目錄

簡介

必要條件

需求

採用元件

相關產品

背景資訊

影片

高效能安裝

限制

安裝步驟

驗證

頻寬測試

網路圖表

方法1:切換為客戶端

方法2:PC作為客戶端

相關資訊

簡介

本文說明如何在Catalyst 9000系列交換器上使用iPerf執行頻寬測試。

必要條件

需求

思科建議您瞭解以下主題：

- Catalyst 9000系列交換器上的應用託管

- Linux

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- C9300

- Cisco IOS® XE 17.3.5

- Cisco IOS® XE 17.6.4

附註：有關在其他思科平台上啟用這些功能的命令，請參閱相應的配置指南。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

相關產品

本文件也適用於以下硬體和軟體版本：

- C9300X

- C9400

背景資訊

iPerf3是主動測量IP網路上最大可達成頻寬的工具。iPerf使用TCP和UDP的不同容量來提供頻寬統計資訊。

附註：有關此工具的更多資訊，請參閱iPerf官方文檔。

影片

高效能安裝

限制

- 應用託管不是虛擬路由和轉發感知（VRF感知）。

- 在Cisco IOS® XE Amsterdam 17.3.3之前的版本中，應用程式託管需要專用儲存分配，並在bootflash上禁用。

- 在Cisco IOS® XE Amsterdam 17.3.3及更高版本中，在bootflash上啟用應用程式託管，但僅託管思科簽名的應用程式。

- 不支援前面板通用串列匯流排(USB)棒。

- Cisco Catalyst 9300系列交換機僅支援經思科認證的後面板USB。

- Cisco Catalyst 9500 — 高效能系列交換機和Cisco Catalyst 9600系列交換機不支援應用託管的前面板USB。

- Cisco Catalyst 9500和9500高效能系列交換機和Cisco Catalyst 9600系列交換機不支援AppGigabitEthernet介面。

- 在Cisco IOS® XE Bengaluru 17.5.1之前的版本中，Cisco Catalyst 9410R交換機不支援應用託管。

- 在AppGigabitEthernet介面上配置enable命令，以啟用Cisco Catalyst 9410R交換機上的應用託管。

安裝步驟

1. 下載最新的iPerf映像，並驗證其是否已儲存到USB SSD中：

C9300-AC1#dir usbflash1:/

Directory of usbflash1:/

12      -rw-          6043136  Jan 26 2023 21:55:35 +00:00  iPerf.tar

2.為iPerf連線選擇一個VLAN或配置新的VLAN:

C9300-AC1(config)#interface vlan 10

C9300-AC1(config-if)#ip add 192.168.10.11 255.255.255.0

3.配置AppGigabitEthernet介面：

C9300-AC1(config)#int Ap1/0/1

C9300-AC1(config-if)#switchport mode trunk

4.配置iPerf docker並將其與VLAN關聯：

C9300-AC1(config)#app-hosting appid iPerf

C9300-AC1(config-app-hosting)#app-vnic AppGigabitEthernet trunk

C9300-AC1(config-config-app-hosting-trunk)#vlan 10 guest-interface 0

C9300-AC1(config-config-app-hosting-vlan-access-ip)#guest-ipaddress 192.168.10.21 netmask 255.255.255.0

5.將為iPerf連線選擇的SVI的IP配置為應用程式的預設網關：

C9300-AC1(config)#app-hosting appid iPerf

C9300-AC1(config-app-hosting)#app-default-gateway 192.168.10.11 guest-int

6.啟動IOX服務並使用特權EXEC命令running驗證它show iox-service是否處於狀態：

C9300-AC1(config)#iox

C9300-AC1(config)#do show iox-service

IOx Infrastructure Summary:

---------------------------

IOx service (CAF)              : Running

IOx service (HA)               : Running

IOx service (IOxman)           : Not Ready

IOx service (Sec storage)      : Not Running

Libvirtd 5.5.0                 : Running

Dockerd 18.03.0                : Running

Sync Status                    : Disabled

7.從SSD安裝iPerf應用程式並驗證是否已部署：

C9300-AC1#app-hosting install appid iPerf package usbflash1:iPerf.tar

Installing package 'usbflash1:iPerf.tar' for 'iPerf'. Use 'show app-hosting list' for progress.

C9300-AC1#show app-hosting list

App id                                   State

---------------------------------------------------------

iPerf                                    DEPLOYED

8.啟用並啟動iPerf應用程式：

C9300-AC1#app-hosting activate appid iPerf

iPerf activated successfully

Current state is: ACTIVATED

C9300-AC1#show app-hosting list

App id                                   State

---------------------------------------------------------

iPerf                                    ACTIVATED

C9300-AC1#app-hosting start appid iPerf

iPerf started successfully

Current state is: RUNNING

C9300-AC1#

C9300-AC1#show app-hosting list

App id                                   State

---------------------------------------------------------

iPerf                                    RUNNING

附註：當iPerf處於狀running態時，預設情況下它會作為伺服器運行。

驗證

若要驗證應用程式詳細資訊，可以使用許可權show app-hosting utilization appid [app-name]EXEC指令：

C9300-AC1#show app-hosting detail appid iPerf

App id                 : iPerf

Owner                  : iox

State                  : RUNNING

Application

Type                 : docker

Name                 : mlabbe/iperf3

Version              : latest

Description          :

Author               :

Path                 : usbflash1:iPerf.tar

URL Path             :

Activated profile name : default

Resource reservation

Memory               : 409 MB

Disk                 : 10 MB

CPU                  : 1480 units

CPU-percent          : 20 %

VCPU                 : 1

Platform resource profiles

Profile Name                  CPU(unit)  Memory(MB)  Disk(MB)

--------------------------------------------------------------

Attached devices

Type              Name               Alias

---------------------------------------------

serial/shell     iox_console_shell   serial0

serial/aux       iox_console_aux     serial1

serial/syslog    iox_syslog          serial2

serial/trace     iox_trace           serial3

Network interfaces

---------------------------------------

eth0:

MAC address         : 52:54:dd:d2:df:af

IPv4 address        : 192.168.10.21

IPv6 address        : ::

Network name        : mgmt-bridge-v10

Docker

------

Run-time information

Command              :

Entry-point          : iperf3 -s

Run options in use   :

Package run options  :

Application health information

Status               : 0

Last probe error     :

Last probe output    :

若要驗證應用使用情況，可以使用特權show app-hosting utilization appid [app-name]EXEC命令：

C9300-AC1# show app-hosting utilization appid iPerf

Application: iPerf

CPU Utilization:

CPU Allocation: 1480 units

CPU Used:       0.00 %

CPU Cores:

Memory Utilization:

Memory Allocation: 409 MB

Memory Used:       1064 KB

Disk Utilization:

Disk Allocation: 10 MB

Disk Used:       0.00 MB

若要驗證應用容器中的詳細資訊，可以使用特權app-hosting connect appid [app-name] sessionEXEC指令：

C9300-AC1#app-hosting connect appid iPerf session

/ $

/ $ #Verify IP address assigned

/ $

/ $ ifconfig

eth0

inet addr:192.168.10.21  Bcast:0.0.0.0  Mask:255.255.255.0

/ $

/ $ #Verify iPerf is running as server

/ $

/ $ ps

PID   USER     TIME  COMMAND

1 iperf     0:00 iperf3 -s

390 iperf     0:00 /bin/sh

398 iperf     0:00 ps

/ $

頻寬測試

網路圖表

執行頻寬測試的方法基於以下網路圖：

附註：iPerf安裝部分的配置示例來自同一實驗室環境。

為以上裝置分配IP地址：

C9300-AC1

C9300-AC2

SVI 192.168.10.11

iPerf 192.168.10.21

SVI 192.168.10.12

iPerf 192.168.10.22

附註：這些示例中使用的所有裝置都位於同一個VLAN域VLAN 10中。

方法1:切換為客戶端

在本示例中，測量從C9300-AC1到C9300-AC2的頻寬。C9300-AC1是使用者端。

1.運行命令以app-hosting connect appid iPerf session輸入應用容器提示：

C9300-AC1#app-hosting connect appid iPerf session

/ $

2.進入應用容器提示符後，使iperf3 -c用命令啟動頻寬測試：

/ $ iperf3 -c 192.168.10.22

Connecting to host 192.168.10.22, port 5201

[  5] local 192.168.10.21 port 34906 connected to 192.168.10.22 port 5201

[ ID] Interval           Transfer     Bitrate         Retr  Cwnd

[  5]   0.00-1.00   sec   114 MBytes   955 Mbits/sec    2    833 KBytes

[  5]   1.00-2.00   sec   113 MBytes   947 Mbits/sec    3    923 KBytes

[  5]   2.00-3.00   sec   111 MBytes   934 Mbits/sec   77    974 KBytes

[  5]   3.00-4.00   sec   113 MBytes   945 Mbits/sec    1   1.03 MBytes

[  5]   4.00-5.00   sec   112 MBytes   940 Mbits/sec  109   1.08 MBytes

[  5]   5.00-6.00   sec   111 MBytes   931 Mbits/sec  395    820 KBytes

[  5]   6.00-7.00   sec   111 MBytes   933 Mbits/sec  198    882 KBytes

[  5]   7.00-8.00   sec   112 MBytes   944 Mbits/sec    2    970 KBytes

[  5]   8.00-9.00   sec   111 MBytes   933 Mbits/sec    9   1.02 MBytes

[  5]   9.00-10.00  sec   111 MBytes   933 Mbits/sec  524   1.04 MBytes

- - - - - - - - - - - - - - - - - - - - - - - - -

[ ID] Interval           Transfer     Bitrate         Retr

[  5]   0.00-10.00  sec  1.09 GBytes   940 Mbits/sec  1320             sender

[  5]   0.00-10.01  sec  1.09 GBytes   937 Mbits/sec                  receiver

iperf Done.

/ $

3.測試完成後，鍵入exit返回交換機CLI。

附註：由於iPerf在預設情況下作為伺服器運行，因此伺服器端不需要進一步的命令。

方法2:PC作為客戶端

在本示例中，測量從主機A到C9300-AC2（iPerf伺服器）的頻寬。

1. 確保已在PC中下載iPerf。

2. 在PC中儲存iPerf後，從命令提示符導航到iperf3.exe:

C:\Users\user\Downloads\iperf-3.1.3-win64\iperf-3.1.3-win64>iperf3.exe

3.在您的PC上使用-c選項。這表示PC是客戶端：

C:\Users\user\Downloads\iperf-3.1.3-win64\iperf-3.1.3-win64>iperf3.exe -c 192.168.10.22

Connecting to host 192.168.10.22, port 5201

[  4] local 192.168.10.2 port 56009 connected to 192.168.10.22 port 5201

[ ID] Interval           Transfer     Bandwidth

[  4]   0.00-1.00   sec   109 MBytes   916 Mbits/sec

[  4]   1.00-2.00   sec  0.00 Bytes  0.00 bits/sec

[  4]   2.00-3.00   sec  0.00 Bytes  0.00 bits/sec

[  4]   3.00-4.00   sec  93.6 MBytes   786 Mbits/sec

[  4]   4.00-5.00   sec  15.1 MBytes   127 Mbits/sec

[  4]   5.00-6.02   sec  0.00 Bytes  0.00 bits/sec

[  4]   6.02-7.00   sec  78.2 MBytes   666 Mbits/sec

[  4]   7.00-8.00   sec  42.9 MBytes   360 Mbits/sec

[  4]   8.00-9.00   sec  0.00 Bytes  0.00 bits/sec

[  4]   9.00-10.00  sec  49.4 MBytes   414 Mbits/sec

- - - - - - - - - - - - - - - - - - - - - - - - -

[ ID] Interval           Transfer     Bandwidth

[  4]   0.00-10.00  sec   388 MBytes   326 Mbits/sec              sender

[  4]   0.00-10.00  sec   388 MBytes   326 Mbits/sec              receiver

iperf Done.

提示：對於傳統方法，您需要使用2台PC，一台用作伺服器，一台用作客戶端。對於用作伺服器的PC，請使用iperf3.exe -s命令。

相關資訊

- Cisco Catalyst 9000系列交換機上的應用託管白皮書

- 可程式設計性配置指南，Cisco IOS® XE班加羅爾17.6.x

- 使用Catalyst 9300應用程式託管進行網路效能監控