目錄

簡介

使用率

CVR-QSFP-SFP10G介面卡支援的10Gbps和1Gbps光纖清單

C9600-LC-24C線路卡前面板埠佈局和埠對映

CVR-QSFP-SFP10G介面卡的限制

簡介

本檔案介紹Catalyst 9600平台上C9600-LC-24C線路卡上的CVR-QSFP-SFP10G介面卡的用法和限制。

使用率

C9600平台上的C9600-LC-24C線卡具有24個支援40G和100G光纖的QSFP埠。您不能在這些埠上直接插入基於SFP的10Gbps或1Gbps光纖。

CVR-QSFP-SFP10G介面卡為C9600平台上的C9600-LC-24C線卡基於QSFP的埠提供使用基於SFP的10Gbps或1Gbps光纖的靈活性。

CVR-QSFP-SFP10G介面卡支援的10Gbps和1Gbps光纖清單

Sl編號

光纖

速度

最低Cisco® IOS-XE版本

1

SFP-10G-SR

10Gbps

16.11.1

2

SFP-10G-SR-S

10Gbps

16.11.1

3

SFP-10G-LR

10Gbps

16.11.1

4

SFP-10G-LR-S

10Gbps

16.11.1

5

SFP-10G-ER

10Gbps

16.11.1

6

SFP-10G-ER-S

10Gbps

16.11.1

7

SFP-10G-ZR

10Gbps

16.11.1

8

SFP-10G-ZR-S

10Gbps

16.11.1

9

DWDM-SFP10G-xxx

10Gbps

16.11.1

10

SFP-H10GB-CU1M

10Gbps

16.11.1

11

SFP-H10GB-CU3M

10Gbps

16.11.1

12

SFP-H10GB-CU5M

10Gbps

16.11.1

13

GLC-T*

1Gbps

16.12.2/17.1.1

14

GLC-TE*

1Gbps

16.12.2/17.1.1

15

GLC-LH-SMD

1Gbps

16.12.2/17.1.1

16

GLC-SX-MMD

1Gbps

16.12.2/17.1.1

* CVR-QSFP-SFP10G介面卡不支援GLC-T和GLC-TE的10Mbps和100Mpbs速度。CVR-QSFP-SFP10G介面卡僅支援GLC-T和GLC-TE的1Gbps速度。

C9600-LC-24C線路卡前面板埠佈局和埠對映

1/25

3/27

5/29

7/31

9/33

11/35

13/37

15/39

17/41

19/43

21/45

23/47

2/26

4/28

6/30

8/32

10/34

12/36

14/38

16/40

18/42

20/44

22/46

24/48

這些CLI可用於檢查埠對映。其操作速度模式和物理到虛擬埠編號（對於100Gbps介面）：

show hw-module subslot x/0 port-group mapping

show hw-module subslot x/0 port-group operation-mode

show hw-module subslot x/0 port-group port-numbering

其中x是線路卡插槽編號。

輸出示例：

Switch#show hw-module subslot 1/0 port-group mapping

Port Group Mapping for slot 1

Port-Group Ports

1 Fo1/0/1, Fo1/0/2, Hu1/0/25

2 Fo1/0/3, Fo1/0/4, Hu1/0/27

3 Fo1/0/5, Fo1/0/6, Hu1/0/29

4 Fo1/0/7, Fo1/0/8, Hu1/0/31

5 Fo1/0/9, Fo1/0/10, Hu1/0/33

6 Fo1/0/11, Fo1/0/12, Hu1/0/35

7 Fo1/0/13, Fo1/0/14, Hu1/0/37

8 Fo1/0/15, Fo1/0/16, Hu1/0/39

9 Fo1/0/17, Fo1/0/18, Hu1/0/41

10 Fo1/0/19, Fo1/0/20, Hu1/0/43

11 Fo1/0/21, Fo1/0/22, Hu1/0/45

12 Fo1/0/23, Fo1/0/24, Hu1/0/47

Switch#show hw-module subslot 1/0 port-group operation-mode

Module 1 port group 1 is running in HundredGigabitEthernet mode

Module 1 port group 2 is running in FortyGigabitEthernet mode

Module 1 port group 3 is running in FortyGigabitEthernet mode

Module 1 port group 4 is running in FortyGigabitEthernet mode

Module 1 port group 5 is running in FortyGigabitEthernet mode

Module 1 port group 6 is running in FortyGigabitEthernet mode

Module 1 port group 7 is running in HundredGigabitEthernet mode

Module 1 port group 8 is running in HundredGigabitEthernet mode

Module 1 port group 9 is running in HundredGigabitEthernet mode

Module 1 port group 10 is running in HundredGigabitEthernet mode

Module 1 port group 11 is running in HundredGigabitEthernet mode

Module 1 port group 12 is running in HundredGigabitEthernet mode

Switch#show hw-module subslot 1/0 port-group port-numbering

Physical Port Mapping for slot 1

Physical-Port Mapped-Port

1 Hu1/0/25

2 Hu1/0/26

3 Hu1/0/27

4 Hu1/0/28

5 Hu1/0/29

6 Hu1/0/30

7 Hu1/0/31

8 Hu1/0/32

9 Hu1/0/33

10 Hu1/0/34

11 Hu1/0/35

12 Hu1/0/36

13 Hu1/0/37

14 Hu1/0/38

15 Hu1/0/39

16 Hu1/0/40

17 Hu1/0/41

18 Hu1/0/42

19 Hu1/0/43

20 Hu1/0/44

21 Hu1/0/45

22 Hu1/0/46

23 Hu1/0/47

24 Hu1/0/48

CVR-QSFP-SFP10G介面卡的限制

- CVR-QSFP-SFP10G介面卡不得安裝在偶數埠上，其中對應的奇數埠具有40GE光纖。例如，如果埠1具有40GE光纖，則不得在埠2中安裝CVR-QSFP-SFP10G。

- CVR-QSFP-SFP10G介面卡不得安裝在具有啟用配置的任何埠上。例如，CVR-QSFP-SFP10G介面卡不得安裝在配置為在100GE中運行的埠上。