目錄

簡介

必要條件

需求

採用元件

慣例

CatOS 和 Cisco IOS 系統軟體之間的差異

Catalyst 6500/6000 CatOS和Cisco IOS軟體映像

瞭解CatOS和Cisco IOS軟體的軟體映像名稱慣例

CatOS和Cisco IOS軟體之間的預設系統差異

瞭解Cisco IOS系統軟體中的介面

Cisco IOS軟體中的介面（連線埠）模式

配置L2乙太網介面

埠配置和狀態CatOS/Cisco IOS命令表

瞭解range命令在Cisco IOS軟體中的使用

Cisco IOS軟體配置

在Cisco IOS軟體中配置中繼

在Cisco IOS軟體中設定EtherChannel

在Cisco IOS軟體中配置VLAN

在Cisco IOS軟體中配置VTP

CatOS/Cisco IOS軟體命令表

相關資訊

簡介

本檔案會使Catalyst OS(CatOS)使用者熟悉Cisco IOS®系統軟體使用的第2層(L2)組態。本檔案介紹CatOS和Cisco IOS軟體之間適用於連線埠/介面、主幹、通道、VLAN和虛擬主幹通訊協定(VTP)等命令和概念的相似之處和差異。 本檔案提供CatOS/Cisco IOS軟體命令表，以快速參考最常用的命令。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

CatOS 和 Cisco IOS 系統軟體之間的差異

Supervisor Engine上使用CatOS，MSFC上則使用Cisco IOS軟體（混合）：CatOS 映像可作為系統軟體，在 Catalyst 6500/6000 交換器上執行 Supervisor Engine。如果安裝了選用的 MSFC，則會使用單獨的 Cisco IOS 軟體映像來執行 MSFC。

Supervisor Engine 和 MSFC 上皆使用 Cisco IOS 軟體（原生）：單一 Cisco IOS 軟體映像可作為系統軟體，在 Catalyst 6500/6000 交換器上執行 Supervisor Engine 和 MSFC。

註：如需詳細資訊，請參閱適用於Cisco Catalyst 6500系列交換器的Cisco Catalyst和Cisco IOS作業系統的比較檔案。

Catalyst 6500/6000 CatOS和Cisco IOS軟體映像

Catalyst 6500/6000交換器可以選擇執行兩種軟體型別中的一種。

CatOS：此實作在邏輯上等價於具有路由交換器模組(RSM)的Catalyst 5500/5000系列交換器。 在CatOS模式下運行時，有兩個獨立的軟體映像。MSFC運行傳統的Cisco IOS軟體映像，而Supervisor Engine運行傳統的CatOS。每台裝置都有自己的配置檔案。

Cisco IOS軟體：此實現提供單一的「類似路由器」介面。路由器（具有路由處理器[RP]名稱）和交換機Supervisor引擎（具有交換機處理器[SP]名稱）之間的劃分對使用者是透明的。有一個控制檯連線、配置檔案和軟體映像。

注意：始終需要MSFC1引導映像才能正確載入MSFC1。引導映像對於硬體支援是必需的，而且引導映像為緊急恢復情況提供備份。軟體映像實際上會載入路由器完整功能所需的軟體。

除MSFC外，還需要策略功能卡(PFC)。

瞭解CatOS和Cisco IOS軟體的軟體映像名稱慣例

在CatOS中，交換器Supervisor Engine和MSFC執行不同的軟體映像。

針對Supervisor Engine，有兩種不同的映像型別：一個用於Supervisor Engine Is，另一個用於Supervisor Engine II。cat6000-sup字首後面的數字表示映像中的差異。

如果2位於cat6000-sup首碼之後，則映像用於Catalyst Supervisor Engine II。如果720位於cat6000-sup字首之後，則映像為Catalyst Supervisor Engine 720。如果2或720都不位於cat6000-sup字首之後，則映像為Catalyst Supervisor Engine I。例如，名為「cat6000-sup.6-2-3.bin」的檔案用於Supervisor Engine I。名為「cat6000-sup2.6-2-3.bin」的檔案用於Supervisor Engine II。要下載這些映像，請參閱軟體下載 — Catalyst 6500/6000 CatOS系統軟體(僅限註冊客戶)。

在MSFC1、MSFC2或MSFC3上運行搭載Cisco IOS軟體的CatOS時，每個MSFC型別都運行其自己的獨立映像。Download Software Area(僅供註冊客戶使用)現在包含這些映像。要下載MSFC1、MSFC2或MSFC3的映像，請轉到Cisco Software Download頁面。

Cisco IOS系統軟體為Supervisor Engine和MSFC子卡運行組合軟體映像。對於使用者，只有一個映像可載入到快閃記憶體中。Supervisor Engine和MSFC安裝的型別對每個映像進行分類。Download Software Area（僅限註冊客戶）中的映像類別為：

- 管理引擎720/MSFC3(CAT6000-SUP720/MSFC3)

- Supervisor引擎2/MSFC2(CAT6000-SUP2/MSFC2)

- Supervisor Engine 1/MSFC2(CAT6000-SUP1/MSFC2)

- Supervisor Engine 1/MSFC1(CAT6000-SUP1/MSFC1)

要下載Cisco IOS系統軟體映像，請參閱軟體下載 — Catalyst 6500/6000 Cisco IOS系統軟體(僅限註冊客戶)。

註：Supervisor引擎II必須使用MSFC2子卡；supervisor引擎II無法使用原始MSFC子卡。

要確定當前運行的映像，請發出show version命令。

附註：在混合模式下，對各個模組發出show version命令，以確定它們正在運行的當前映像。

例如，此處，show version命令表示搭載MSFC2的Catalyst 6500在Supervisor Engine上執行CatOS，並在MSFC上執行Cisco IOS軟體。

Hybrid_Cat6500>(enable) show version

WS-C6509 Software, Version NmpSW: 7.6(4)

Copyright (c) 1995-2003 by Cisco Systems

NMP S/W compiled on Nov  4 2003, 19:22:09

System Bootstrap Version: 5.3(1)

System Boot Image File is 'bootflash:cat6000-supk8.7-6-4.bin'

System Configuration register is 0x2102

Hardware Version: 2.0  Model: WS-C6509  Serial #: SCA043500S2

PS1  Module: WS-CAC-1300W    Serial #: SON04340836

PS2  Module: WS-CAC-1300W    Serial #: SNI05470791

Mod Port Model               Serial #    Versions

--- ---- ------------------- ----------- --------------------------------------

1   2    WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Fw : 5.3(2)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Sw :

2   2    WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Fw : 5.3(1)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Sw :

3   48   WS-X6148-GE-TX      SAD0746052K Hw : 4.0

Fw : 7.2(1)

Sw : 7.6(4)

4   48   WS-X6248-RJ-45      SAD04281CZY Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

5   48   WS-X6248-RJ-45      SAD042608NZ Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

6   48   WS-X6248-RJ-45      SAD04170CG9 Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

7   48   WS-X6248-RJ-45      SAD04270N9U Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

15  1    WS-F6K-MSFC2        SAD04520C65 Hw : 1.7

Fw : 12.1(19)E1

Sw : 12.1(19)E1

16  1    WS-F6K-MSFC2        SAL0548F2TE Hw : 2.0

Fw : 12.1(19)E1

Sw : 12.1(19)E1

DRAM                    FLASH                   NVRAM

Module Total   Used    Free    Total   Used    Free    Total Used  Free

------ ------- ------- ------- ------- ------- ------- ----- ----- -----

2      130944K  50017K  80927K  16384K  10857K   5527K  512K  389K  123K

Uptime is 142 days, 4 hours, 27 minutes

CatOS和Cisco IOS軟體之間的預設系統差異

功能

CatOS

Cisco IOS軟體

配置檔案

兩個配置檔案：一個用於Supervisor Engine(NMP^1)，一個用於MSFC

一個配置檔案

軟體映像

兩個影象：一個用於Supervisor Engine，另一個用於MSFC

一個軟體映像；還需要MSFC引導映像才能正確載入MSFC

預設埠模式

每個埠都是L2交換埠

每個埠都是L3^2路由埠（介面）

預設埠狀態

每個埠都啟用

每個連線埠（介面）都處於關閉狀態

配置命令格式

命令關鍵字set位於每個配置命令之前

帶有全域性和介面級命令的Cisco IOS命令結構

配置模式

無配置模式(set、clear和show命令)

configure terminal和VLAN database命令啟用配置模式

移除/變更組態

使用clear、set和/或enable/disable命令

與Cisco IOS命令結構相同；關鍵字no否定命令

1 NMP =網路管理處理器

2 L3 =第3層

瞭解Cisco IOS系統軟體中的介面

Cisco IOS軟體中的介面（連線埠）模式

您將Cisco IOS軟體中的埠稱為介面。Cisco IOS軟體中有兩種介面模式：

- L3路由介面

- L2交換機介面

注意：預設值為L3路由介面。

配置L2乙太網介面

要使埠/介面成為L2交換機介面，請在介面下新增switchport命令，如以下示例所示：

Cat6500# show running-config interface fastethernet 5/10

Building configuration...

Current configuration:

!

interface FastEthernet5/10

no ip address

switchport

end

L2交換機埠的預設介面配置與CatOS中的不同。例如，當連線埠具有L2連線埠設定時，主幹模式為desirable，而不是auto。show interface interface switchport命令會提供有關L2交換器連線埠目前組態的詳細資訊。以下是範例：

Cat6500# show interfaces fastethernet 5/10 switchport

Name: Fa5/10

Switchport: Enabled

Administrative Mode: dynamic desirable

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 1 ( default)

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Cisco IOS軟體中有三種主要的L2交換機埠模式：

- 存取:將介面設定為非中繼模式。

- 動態:將介面設定為動態協商訪問或中繼模式。此設定有兩個選項：

- Desirable:如果鄰居裝置在desirable或auto模式下具有中繼配置，此配置允許埠成為中繼。當連線埠具有交換器連線埠組態時，理想模式是預設模式。

- 自動:如果另一個鄰居在desirable模式下有中繼配置，此配置允許埠成為中繼。

- 中繼:將介面設定為永久中繼模式。

埠配置和狀態CatOS/Cisco IOS命令表

功能

CatOS

啟用PortFast

CatOS (enable) set spantree portfast 4/1 enable

Warning: Spantree port fast start should only

be enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/1 fast start enabled.

為主機訪問配置埠。此命令啟用PortFast並禁用CatOS中的中繼和通道化。

CatOS (enable) set port host 4/2

Port(s) 4/2 channel mode set to off.

Warning: Spantree port fast start should only be

enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/2 fast start enabled.

Port(s) 4/2 trunk mode set to off.

CatOS (enable)

顯示埠狀態

show port

show port mod

show port mod/port

show port counters

show port counters mod/port

功能

Cisco IOS軟體

啟用PortFast

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# spanning-tree portfast

Warning: portfast should only be enabled on

ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled can cause temporary

spanning tree loops.

Use with CAUTION

Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

為主機訪問配置埠。此命令啟用PortFast並禁用CatOS中的中繼和通道化。

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport mode access

CiscoIOS(config-if)# spanning-tree portfast

%Warning: portfast should only be enabled

on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled, can cause temporary

spanning tree loops.

Use with CAUTION

%Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

顯示埠狀態

show interface status

show interface status module mod

show interface status errordisabled

show interface counters error module mod

瞭解range命令在Cisco IOS軟體中的使用

即使交換器執行Cisco IOS軟體，也可能會有大量的介面。因此，為了協助快速設定多個連線埠，Cisco IOS軟體允許您同時設定一系列介面，如在CatOS中。如果您發出range命令，則可以使用相同的配置快速配置許多介面。

CiscoIOS(config)# interface range gigabitethernet 1/1 -2, fastethernet 4/1 -24

注意：在此命令的語法中，第一個介面範圍和連字型大小之間有一個空格。語法很重要，而且必須絕對準確。如果沒有空格，命令列介面(CLI)將返回語法錯誤。

以下是range命令不正確使用的示例：

CiscoIOS(config)# interface range gigabitethernet 1/1-2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1 -24

此範例將VLAN 2中的連線埠從4/2-8設定：

NativeIOS(config)# interface range fastethernet 4/2 -8

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# no shut

CiscoIOS(config-if)# ^Z

CiscoIOS# show interface

使用range命令後，組態顯示如下：

interface FastEthernet4/4

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/5

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/6

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/7

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/8

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/9

no ip address

shutdown

Cisco IOS軟體配置

在Cisco IOS軟體中配置中繼

Cisco IOS軟體支援交換器間連結通訊協定(ISL)和IEEE 802.1Q(dot1q)中繼模式。介面配置有不同的選項，如瞭解Cisco IOS系統軟體中的介面一節所述。中繼的工作方式與CatOS完全相同，不同之處在於Cisco IOS軟體中的預設設定為desirable而不是auto。

功能

CatOS

啟用ISL中繼

CatOS (enable) set trunk 4/1 on isl

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to isl.

啟用dot1q trunk

CatOS (enable) set trunk 4/1 on dot1q

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to dot1q

CatOS (enable) set vlan 2 4/1

VLAN 2 modified.

VLAN 1 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

4/1

注意：對於dot1q，本徵VLAN匹配中繼鏈路非常重要。在CatOS中使用set vlan vlan-id mod/port 命令為中繼設定本地VLAN。

更改中繼模式

CatOS (enable) set trunk mod/port {on

| off | desirable | auto | nonegotiate}

[vlans] [isl | dot1q | negotiate]

顯示中繼狀態

show trunk

show trunk mod

show port mod/port

功能

Cisco IOS軟體

啟用ISL中繼

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation isl

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become isl

CiscoIOS(config-if)# ^Z

CiscoIOS#

啟用dot1q trunk

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation dot1q

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become dot1q

CiscoIOS(config-if)# switchport trunk native vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

更改中繼模式

CiscoIOS(config-if)# switchport mode {access |

trunk | multi | dynamic {auto | desirable}}

顯示中繼狀態

show interfaces trunk

show interfaces trunk module number

show interfaces interface-type mod/port

show interfaces status

在Cisco IOS軟體中驗證中繼資訊的方法有多種。

注意：路由埠不是L2中繼埠。

show interfaces trunk命令顯示當前中繼的所有介面。此命令不顯示具有要中繼的配置的埠，但不主動中繼埠：

Switch# show interfaces trunk

Port Mode      Encapsulation Status   Native vlan

Po41 desirable n-isl         trunking 1

Port Vlans allowed on trunk

Po41 1-1005

Port Vlans allowed and active in management domain

Po41 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Po41 1-6,1002-1005

show interfaces trunk module number 命令會顯示指定模組上的所有介面，而不管中繼狀態如何。

Switch# show interfaces trunk module 4

Port   Mode      Encapsulation Status       Native vlan

Fa4/1  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/2  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/3  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/4  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/5  desirable negotiate     not-trunking 1

Fa4/6  desirable negotiate     not-trunking 1

Fa4/7  desirable negotiate     not-trunking 1

Fa4/8  desirable negotiate     not-trunking 1

Fa4/9  desirable negotiate     not-trunking 1

Fa4/10 routed    negotiate     routed       1

Fa4/11 desirable negotiate     not-trunking 1

Fa4/12 desirable negotiate     not-trunking 1

Fa4/13 desirable negotiate     not-trunking 1

Fa4/14 desirable negotiate     not-trunking 1

Fa4/15 desirable negotiate     not-trunking 1

Fa4/16 desirable negotiate     not-trunking 1

Fa4/17 desirable negotiate     not-trunking 1

您可以使用show interfaces interface-type mod/port trunk命令檢查特定介面的中繼狀態，而無需滾動多個螢幕。

Switch# show interfaces fastethernet 4/1 trunk

Port  Mode      Encapsulation Status       Native vlan

Fa4/1 desirable n-isl         trunk-inbndl 1 (Po41)

