目錄

簡介

必要條件

需求

採用元件

相關產品

慣例

背景資訊

設定

網路圖表

Cisco IOS配置

CatOS配置

驗證

疑難排解

Polycom IP電話引起的生成樹環路

相關資訊

簡介

本文提供在Catalyst交換器上用於連線到Polycom IP Conference Station 7935/7936和Polycom SoundPoint IP 430的組態範例。本檔案不包括電源線上和服務品質(QoS)組態。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- IP電話配置

有關詳細資訊，請參閱Cisco IP Conference Station 7935快速入門手冊或Cisco Unified IP Conference Station 7936電話指南。

- 虛擬LAN組態

如需詳細資訊，請參閱虛擬LAN/VLAN主幹協定(VLAN/VTP) — 簡介。

採用元件

本檔案中的資訊是根據搭載Supervisor引擎720且執行Cisco IOS®軟體版本12.2(18)SXD6的Cisco Catalyst 6500系列交換器（搭載Supervisor引擎2）和執行Cisco CatOS軟體版本8.4(4)的Cisco Catalyst 6500系列交換器。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

相關產品

此組態也可用於執行Cisco IOS軟體的Cisco Catalyst交換器（Cisco 2900XL和3500XL系列除外）。CatOS設定可用於執行Catalyst OS軟體的任何Cisco Catalyst交換器。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

背景資訊

本文檔介紹在交換機埠上連線PC和IP電話Polycom SoundPoint IP 430的交換機的配置。本文檔還介紹了連線到Polycom IP Conference Station 7935/7936交換機埠的交換機的配置。

Polycom IP Conference Station 7935/7936具有通過RJ-45電纜介面連線到網路的10/100BaseTx乙太網LAN連線，與其他Cisco Unified IP電話7900系列不同，它沒有10/100BaseTx乙太網LAN連線以便連線到PC。

由於沒有在Cisco 7935/7936 IP會議電話上連線到10/100BaseTx乙太網LAN連線的PC的規定，語音或輔助VLAN的概念不直接適用，而且會導致問題。Cisco IP Conference Station 7935/7936已使用單個10/100BaseTx乙太網LAN連線將此裝置連線到交換機埠。由於此連線僅傳輸語音流量，因此交換機埠應屬於單個VLAN。

Polycom SoundPoint IP 430具有兩個10/100 Mbps乙太網埠。一個埠連線到交換機，另一個埠連線到PC。在此連線中，連線埠會傳送以下兩個VLAN的流量：

- 資料(PC)流量

- 語音（IP電話）流量

在此案例中，您需要一個中繼連線埠來傳遞多個VLAN的流量。

註：Polycom IP Conference Station 7935/7936沒有外部電源，因此交換機必須通過其PoE埠供電，或者需要使用獨立的電源饋電器。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

Cisco IOS配置

本檔案會使用以下設定：

- Catalyst 6500

原生Cisco IOS模式下的Catalyst 6500

Cat6500#show running-config

Building configuration...

Current configuration : 5869 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat6500

!

boot system sup-bootflash:s72033-psv-mz.122-18.SXD6.bin

main-cpu

auto-sync standard

ip subnet-zero

!

!

no ip finger

!

!

!

!

vlan 1

name DataVlan

!

vlan 2

name VoiceVlan

!

interface FastEthernet4/1

no ip address

switchport

switchport trunk encapsulation dot1q

switchport trunk native vlan 1

switchport trunk allowed vlan 1,2

switchport mode trunk

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a !--- Layer 2 access port. Otherwise, you create a network loop. !--- Refer to Using Portfast and Other Commands to Fix Workstation Startup !--- Connectivity Delays for more information on how to enable portfast.

!

interface FastEthernet4/2

no ip address

switchport

switchport access vlan 2

switchport mode access

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a Layer 2 access port. Otherwise, you create a network loop.

!

interface FastEthernet4/3

no ip address

shutdown

!

!--- Output suppressed.

!

ip classless

no ip http server

!

!

!

line con 0

transport input none

line vty 0 4

!

end

CatOS配置

本示例說明在交換機埠上連線PC和IP電話Polycom SoundPoint IP 430的混合模式下交換機的配置。本文檔還介紹了連線到Polycom IP Conference Station 7935/7936交換機埠的交換機的配置。此組態使用的圖與先前的範例相同。

混合模式的Catalyst 6500

!--- Set the VLAN Trunk Protocol (VTP) mode. !--- In this example, the mode is set to transparent. !--- Dependent upon your network, set the VTP mode accordingly. !--- Refer to Understanding and Configuring VLAN Trunk Protocol (VTP) !--- for more information on VTP.

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 4/2 to VLAN 2.

Catalyst6500> (enable) set vlan 2 4/2

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     4/2

!--- Enable trunking on port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Vlan(s) 1,2 already allowed on the trunk

Please use the 'clear trunk' command to remove vlans from allowed list.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable)

!--- Enable spanning tree portfast on the ports. Refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays !--- for more information on how to enable portfast.

Catalyst6500> (enable) set spantree portfast 4/1 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/1 fast start enabled.

Catalyst6500> (enable) set spantree portfast 4/2 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/2 fast start enabled.

Catalyst6500> (enable)

!--- If you want to ONLY allow VLAN 1 and VLAN 2 on trunk port 4/1, do this. !--- A trunk port allows all VLANs by default.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

Catalyst6500> (enable) clear trunk 4/1 1-4094

Removing Vlan(s) 1-4094 from allowed list.

Port  4/1 allowed vlans modified to none.

!--- Allow only VLAN 1 and VLAN 2 on trunk port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Adding vlans 1,2 to allowed list.

Port(s)  4/1 allowed vlans modified to 1,2.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1,2

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

!--- Refer to Configuring Ethernet VLAN Trunks for more !--- information on how to configure trunk ports.

!--- Issue the show config

command !--- in order to check the configuration.

Catalyst6500> (enable) show config 4

This command shows non-default configurations only.

Use 'show config <mod> all' to show both default and non-default configurations.

.................................

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Jun 21 2007, 23:37:51

!

# default port status is enable

!

!

#module 4 : 16-port 1000BaseX Ethernet

set vlan 2    4/2

clear trunk 4/1  1-9,11-39,41-4094

set trunk 4/1  on dot1q 1,2

set spantree portfast    4/1-2 enable

end

Catalyst6500> (enable)

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

Polycom IP電話引起的生成樹環路

將IP電話連線到交換機時，可能會遇到STP環路，這會導致交換機的CPU利用率達到100%。即使IP電話連線的交換機埠上啟用了portfast，也可能會發生STP環路。

1. 檢查交換機埠配置。如果IP電話所連線的連線埠進入err-disabled狀態，且沒有實體回圈，您可以嘗試將連線埠從err-disabled狀態中復原。如需詳細資訊，請參閱Cisco IOS平台上的錯誤停用連線埠狀態復原。

2. 若要避免連線埠在終端使用者有誤建立實體回圈風險時進入err-disabled狀態，可以啟用err-disable復原，這樣就不需要手動重設連線埠來停用。有關STP環路防護的詳細資訊，請參閱使用環路防護和BPDU遲滯檢測功能的生成樹協定增強功能。

相關資訊

- 配置IOS Catalyst交換機以連線Cisco IP電話的配置示例

- 瞭解Cisco IP電話10/100乙太網路內電源檢測演算法

- 瞭解Catalyst 6500/6000交換器上的IP電話內電源布建

- LAN 產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems