Nexus作業系統(NX-OS)中，您可以使用問號字元分離ELAM觸發器。F2模組上有多個可用於ELAM的選項：

module-6(clipper-l2-elam)# trigger dbus ipv4 ingress if ?

<CR>

destination-ipv4-address         destination ipv4 address

destination-mac-address          Inner destination mac address

source-index                     Source index

source-ipv4-address              source ipv4 address

source-mac-address               Inner source mac address

vlan                             Vlan

etc?

在本示例中，根據源和目標IPv4地址捕獲幀，因此僅指定這些值。

Clipper要求為DBUS和RBUS設定觸發器。這與M系列模組不同，因為不需要指定資料包緩衝區(PB)例項。這簡化了RBUS觸發器。

以下是DBUS觸發器：

module-6(clipper-l2-elam)# trigger dbus ipv4 ingress if source-ipv4-address

10.1.1.101 destination-ipv4-address 10.1.1.102

以下是RBUS觸發器：

module-6(clipper-l2-elam)# trigger rbus ingress if trig

開始捕獲

選擇輸入FE並配置觸發器後，即可開始捕獲：

module-6(clipper-l2-elam)# start

若要檢查ELAM的狀態，請輸入status命令：

module-6(clipper-l2-elam)# status

ELAM instance 0: L2 DBUS Configuration: trigger dbus ipv4 ingress if

source-ipv4-address 10.1.1.101 destination-ipv4-address 10.1.1.102

L2 DBUS Armed

ELAM instance 0: L2 RBUS Configuration: trigger rbus ingress if trig

L2 RBUS Armed

FE收到與觸發器匹配的幀後，ELAM狀態顯示為Triggered:

module-6(clipper-l2-elam)# status

ELAM instance 0: L2 DBUS Configuration: trigger dbus ipv4 ingress if

source-ipv4-address 10.1.1.101 destination-ipv4-address 10.1.1.102

L2 DBUS Triggered

ELAM instance 0: L2 RBUS Configuration: trigger rbus ingress if trig

L2 RBUS Triggered

解釋結果

若要顯示ELAM結果，請輸入show dbus 和show rbus命令。以下是ELAM資料中與本示例最相關的摘錄（省略某些輸出）：

module-6(clipper-l2-elam)# show dbus

--------------------------------------------------------------------

L2 DBUS CONTENT - IPV4 PACKET

--------------------------------------------------------------------

...

vlan                : 0xa             destination-index   : 0x0

source-index        : 0x3             bundle-port         : 0x0

sequence-number     : 0x3f            vl                  : 0x0

...

source-ipv4-address: 10.1.1.101

destination-ipv4-address: 10.1.1.102

destination-mac-address: 0050.56a1.1aef

source-mac-address: 0050.56a1.1a01

module-6(clipper-l2-elam)#  show rbus

--------------------------------------------------------------------

L2 RBUS INGRESS CONTENT

--------------------------------------------------------------------

l2-rbus-trigger     : 0x1             sequence-number     : 0x3f

di-ltl-index        : 0x2             l3-multicast-di     : 0x0

source-index        : 0x3             vlan-id             : 0xa

使用DBUS資料，您可以檢驗幀是否在VLAN 10(vlan:0xa)，源MAC地址為0050.56a1.1a01，目的MAC地址為0050.56a1.1aef。您還可以看到，這是源自10.1.1.101且目的地為10.1.1.102的IPv4幀。

提示：此輸出中未包含幾個其他有用欄位，例如服務型別(TOS)值、IP標誌、IP長度和L2幀長度。

若要驗證接收幀的埠，請輸入SRC_INDEX命令(源本地目標邏輯(LTL))。輸入此命令可將LTL對映到N7K的埠或埠組：

N7K# show system internal pixm info ltl 0x3

Type            LTL

---------------------------------

PHY_PORT       Eth6/4

輸出顯示，0x3的source-index對映到埠Eth6/4。這確認在埠Eth6/4上接收到幀。

使用RBUS資料，您可以檢驗幀是否在VLAN 10上交換(vlan-id:0xa)。 此外，您還可以從di-ltl-index（目的地LTL）確認輸出連線埠：

N7K# show system internal pixm info ltl 0x2

Type            LTL

---------------------------------

PHY_PORT       Eth6/3

輸出顯示，0x2的di-ltl-index對映到埠Eth6/3。這確認幀是從埠Eth6/3交換的。

其他驗證

要驗證交換機如何分配LTL池，請輸入show system internal pixm info ltl-region命令。此命令的輸出對於瞭解LTL不與物理埠匹配時的用途很有用。Drop LTL就是一個很好的例子：

N7K# show system internal pixm info ltl 0x11a0

0x11a0 is not configured

N7K# show system internal pixm info ltl-region

LTL POOL TYPE                          SIZE        RANGE

=====================================================================

DCE/FC Pool                            1024       0x0000 to 0x03ff

SUP Inband LTL                           32       0x0400 to 0x041f

MD Flood LTL                              1       0x0420

Central R/W                               1       0x0421

UCAST Pool                             1536       0x0422 to 0x0a21

PC Pool                                1720       0x0a22 to 0x10d9

LC CPU Pool                              32       0x1152 to 0x1171

EARL Pool                                72       0x10da to 0x1121

SPAN Pool                                48       0x1122 to 0x1151

UCAST VDC Use Pool                       16       0x1172 to 0x1181

UCAST Generic Pool                       30       0x1182 to 0x119f

LISP Pool                                 4       0x1198 to 0x119b

Invalid SI                                1       0x119c to 0x119c

ESPAN SI                                  1       0x119d to 0x119d

Recirc SI                                 1       0x119e to 0x119e

Drop DI                                   2       0x119f to 0x11a0

UCAST (L3_SVI_SI) Region                 31       0x11a1 to 0x11bf

UCAST (Fex/GPC/SVI-ES)       3648       0x11c0 to 0x1fff

UCAST Reserved for Future Use Region   2048       0x2000 to 0x27ff

======================> UCAST MCAST BOUNDARY <======================

VDC OMF Pool                             32       0x2800 to 0x281f