目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

安裝和配置新Supervisor

驗證

疑難排解

Supervisor引擎之間的軟體不匹配

相關資訊

簡介

本文提供在Cisco Catalyst 6500虛擬交換系統中替換壞管理器的逐步程式。

虛擬交換系統(VSS)包括兩個Catalyst 6500機箱。每個機箱都配備一個管理引擎。如果其中一個Supervisor因硬體故障而終止，則帶有預設配置的替換Supervisor不會自動成為VSS成員。這個新的Supervisor最初在獨立模式下啟動，它需要VSS配置才能在VSS模式下啟動。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 將有效映像從活動VSS Supervisor複製到緊湊快閃記憶體裝置。

- 將活動VSS配置複製到緊湊快閃記憶體裝置（可以相同）。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

Cisco IOS®軟體版本12.2(33)SXH1或更新版本上的Cisco Catalyst 6500虛擬交換系統1440

本文中的資訊是根據特定實驗室環境內的裝置所建立。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

新的Supervisor要求您使用有效的映像和配置進行引導。映像可以與TFTP或精簡型快閃裝置一起複製。如果快閃記憶體不可用，也可以使用TFTP複製軟體映像和配置檔案。

1. 將有效映像從活動VSS Supervisor複製到緊湊快閃記憶體裝置。

VSS#dir sup-bootdisk:

Directory of sup-bootdisk:/

1 -rwx 117668516 Jan 22 2008 11:53:58 +00:00 s72033-

ipservices_wan-vz.122-33.SXH1

2 -rwx 33554432 Aug 16 2007 12:40:22 +00:00 sea_log.dat

3 -rwx 7366 Aug 22 2007 20:05:42 +00:00 default-config

請注意，在VSS模式下，主用和備用管理引擎運行相同版本的軟體映像。

VSS#copy sup-bootdisk:s72033-ipservices_wan-vz.122-33.SXH1 disk0:

Destination filename [s72033-ipservices_wan-vz.122-33.SXH1]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

!--- Output suppressed.

2. 將當前配置從活動VSS Supervisor複製到緊湊快閃記憶體裝置。

VSS#copy running-config disk0:

Destination filename [startup-config]?

11196 bytes copied in 0.712 secs (15725 bytes/sec)

網路圖表

本檔案會使用以下網路設定：

交換機2管理引擎故障

安裝和配置新Supervisor

完成以下步驟以安裝和配置新Supervisor:

1. 在機箱中安裝新的Supervisor，如果Supervisor上行鏈路用於VSL，則以物理方式連線它們。從快閃記憶體啟動映像。

2. 清除新Supervisor的啟動配置檔案。要確保新Supervisor中不存在過時的配置，需要執行此步驟。

3. 將先前複製到快閃記憶體裝置的軟體映像複製到新的supervisor sup-bootdisk:

Router#copy disk0:s72033-ipservices_wan-vz.122-33.SXH1 sup-bootdisk:

Destination filename [s72033-ipservices_wan-vz.122-33.SXH1]?

Copy in progress ..CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

117668516 bytes copied in 332.283 secs (354121 bytes/sec)

!--- Output suppressed.

!--- If you choose to download software image from a tftp server, connect one of the switch interfaces to the network in order to have connectivity to the tftp server. Configure IP address to the management interface; verify the connectivity between the switch and the tftp server.

!--- The management IP address should be different from what is already assigned to active VSS switch. !--- Configure management IP address

Router(config)#interface gig 1/3

Router(config-if)#ip address 10.10.10.100 255.255.255.0

Router(config-if)#no shutdown

!--- verify Management interface status and configuration

Router#show interface gig 1/3

GigabitEthernet1/3 is up, line protocol is up (connected)

Hardware is C6k 1000Mb 802.3, address is 0005.dce7.8180

(bia 0005.dce7.8180)

Internet address is 10.10.10.100/24

!--- Output omitted !--- If the TFTP server and switch management interface are not in the same layer-3 subnet, add a (default) route.

Router(config)#ip route 0.0.0.0 0.0.0.0 10.10.10.1

!--- verify IP connectivity between switch and TFTP server

Router#ping 10.20.20.200

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.20.20.200, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

!---Copy the new software image into supervisor bootflash:

Router#copy tftp: sup-bootdisk:

Address or name of remote host []? 10.20.20.200

Source filename []? s72033-ipservices_wan-vz.122-33.SXH1

Destination filename [s72033-ipservices_wan-vz.122-33.SXH1]?

Copy in progress ..CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

!--- Output omitted

4. 將先前儲存在快閃記憶體裝置上的活動Supervisor配置複製到新的Supervisor啟動配置檔案中。

Router#copy disk0:VSS.cfg startup-config

Destination filename [startup-config]?

11196 bytes copied in 7.460 secs (1501 bytes/sec)

Router#

註：此步驟至關重要，因為新增了引導正確的IOS軟體映像所需的VSS配置和任何引導變數。

!--- Highlighted VSS configuration commands are critical to boot up the supervisor in VSS mode. !--- Verify VSS configuration in the startup-config file

Router#more nvram:startup-config

!

hostname VSS

boot system flash sup-bootdisk:s72033-ipservices_wan-vz.122-33.SXH1

!--- Switch Virtual domain

is configured with respective switch priorities

switch virtual domain 1

switch mode virtual

!--- this command gets populated upon converting standalone switch to VSS mode. Make sure this command is part the configuration.

switch 1 priority 110

switch 2 priority 100

!--- Verify Virtual Switch Link (VSL) configuration

interface Port-channel1

no switchport

no ip address

switch virtual link 1

mls qos trust cos

no mls qos channel-consistency

!

interface Port-channel2

no switchport

no ip address

switch virtual link 2

mls qos trust cos

no mls qos channel-consistency

!--- Physical interfaces that are part of VSL

interface TenGigabitEthernet1/1/4

no switchport

no ip address

mls qos trust cos

channel-group 1 mode on

interface TenGigabitEthernet1/1/5

no switchport

no ip address

mls qos trust cos

channel-group 1 mode on

interface TenGigabitEthernet2/1/4

no switchport

no ip address

mls qos trust cos

channel-group 2 mode on

interface TenGigabitEthernet2/1/5

no switchport

no ip address

mls qos trust cos

channel-group 2 mode on

5. 配置用於識別虛擬交換域中Catalyst 6500交換機的VSS Switch_ID。因為VSS只能包含兩台交換機，所以您需要根據活動交換機上定義的值選擇1或2。不能使用1或2以外的任何值。

!--- Verify active Switch_ID on the active switch

Router#switch read switch_num local

Read switch_num from Active rommon is 1

!--- Note that since Switch_ID=1 is used for active switch, we would define Switch_ID=2 in the new supervisor.

!--- Configure the Switch_ID on the supervisor.

!--- Below command sets a Switch_ID ROMMON variable. It is used during VSS boot up to identify a switch within a VSS domain. !--- Note that the Switch_ID doesn’t dictate the state (active vs. standby) of the supervisor.

Router#switch set switch_num 2 local

Set rommon's switch_num to 2

!--- Verify the Switch_ID configuration on the new supervisor.

Router#switch read switch_num local

Read switch_num from Active rommon is 2

6. 重新載入交換機，以便重新載入時，交換機以VSS模式啟動。

注意：此時不要將運行配置儲存到啟動配置。如果這樣做，啟動配置將被預設配置覆蓋，並且交換機不會在VSS模式下啟動。

CLI輸出示例：

Router# reload

System configuration has been modified. Save? [yes/no]: no

Proceed with reload? [confirm]

00:25:07: %SYS-5-RELOAD: Reload requested by console.

Reload Reason: Reload Command.

00:26:49: %SYS-SP-3-LOGGER_FLUSHING:

System pausing to ensure console debugging output.

00:26:49: %OIR-SP-6-CONSOLE:

Changing console ownership to switch processor

!--- Output omitted !--- SP booting up, pay attention to the name of the image being loaded by SP

System Bootstrap, Version 8.5(1)

Copyright (c) 1994-2006 by cisco Systems, Inc.

Cat6k-Sup720/SP processor with 1048576 Kbytes of main memory

Autoboot executing command: “ boot system flash

sup-bootflash:s72033-ipservices_wan-vz.122-33.SXH1”

Loading image, please wait ...

Initializing ATA monitor library...

Self decompressing the image :

######################################

#####################################

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software, s72033_sp Software

(s72033_sp-IPSERVICES_WAN-VM),

Version 12.2(33)SXH1, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2008 by Cisco Systems, Inc.

Compiled Thu 17-Jan-08 04:38 by prod_rel_team

Image text-base: 0x01020150, data-base: 0x01021000

!--- VSS configuration pre-parsed during bootup

System detected Virtual Switch configuration...

Interface TenGigabitEthernet 2/8/4 is member of Portchannel 2

!--- output omitted

Initializing as Virtual Switch STANDBY processor

!--- VSL module ( supervisor in this scenario) brought up and role is resolved as standby since there is already a active VSS switch.

00:00:30: %VSL_BRINGUP-6-MODULE_UP:

VSL module in slot 8 switch 2 brought up

00:00:57: %VSLP-5-VSL_UP:

Ready for Role Resolution with Switch=1,

MAC=0014.1bc6.1c00 over 8/4

00:01:01: %VSLP-5-RRP_ROLE_RESOLVED:

Role resolved as STANDBY by VSLP

00:01:01: %VSL-5-VSL_CNTRL_LINK: New VSL Control Link 8/4

!--- RP is booting up

System Bootstrap, Version 12.2(17r)SX5, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2006 by cisco Systems, Inc.

Cat6k-Sup720/RP platform with 1048576 Kbytes of main memory

Download Start

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software, s72033_rp Software (s72033_rp-IPSERVICES_WAN-VM),

Version 12.2(33)SXH1, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2008 by Cisco Systems, Inc.

Compiled Thu 17-Jan-08 04:04 by prod_rel_team

Image text-base: 0x01020150, data-base: 0x01021000

!--- output omitted

Press RETURN to get started!

!--- Look out for –- “%PFREDUN-SW2_SPSTBY-6-STANDBY: Initializing for SSO mode” in the active console to make sure stadby is running in SSO mode. !--- After standby boots up it’s console is locked

VSS-sdby>

Standby console disabled

VSS-sdby>

Standby console disabled

注意：要在多個子網上配置VSS，不需要在VSS上進行備用配置。網關路由器應設定為VLAN SVI。

驗證

目前沒有適用於此組態的驗證程序。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

Supervisor引擎之間的軟體不匹配

如果Supervisor引擎之間存在軟體不匹配，則獨立Supervisor在RPR冗餘模式（不處於SSO冗餘模式）下啟動，並且VSS沒有完全初始化。

為了解決此問題，請確保備用Supervisor的快閃記憶體中存在所需的軟體，且引導語句指向正確的軟體。重新載入獨立Supervisor，使其使用正確的軟體啟動並加入VSS。

相關資訊

- Cisco Catalyst 6500虛擬交換系統1440

- LAN 產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems