目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

配置示例1:隊列頻寬

組態範例2:頻寬和緩衝區

驗證

疑難排解

簡介

本文說明如何設定、驗證和疑難排解Cisco Catalyst 6800ia主機連線埠上的服務品質(QoS)。Cisco IOS®軟體版本152.1.SY中的6800ia主機連線埠以及Catalyst 6800父虛擬交換系統(VSS)上的更高版本支援QoS。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco IOS®軟體版本152.1.SY

- Cisco Catalyst 6800父VSS

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

背景資訊

Catalyst 6800ia上的配置模式已禁用，並且6800ia主機埠的所有QoS配置都必須從父埠完成。6800ia主機埠的QoS使用策略對映進行配置。應用到介面時，此策略對映在內部將相關配置推送到6800ia，然後對硬體隊列進行程式設計。

6800ia主機埠在傳輸(TX)方向具有1p3q3t體系結構。本文中的所有組態範例僅適用於6800ia上的TX佇列。

當處於預設狀態的6800ia介面上不存在顯式QoS配置時，6800ia主機介面看起來與以下示例輸出類似：

6880-VSS#show run int gi101/1/0/1

interface GigabitEthernet101/1/0/1

switchport

switchport trunk allowed vlan 500

switchport mode access

switchport access vlan 500

load-interval 30

end

6880-VSS#show queueing interface gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:  100[queue 2] 100[queue 3] 100[queue 4]   0[queue 5]

queue-limit ratios:     15[Pri Queue]  25[queue 2]  40[queue 3]  20[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32 33 40 41 42 43 44 45 46 47

1     2

1     3

2     1      16 17 18 19 20 21 22 23 26 27 28 29 30 31 34 35 36 37 38 39

2     2      24

2     3      48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

3     1      25

3     2

3     3      0 1 2 3 4 5 6 7

4     1      8 9 11 13 15

4     2      10 12 14

4     3

設定

配置示例1:隊列頻寬

此範例顯示如何設定6800ia TX佇列的頻寬：

1. 設定class-maps以便對相關流量進行分類：
class-map type lan-queuing match-any ltest

match dscp 32

class-map type lan-queuing match-any ltest1

match dscp 24

class-map type lan-queuing match-any ltest2

match dscp default

2. 為已配置的類分配優先順序和頻寬：
policy-map type lan-queuing ltest

class type lan-queuing ltest

priority

class type lan-queuing ltest1

bandwidth remaining percent 30

class type lan-queuing ltest2

bandwidth remaining percent 20

class class-default

3. 將策略對映應用於6800ia介面：
附註：將lan-queueing policy-map套用到6800ia堆疊上的一個連線埠時，會將變更傳播到堆疊中的所有連線埠。

6880-VSS#conf t

6880-VSS(config)#int gi101/1/0/1

6880-VSS(config-if)#service-policy type lan-queuing output ltest

Propagating [attach] lan queueing policy "ltest" to Gi101/1/0/1 Gi101/1/0/2 Gi101/1/0/3

Gi101/1/0/4 Gi101/1/0/5 Gi101/1/0/6 Gi101/1/0/7 Gi101/1/0/8 Gi101/1/0/9 Gi101/1/0/10

Gi101/1/0/12 Gi101/1/0/13 Gi101/1/0/14 Gi101/1/0/15 Gi101/1/0/16 Gi101/1/0/17

Gi101/1/0/18 Gi101/1/0/19 Gi101/1/0/20 Gi101/1/0/21 Gi101/1/0/22 Gi101/1/0/23

Gi101/1/0/24 Gi101/1/0/25 Gi101/1/0/26 Gi101/1/0/27 Gi101/1/0/28 Gi101/1/0/29

Gi101/1/0/30 Gi101/1/0/31 Gi101/1/0/32 Gi101/1/0/33 Gi101/1/0/34 Gi101/1/0/35

Gi101/1/0/36 Gi101/1/0/37 Gi101/1/0/38 Gi101/1/0/39 Gi101/1/0/40 Gi101/1/0/41

Gi101/1/0/42 Gi101/1/0/43 Gi101/1/0/44 Gi101/1/0/45 Gi101/1/0/46 Gi101/1/0/47 Gi101/1/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/2/0/1 Gi101/2/0/2

Gi101/2/0/3 Gi101/2/0/4 Gi101/2/0/5 Gi101/2/0/6 Gi101/2/0/7 Gi101/2/0/8

Gi101/2/0/9 Gi101/2/0/10 Gi101/2/0/11 Gi101/2/0/12 Gi101/2/0/13 Gi101/2/0/14

Gi101/2/0/15 Gi101/2/0/16 Gi101/2/0/17 Gi101/2/0/18 Gi101/2/0/19 Gi101/2/0/20

Gi101/2/0/21 Gi101/2/0/22 Gi101/2/0/23 Gi101/2/0/24 Gi101/2/0/25 Gi101/2/0/26

Gi101/2/0/27 Gi101/2/0/28 Gi101/2/0/29 Gi101/2/0/30 Gi101/2/0/31 Gi101/2/0/32

Gi101/2/0/33 Gi101/2/0/34 Gi101/2/0/35 Gi101/2/0/36 Gi101/2/0/37 Gi101/2/0/38

Gi101/2/0/39 Gi101/2/0/40 Gi101/2/0/41 Gi101/2/0/42 Gi101/2/0/43 Gi101/2/0/44

Gi101/2/0/45 Gi101/2/0/46 Gi101/2/0/47 Gi101/2/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/3/0/1 Gi101/3/0/2

Gi101/3/0/3 Gi101/3/0/4 Gi101/3/0/5 Gi101/3/0/6 Gi101/3/0/7 Gi101/3/0/8

Gi101/3/0/9 Gi101/3/0/10 Gi101/3/0/11 Gi101/3/0/12 Gi101/3/0/13 Gi101/3/0/14

Gi101/3/0/15 Gi101/3/0/16 Gi101/3/0/17 Gi101/3/0/18 Gi101/3/0/19 Gi101/3/0/20

Gi101/3/0/21 Gi101/3/0/22 Gi101/3/0/23 Gi101/3/0/24 Gi101/3/0/25 Gi101/3/0/26

Gi101/3/0/27 Gi101/3/0/28 Gi101/3/0/29 Gi101/3/0/30 Gi101/3/0/31 Gi101/3/0/32

Gi101/3/0/33 Gi101/3/0/34 Gi101/3/0/35 Gi101/3/0/36 Gi101/3/0/37 Gi101/3/0/38

Gi101/3/0/39 Gi101/3/0/40 Gi101/3/0/41 Gi101/3/0/42 Gi101/3/0/43 Gi101/3/0/44

Gi101/3/0/45 Gi101/3/0/46 Gi101/3/0/47 Gi101/3/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/4/0/1 Gi101/4/0/2

Gi101/4/0/3 Gi101/4/0/4 Gi101/4/0/5 Gi101/4/0/6 Gi101/4/0/7 Gi101/4/0/8

Gi101/4/0/9 Gi101/4/0/10 Gi101/4/0/11 Gi101/4/0/12 Gi101/4/0/13 Gi101/4/0/14

Gi101/4/0/15 Gi101/4/0/16 Gi101/4/0/17 Gi101/4/0/18 Gi101/4/0/19 Gi101/4/0/20

Gi101/4/0/21 Gi101/4/0/22 Gi101/4/0/23 Gi101/4/0/24 Gi101/4/0/25 Gi101/4/0/26

Gi101/4/0/27 Gi101/4/0/28 Gi101/4/0/29 Gi101/4/0/30 Gi101/4/0/31 Gi101/4/0/32

Gi101/4/0/33 Gi101/4/0/34 Gi101/4/0/35 Gi101/4/0/36 Gi101/4/0/37 Gi101/4/0/38

Gi101/4/0/39 Gi101/4/0/40 Gi101/4/0/41 Gi101/4/0/42 Gi101/4/0/43 Gi101/4/0/44

Gi101/4/0/45 Gi101/4/0/46 Gi101/4/0/47 Gi101/4/0/48

6880-VSS(config-if)#

6880-VSS(config-if)#end

4. 驗證policy-map是否已應用：
6880-VSS#show run int gi101/1/0/1

interface GigabitEthernet101/1/0/1

switchport

switchport trunk allowed vlan 500

switchport mode access

switchport access vlan 500

load-interval 30

service-policy type lan-queuing output ltest

end

5. 檢查到隊列對映、頻寬和緩衝區分配以及到差分服務代碼點(DSCP)對映的類對映：
6880-VSS#show queueing int gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Class-map to Queue in Tx direction

Class-map           Queue Id

----------------------------

ltest                     1

ltest1                    4

ltest2                    3

class-default             2

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:   50[queue 2]  20[queue 3]  30[queue 4]

queue-limit ratios:     15[Pri Queue] 100[queue 2] 100[queue 3] 100[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32

1     2

1     3

2     1      1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22

23 25 26 27 28 29 30 31 33 34 35 36 37 38 39 40 41 42 43

44 45 46 47 48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

2     2

2     3

3     1      0

3     2

3     3

4     1      24

4     2

4     3

6. 再次檢查6800ia的緩衝區和頻寬分配：
附註：如果不為特定類指定緩衝區權重，則預設情況下需要100%。

隊列1:15 / [15+100+100+100] = 4

隊列2:100 / [15+100+100] ~ 31

還衍生出其他隊列的權重。

6880-VSS#remote command fex 101 show mls qos int gi1/0/1 buffer

GigabitEthernet1/0/1

The port is mapped to qset : 1

The allocations between the queues are : 4 31 31 34

6880-VSS#remote command fex 101 show mls qos int gi1/0/1 queueing

GigabitEthernet1/0/1

Egress Priority Queue : enabled

Shaped queue weights (absolute) :  0 0 0 0

Shared queue weights  :  0 127 51 76

The port bandwidth limit : 100  (Operational Bandwidth:100.0)

The port is mapped to qset : 1

7. 驗證相關流量是否在各自的隊列中入隊，以及是否存在任何丟棄：
6880-VSS#remote command fex 101 show mls qos int gi1/0/1 statistic

GigabitEthernet1/0/1 (All statistics are in packets)

dscp: incoming

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0            0

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0            0            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0           13            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

dscp: outgoing

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0      9118500

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0       516236            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0           20            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

cos: incoming

-------------------------------

0 -  4 :         106            0            0            0            0

5 -  7 :           0            0            0

cos: outgoing

-------------------------------

0 -  4 :          41            0            0      9118505       516236

5 -  7 :           0            0            0

output queues enqueued:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:      516255          35           5

queue 1:          12           0           0

queue 2:           0           0           0

queue 3:     9118520           0           0

output queues dropped:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:           0           0           0

queue 1:           0           0           0

queue 2:           0           0           0

queue 3:       49823            0           0

Policer: Inprofile:            0 OutofProfile:            0

組態範例2:頻寬和緩衝區

此範例顯示如何為6800ia TX佇列設定頻寬和緩衝區：

1. 在示例1中建立的策略對映中，可以指定隊列緩衝區分配，如以下示例所示：
附註：如果不為特定類指定緩衝區權重，則預設情況下需要100%。

policy-map type lan-queuing ltest

class type lan-queuing ltest

priority

queue-buffers ratio 15

class type lan-queuing ltest1

bandwidth remaining percent 30

queue-buffers ratio 30

class type lan-queuing ltest2

bandwidth remaining percent 20

queue-buffers ratio 40

class class-default

queue-buffer ratio 15

2. 檢查到隊列對映、頻寬和緩衝區分配以及隊列到DSCP對映的類對映：
6880-VSS#sh queueing int gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Class-map to Queue in Tx direction

Class-map           Queue Id

----------------------------

ltest                     1

ltest1                    4

ltest2                    3

class-default             2

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:   50[queue 2]  20[queue 3]  30[queue 4]

queue-limit ratios:     15[Pri Queue]  15[queue 2]  40[queue 3]  30[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32

1     2

1     3

2     1      1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21

22 23 25 26 27 28 29 30 31 33 34 35 36 37 38 39 40 41

42 43 44 45 46 47 48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

2     2

2     3

3     1      0

3     2

3     3

4     1      24

4     2

4     3

3. 再次檢查6800ia的緩衝區和頻寬分配：
6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 queueing

GigabitEthernet1/0/1

Egress Priority Queue : enabled

Shaped queue weights (absolute) :  0 0 0 0

Shared queue weights  :  0 127 51 76

The port bandwidth limit : 100  (Operational Bandwidth:100.0)