Port Vlans allowed on trunk

Fa4/1 1-1005

Port Vlans allowed and active in management domain

Fa4/1 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Fa4/1 1-6,1002-1005

show interfaces status命令為每個介面提供狀態和中繼狀態的一行顯示。

Switch# show interfaces status

Port Name Status     Vlan   Duplex Speed Type

Gi1/1   connected  routed full    1000 1000BaseSX

Gi1/2   connected  1      full    1000 1000BaseSX

Gi3/1   notconnect routed full    1000 missing

Gi3/2   notconnect routed full    1000 missing

Gi3/3   notconnect routed full    1000 1000BaseSX

Gi3/4   notconnect routed full    1000 1000BaseSX

Gi3/5   notconnect routed full    1000 1000BaseSX

Gi3/6   notconnect routed full    1000 1000BaseSX

Gi3/7   notconnect routed full    1000 1000BaseSX

Gi3/8   notconnect routed full    1000 1000BaseSX

Fa4/1   connected  trunk  full     100 100BaseFX MM

Fa4/2   connected  trunk  full     100 100BaseFX MM

Fa4/3   connected  trunk  full     100 100BaseFX MM

Fa4/4   connected  trunk  full     100 100BaseFX MM

Fa4/5   notconnect 1     full     100 100BaseFX MM

Fa4/6   notconnect 1     full     100 100BaseFX MM

Fa4/7   notconnect 2     full     100 100BaseFX MM

Fa4/8   notconnect 2     full     100 100BaseFX MM

Fa4/9   notconnect 1     full     100 100BaseFX MM

Fa4/10   notconnect routed full     100 100BaseFX MM

Fa4/11   notconnect 1     full     100 100BaseFX MM

在Cisco IOS軟體中設定EtherChannel

在Cisco IOS軟體中設定EtherChannel的方式與CatOS中的設定方式截然不同。要在Cisco IOS軟體的一組埠上啟用EtherChannel，需要使用埠通道介面。如果所有條件對埠組都有效，則它們形成埠通道。預設情況下，所有介面都禁用埠通道化，即使介面具有交換機埠配置也是如此。

要將一組介面配置為EtherChannel的一部分，必須在每個介面下分別發出命令channel-group group-number mode channel-mode 。如果從組態中移除switchport命令，則所有與該交換器連線埠相關的命令不會再顯示於該組態中。但是，將連線埠重新設定為交換器連線埠會返回所有先前的命令。因此，將連線埠設定和取消設定為交換器連線埠不會清除連線埠通道組資訊。

建立通道組後，必須在埠通道介面上發出所有配置，而不是在單個物理埠上發出。在連線埠通道上發出的任何命令都會透明地傳播到所有實體連線埠。在通道成員的物理介面上發出的命令可從通道組中刪除該介面。

功能

CatOS

建立通道

CatOS (enable) set port channel 4/3-4 on

Port(s) 4/3-4 are assigned to admin group 613.

Port(s) 4/3-4 channel mode set to on.

CatOS (enable)

設定通道模式

CatOS (enable) set port channel

mod/port mode {on | off | desirable |

auto} [silent | non-silent]

顯示埠通道狀態

show port channel

show port channel mod/port

show port channel channel-group

功能

Cisco IOS軟體

建立通道

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface port-channel 1

CiscoIOS(config-if)# exit

CiscoIOS(config)# interface fastethernet 4/3

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)# interface fastethernet 4/4

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)#

設定通道模式

CiscoIOS(config-if)# channel-group

channel-group_number mode {on | auto

[non-silent] | desirable [non-silent]}

顯示埠通道狀態

show etherchannel

show etherchannel channel-group

show interfaces etherchannel

show interfaces interface-type mod/port etherchannel

show etherchannel命令具有各種子命令，以顯示有關連線埠通道組態的資訊。

show etherchannel channel-group summary命令會給出通道組配置中所有介面的狀態。此命令對於快速查詢應該屬於某個通道組的介面非常有用。

CiscoIOS# show etherchannel 256 summary

Flags: U - in use I - in port-channel S - suspended

D - down I - stand-alone d - default setting

Group Port-channel Ports

-----+------------+-----------------------------------------------------------

256   Po256(U)    Fa5/5(I) Fa5/6(I) Fa5/7(I) Fa5/8(I)

show interfaces etherchannel命令會顯示與通道組關聯的每個介面，而不管通道狀態如何。

CiscoIOS# show interfaces etherchannel

----

GigabitEthernet1/1:

Port state = EC-Enbld Up In-Bndl Usr-Config

Channel group = 254 Mode = Automatic Gcchange = 0

Port-channel = Po254 GC = 0x00FE0001

Port indx = 0 Load = 0x55

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP    Learning Group

Port  Flags   State   Timers   Interval Count Priority Method Ifindex

Gi1/1 SAC     U6/S7   Q     30s     1   128      Any    56

Partner's information:

Partner Partner Partner  Partner        Group

Port Name    Device   ID         Port Age Flags Cap.

Gi1/1   69055180(STELLA) 0010.7bbe.50bb 3/4  12s SC    2

您可以使用show interfaces interface-type mod/port etherchannel命令檢查特定介面的通道狀態，而無需滾動多個螢幕。

CiscoIOS# show interfaces fastethernet 5/5 etherchannel

Port state = EC-Enbld Up Cnt-bndl Sngl-port-Bndl Cnt-Bndl Not-in-Bndl Usr-Config

Channel group = 256 Mode = Automatic Gcchange = 1

Port-channel = null GC = 0x11000002

Port indx = 0 Load = 0x00

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP  Learning Group

Port  Flags   State Timers   Interval Count Priority Method Ifindex

Fa5/5 SAC     U6/S7 Q  30s   1     128      Any 0

Partner's information:

Partner Partner   Partner Partner        Group

Port Name   Device  ID      Port Age Flags Cap.

Fa5/5   066549452(SINGHA) 00d0.bb3a.c0d9 4/17 29s SC 2

Age of the port in the current state: 00h:30m:31s

Probable reason: pm - different in oper mode (1) with Fa5/8(2)

show interfaces port-channel channel-group etherchannel命令會顯示連線埠通道中目前處於作用中成員的連線埠。

CiscoIOS# show interfaces port-channel 256 etherchannel

Age of the Port-channel = 05h:52m:49s

Logical slot/port = 13/64 Number of ports = 2

GC = 0x01000001 HotStandBy port = null

Port state = Port-channel Ag-Inuse

Ports in the Port-channel:

Index  Load   Port   EC state  Configuration

------+------+------+-----------+--------------

1    55     Fa5/7  auto      user

0    AA     Fa5/8  auto      user

Time since last port bundled: 00h:46m:51s Fa5/7

Time since last port Un-bundled: 00h:46m:54s Fa5/8

在Cisco IOS軟體中配置VLAN

Cisco IOS軟體和CatOS之間VLAN的概念和功能是相同的。但是，這兩種實現之間的配置方法差異很大。set命令在CatOS中建立VLAN時，VLAN建立會通過Cisco IOS軟體中的VLAN資料庫配置模式進行。

功能

CatOS

建立VLAN

CatOS (enable) set vlan 2

Vlan 2 configuration successful

刪除VLAN

CatOS (enable) clear vlan 2

This command will deactivate all

ports on vlan 2

Do you want to continue(y/n) [n]?y

Vlan 2 deleted

將埠分配給VLAN

CatOS (enable) set vlan 2 1/1

VLAN 2 modified.

VLAN 10 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

檢視VLAN狀態

show vlan

功能

Cisco IOS軟體

建立VLAN

CiscoIOS# vlan database

CiscoIOS(vlan)# vlan 2

VLAN 2 added:

Name: VLAN0002

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

刪除VLAN

NativeIOS# vlan database

CiscoIOS(vlan)# no vlan 2

Deleting VLAN 2...

