目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

相關資訊

簡介

本文說明如何在Nexus 7000系列交換器上設定遠端交換連線埠分析器(RSPAN)作業階段，該作業階段會監控兩個不同Nexus 7000系列交換器上的乙太網連線埠之間的流量。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 具備有關Nexus 7000系列交換機配置的基本知識

- 具備遠端交換連線埠分析器(RSPAN)的基本知識

採用元件

本文檔中的資訊基於Nexus 7000系列NX-OS裝置。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

背景資訊

您可以使用交換式連線埠分析器(SPAN)來分析透過交換器連線埠或VLAN的網路流量，此交換器會將流量的副本傳送到網路分析器連線到交換器的目的地連線埠。

為了擴展SPAN，RSPAN啟用對網路中多台交換器的遠端監控。Nexus 7000系列交換機的使用RSPAN的能力有限。RSPAN VLAN不能用作SPAN目的地。因此，Nexus 7000交換器只能使用RSPAN作為傳輸VLAN或來源VLAN，並從RSPAN VLAN提取資料。無法從Nexus 7000交換機將任何內容置於RSPAN VLAN中。

設定

此配置示例使用兩台不同Nexus 7000系列交換機上的源埠，以及網路分析器所連線的一台Nexus 7000交換機上的目標埠。兩台裝置之間設定了單獨的Ethernet 1/1鏈路：一條鏈路作為span目的地，另一條鏈路作為對RSPAN VLAN的存取。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

此範例使用下表所列的連線埠：

裝置

來源連線埠

目的地連線埠

Nexus 1

Ethernet 2/15和2/16

Ethernet 1/1

Nexus 2

Ethernet 1/1、2/26至2/28

乙太網2/37至2/40

從Nexus 1交換機中，將來自源的SPAN流量傳輸到目的地埠，並將其複製到RSPAN VLAN中。然後，流量會通過鏈路轉發到Ethernet 1/1介面上的Nexus 2交換機。接下來，RSPAN VLAN流量傳送到目的地連線埠，其中裝置(例如SwitchProbe裝置或其他遠端監控(RMON)探測或安全裝置)可以接收和分析封包。

組態

本檔案會使用以下設定：

- Nexus 1

- Nexus 2

Nexus 1

Nexus1#configure terminal

!--- Configure the interface VLAN 15 as RSPAN VLAN.

Nexus1(config)#vlan 15

Nexus1(config-vlan)#remote-span

Nexus1(config-vlan)#exit

!--- Configure the switchport interface as a SPAN destination.

Nexus1(config)#interface ethernet 1/1

Nexus1(config-if)#switchport monitor

Nexus1(config-if)#no shutdown

Nexus1(config-if)#exit

!--- Configure the SPAN session.

Nexus1(config)#monitor session 1

!---Configure the source port.

Nexus1(config-monitor)#source interface ethernet 2/15-16

!--- Configure the destination port.

Nexus1(config-monitor)#destination interface ethernet 1/1

!--- Enable the SPAN session (by default the session is in shutdown state).

Nexus1(config-monitor)#no shut

Nexus1(config-monitor)#exit

Nexus 2

Nexus2#configure terminal

!--- Configuration of interface VLAN 15 as RSPAN VLAN.

Nexus2(config)#vlan 15

Nexus2(config-vlan)#remote-span

Nexus2(config-vlan)#exit

!--- Configure the switchport interface to access in RSPAN VLAN.

Nexus2(config)#interface ethernet 1/1

Nexus2(config-if)#switchport mode access

Nexus2(config-if)#switchport access vlan 15

Nexus2(config-if)#no shutdown

Nexus2(config-if)#exit

!--- Configure the switchport interfaces as a SPAN destination.

Nexus2(config)#interface ethernet 2/37-40

Nexus2(config-if)#switchport monitor

Nexus2(config-if)#exit

!--- Configure the SPAN session.

Nexus2(config)#monitor session 1

!--- Configure the source port.

Nexus2(config-monitor)#source interface ethernet 2/26-28

Nexus2(config-monitor)#source vlan 15

!--- Configure the destination port.

Nexus2(config-monitor)#destination interface ethernet 2/37-40

!--- Enable the SPAN session (by default the session is in shutdown state).

Nexus2(config-monitor)#no shut

Nexus2(config-monitor)#exit

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

以下是一些SPAN和RSPAN驗證命令：

Nexus 1:

- 使用show monitor 命令以顯示RSPAN作業階段的狀態。

Nexus1# show monitor

Session  State        Reason                  Description

-------  -----------  ----------------------  --------------------------------

1        up           The session is up

- 使用show monitor session [session_number] 命令以顯示ERSPAN作業階段組態。

Nexus1# show monitor session 1

session 1

---------------

type              : local

state             : up

source intf       :

rx            : Eth1/15       Eth1/16

tx            : Eth1/15       Eth1/16

both          : Eth1/15       Eth1/16

source VLANs      :

rx            :

tx            :

both          :

filter VLANs      : filter not specified

destination ports : Eth1/1

Legend: f = forwarding enabled, l = learning enabled

- 使用show monitor session all 命令以顯示裝置中的所有ERSPAN作業階段組態。

Nexus 2:

- 使用show monitor 命令以顯示ERSPAN作業階段的狀態。

Nexus2# show monitor

Session  State        Reason                  Description

-------  -----------  ----------------------  --------------------------------

1        up           The session is up

- 使用show monitor session [session_number] 命令以顯示ERSPAN作業階段組態。

Nexus2# show monitor session 1

session 1

---------------

type              : local

state             : up

source intf       :

rx            : Eth1/21       Eth1/22       Eth1/23

tx            : Eth1/21       Eth1/22       Eth1/23

both          : Eth1/21       Eth1/22       Eth1/23

source VLANs      :

rx            : 15

tx            : 15

both          : 15

filter VLANs      : filter not specified

destination ports : Eth1/27       Eth1/28       Eth1/29       Eth1/30

Legend: f = forwarding enabled, l = learning enabled

相關資訊

- 交換器連線埠分析器(SPAN)支援頁面

- 遠端交換連線埠分析器(RSPAN)支援頁面

- Cisco Nexus 7000系列交換器支援頁面

- 交換器產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems