目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

網路圖表

配置SW1

配置SW2

驗證

疑難排解

簡介

本文說明如何設定和驗證具有輸出反射器的Cisco TrustSec(CTS)。

必要條件

需求

思科建議您瞭解CTS解決方案的基本知識。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- IOS版本15.0(01)SY上搭載Supervisor引擎2T的Catalyst 6500交換器

- IXIA流量產生器

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

背景資訊

CTS是一種支援身份的網路訪問架構，可幫助客戶實現安全合作、增強安全性和滿足合規性要求。它還提供可擴展的基於角色的策略實施基礎架構。封包是根據封包來源在網路入口處的群組成員身分來標籤。當這些資料包通過網路時，將應用與組關聯的策略。

配備管理引擎2T和6900系列線卡的Catalyst 6500系列交換機為實施CTS提供完整的硬體和軟體支援。為了支援CTS功能，新的6900系列線卡上使用了專用應用專用積體電路(ASIC)。傳統線卡沒有這些專用ASIC，因此不支援CTS。

CTS反射器使用Catalyst交換器連線埠分析器(SPAN)將流量從無CTS的交換模組反射到Supervisor引擎，以進行安全群組標籤(SGT)指派和插入。

在具有第3層上行鏈路的分佈交換機上實現CTS出口反射器，其中，不支援CTS的交換模組面向接入交換機。它支援集中轉發卡(CFC)和分散式轉發卡(DFC)。

設定

網路圖表

配置SW1

使用以下命令在通往SW2的上行鏈路上配置CTS手冊：

SW1(config)#int t1/4

SW1(config-if)#ip address 10.10.10.1 255.255.255.0

SW1(config-if)#no shutdown

SW1(config-if)#cts manual

SW1(config-if-cts-manual)#propagate sgt

SW1(config-if-cts-manual)#policy static sgt 11 trusted

SW1(config-if-cts-manual)#exit

SW1(config-if)#exit

配置SW2

使用以下命令在交換器上啟用輸出反射器：

SW2(config)#platform cts egress

SW2#write memory

Building configuration...

[OK]

SW2#reload

附註：必須重新載入交換器，才能啟用輸出反射器模式。

使用以下命令在連線到SW1的埠上配置CTS Manual:

SW2(config)#int t1/4/4

SW2(config-if)#ip address 10.10.10.2 255.255.255.0

SW2(config-if)#no shutdown

SW2(config-if)#cts manual

SW2(config-if-cts-manual)#propagate sgt

SW2(config-if-cts-manual)#policy  static sgt 10 trusted

SW2(config-if-cts-manual)#exit

SW2(config-if)#exit

在SW2上為來自IXIA的源IP地址10.10.10.10配置靜態SGT。

SW2(config)#cts role-based sgt-map 10.10.10.10 sgt 11

驗證

使用本節內容，確認您的組態是否正常運作。

可以使用以下命令檢視當前CTS模式：

SW2#show platform cts

CTS Egress mode enabled

使用以下命令可以檢視CTS鏈路狀態：

show cts interface summary

檢驗兩台交換機上的IFC狀態是否為OPEN。輸出應如下所示：

SW1#show cts interface summary

Global Dot1x feature is Enabled

CTS Layer2 Interfaces

---------------------

Interface  Mode    IFC-state dot1x-role peer-id    IFC-cache    Critical-Authentication

-----------------------------------------------------------------------------

Te1/4      MANUAL  OPEN      unknown    unknown    invalid      Invalid

SW2#show cts interface summary

Global Dot1x feature is Enabled

CTS Layer2 Interfaces

---------------------

Interface  Mode    IFC-state dot1x-role peer-id    IFC-cache    Critical-Authentication

-----------------------------------------------------------------------------

Te1/4/4    MANUAL  OPEN      unknown    unknown    invalid      Invalid

通過Netflow輸出驗證

可以使用以下命令配置Netflow:

SW1(config)#flow record rec2

SW1(config-flow-record)#match ipv4 protocol

SW1(config-flow-record)#match ipv4 source address

SW1(config-flow-record)#match ipv4 destination address

SW1(config-flow-record)#match transport source-port

SW1(config-flow-record)#match transport destination-port

SW1(config-flow-record)#match flow direction

SW1(config-flow-record)#match flow cts source group-tag

SW1(config-flow-record)#match flow cts destination group-tag

SW1(config-flow-record)#collect routing forwarding-status

SW1(config-flow-record)#collect counter bytes

SW1(config-flow-record)#collect counter packets

SW1(config-flow-record)#exit

SW1(config)#flow monitor mon2

SW1(config-flow-monitor)#record rec2

SW1(config-flow-monitor)#exit

將Netflow套用在SW1交換器的輸入介面上：

SW1#sh run int t1/4

Building configuration...

Current configuration : 165 bytes

!

interface TenGigabitEthernet1/4

no switchport

ip address 10.10.10.1 255.255.255.0

ip flow monitor mon2 input

cts manual

policy static sgt 11 trusted

end

驗證傳入資料包是否在SW1交換機上標籤SGT。

SW1#show flow monitor mon2 cache format table

Cache type:                               Normal

Cache size:                                 4096

Current entries:                               0

High Watermark:                                0

Flows added:                                   0

Flows aged:                                    0

- Active timeout      (  1800 secs)          0

- Inactive timeout    (    15 secs)          0

- Event aged                                 0

- Watermark aged                             0

- Emergency aged                             0

There are no cache entries to display.

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               0

There are no cache entries to display.

Module 35:

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               0

There are no cache entries to display.

Module 34:

Cache type:                               Normal

Cache size:                                 4096

Current entries:                               0

High Watermark:                                0

Flows added:                                   0

Flows aged:                                    0

- Active timeout      (  1800 secs)          0

- Inactive timeout    (    15 secs)          0

- Event aged                                 0

- Watermark aged                             0

- Emergency aged                             0

There are no cache entries to display.

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               0

There are no cache entries to display.

Module 33:

Cache type:                               Normal

Cache size:                                 4096

Current entries:                               0

High Watermark:                                0

Flows added:                                   0

Flows aged:                                    0

- Active timeout      (  1800 secs)          0

- Inactive timeout    (    15 secs)          0

- Event aged                                 0

- Watermark aged                             0

- Emergency aged                             0

There are no cache entries to display.

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               0

There are no cache entries to display.

Module 20:

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               2

IPV4 SRC ADDR    IPV4 DST ADDR    TRNS SRC PORT  TRNS DST PORT  FLOW DIRN  FLOW CTS SRC GROUP TAG  FLOW CTS DST GROUP TAG  IP PROT  ip fwd status  bytes        pkts

===============  ===============  =============  =============  =========  ======================  ======================  =======  =============  ==========  ==========

10.10.10.10      10.10.20.10                  0              0  Input                          11                       0      255  Unknown        375483970     8162695

10.10.10.2       224.0.0.5                    0              0  Input                           4                       0       89  Unknown        6800          85

Module 19:

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               0

There are no cache entries to display.

Module 18:

Cache type:                               Normal

Cache size:                                 4096

Current entries:                               0

High Watermark:                                0

Flows added:                                   0

Flows aged:                                    0

- Active timeout      (  1800 secs)          0

- Inactive timeout    (    15 secs)          0

- Event aged                                 0

- Watermark aged                             0

- Emergency aged                             0

There are no cache entries to display.

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               0

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。