The port is mapped to qset : 1

6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 buffers

GigabitEthernet1/0/1

The port is mapped to qset : 1

The allocations between the queues are : 15 15 40 30

4. 驗證相關流量是否在各自的隊列中入隊，以及是否存在任何丟棄：
6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 statistic

GigabitEthernet1/0/1 (All statistics are in packets)

dscp: incoming

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0            0

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0            0            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0          491            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

dscp: outgoing

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0     57864687

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0     29364400            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0          775            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

cos: incoming

-------------------------------

0 -  4 :        5323            0            0            0            0

5 -  7 :           0            0            0

cos: outgoing

-------------------------------

0 -  4 :        1718            0            0     57864691     29364400

5 -  7 :           0            0            0

output queues enqueued:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:    29365402        1883           5

queue 1:         793          98           0

queue 2:           0           0           0

queue 3:   530554174           0           0

output queues dropped:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:           0          10           0

queue 1:           1       24093           0

queue 2:           0           0           0

queue 3:     2309351           0           0

Policer: Inprofile:            0 OutofProfile:            0

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

輸出直譯器工具(僅供已註冊客戶使用)支援某些show命令。使用輸出直譯器工具來檢視show命令輸出的分析。

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

1. 從6800ia CLI為qos-manager啟用debug。確保日誌被重定向到緩衝區，並且日誌緩衝區設定為高數：
6880-VSS#attach fex 101

Attach FEX:101 ip:192.168.1.101

Trying 192.168.1.101 ... Open

????????FEX-101>en

Password: cisco

FEX-101#

FEX-101#debug platform qos-manager all

QM verbose debugging is on

QM cops debugging is on

QM events debugging is on

QM Statistics debugging is on

FEX-101#exit

[Connection to 192.168.1.101 closed by foreign host]

2. 配置policy-map以觸發調試：
6880-VSS#conf t

6880-VSS(config)#int gi101/1/0/1

6880-VSS(config-if)# service-policy type lan-queuing output ltest

Propagating [attach] lan queueing policy "ltest" to Gi101/1/0/1

Gi101/1/0/2 Gi101/1/0/3 Gi101/1/0/4 Gi101/1/0/5 Gi101/1/0/6 Gi101/1/0/7 Gi101/1/0/8

Gi101/1/0/9 Gi101/1/0/10 Gi101/1/0/12 Gi101/1/0/13 Gi101/1/0/14 Gi101/1/0/15 Gi101/1/0/16

<snip>

6880-VSS(config-if)#end

3. 檢查交換矩陣擴展器(FEX)上的日誌以檢查調試：
6880-VSS#remote command fex 101 show log

<snip>

May 20 06:43:18.208: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

****Setting Priority Queue (FEX-101)

May 20 06:43:18.208: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:18.208: HQM: hulc_f

_fex_qos_priority_handler:QueueNum=1 PriorityQueue=1 queuetype=2 thresholdsnum=3 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/1 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/2 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/3 (FEX-101)

<snip>

hulc_fex_qos_srr_weight_setting:****Setting weight for queues**** (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

QueueNum=1 RRType=0 WeightRelative=0 WeightAbsolute=0 (FEX-101)

20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

ratio is 0 for queue 1 (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

QueueNum=2 RRType=0 WeightRelative=33 WeightAbsolute=0 (FEX-101)

<snip>

20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: **Setting buffer for output queues** (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: hulc_fex_qos_buffer_conf:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: hulc_fex_qos_buffer_conf:

queuenum=1 size=15 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=2 size=25 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=3 size=40 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=4 size=20 (FEX-101)

May 20 06:43:19.110: HQM: hqm

20 06:43:19.113: HQM: s88g_qd_get_queue_threshold: s88g_qd_get_queue_threshold:

max_limit = 3200, set to 350. (FEX-101)

May 20 06:43:19.113: HQM: s88g_qd_get_queue_threshold: s88g_qd_get_queue_threshold:

max_limit = 3200, set to 350. (FEX-101)

<snip>

hulc_fex_qos_qthresh_map:****Setting dscp to output queue map**** (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map:

subopcode=2 startport=0 endport=0 size=1 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map: DscpBma

20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=32 iterator=0 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=33 iterator=1 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=40 iterator=2 (FEX-101)

<snip>