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

將埠分配給VLAN

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface gigabitethernet2/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

檢視VLAN狀態

show vlan

要檢查VLAN的狀態，請使用show vlan命令。

Router# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active

2    VLAN0002                         active

10   VLAN0010                         active

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

10   enet  100010     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

在Cisco IOS軟體中配置VTP

VTP是一種在VTP域中同步VLAN資料庫的L2協定。新增、刪除或修改同一個VTP域內的VLAN時，VTP會同步同一個VTP域內所有成員上的VLAN資料庫。VTP修剪通過減少不需要傳播的VLAN的不必要廣播和組播流量來最小化中繼上的流量。

在Cisco IOS軟體中，VLAN資料庫模式定義VTP配置。對VLAN資料庫和VTP的更改發生在VLAN資料的應用中。當使用者退出VLAN資料庫配置模式時會發生這種情況。預設Cisco IOS軟體VTP配置如下所示：

注意：預設VTP模式是Server。

CiscoIOS# show vtp status

VTP Version : 2

Configuration Revision : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs : 6

VTP Operating Mode : Server

VTP Domain Name : null

VTP Pruning Mode : Disabled

VTP V2 Mode : Disabled

VTP Traps Generation : Disabled

MD5 digest : 0xE2 0x4F 0xC0 0xD6 0x94 0xBB 0x31 0x9A

Configuration last modified by 0.0.0.0 at 6-27-01 02:04:20

Local updater ID is 0.0.0.0 (no valid interface found)

功能

CatOS

配置VTP

CatOS (enable) set vtp domain cisco

VTP domain cisco modified

更改VTP模式

CatOS (enable) set vtp mode client

VTP domain cisco modified

CatOS (enable) set vtp mode server

VTP domain cisco modified

CatOS (enable) set vtp mode transparent

VTP domain cisco modified

啟用VTP修剪

CatOS (enable) set vtp pruning enable

This command will enable the pruning

function in the entire management domain.

All devices in the management domain

should be pruning-capable before enabling.

Do you want to continue (y/n) [n]? y

VTP domain cisco modified

顯示VTP配置

CatOS (enable) show vtp domain

功能

Cisco IOS軟體

配置VTP

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp domain cisco

Changing VTP domain name from null to cisco

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

更改VTP模式

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp client

Setting device to VTP CLIENT mode.

CiscoIOS(vlan)# vtp server

Setting device to VTP SERVER mode.

CiscoIOS(vlan)# vtp transparent

Setting device to VTP TRANSPARENT mode.

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

啟用VTP修剪

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp pruning

Pruning switched ON

CiscoIOS(vlan)# exit

APPLY completed.

顯示VTP配置

CiscoIOS# show vtp status

CatOS/Cisco IOS軟體命令表

下表簡要列出了CatOS命令以及等效於Cisco IOS軟體的命令。下表有助於快速參考從CatOS遷移到Cisco IOS軟體。該表是常用命令的縮寫清單。此表未列出每個命令的所有引數。請參閱Catalyst 6500系列Cisco IOS命令參考12.2SX以瞭解完整的命令語法和引數。

本節中的註釋提供了有關特定命令的幫助。註釋以斜體顯示。

CatOS指令

Cisco IOS軟體命令

clear vlan vlan

無vlan 此命令是VLAN資料庫命令。

set cam agingtime

mac-address-table aging-time 此命令設定每個VLAN的MAC地址老化時間。

set cam set cam {static |永久}

mac-address-table static 所有靜態條目也是永久性的。

set errdisable-timeout interval

錯誤停用復原間隔30-86400 此命令會設定錯誤停用復原時間。

set mls

mls 多層交換(MLS)在Cisco IOS軟體中透明執行。

set option errport

錯誤停用復原原因 此命令可配置錯誤停用選項。

set port channel 預設模式為自動。

channel-group group mode 預設模式為關閉。

set port duplex

雙工 預設行為會有所不同，具體取決於線卡。

set port flowcontrol send [desired |關閉 |on ]

flowcontrol send [desired |關閉 |在]

set port flowcontrol receive [desired |關閉 |on ]

flowcontrol receive [desired |關閉 |在]

set port host

switchport switchport mode access spanning-tree portfast 接入埠自動關閉了通道/中繼。

set port negotiation mod/port disable

快速非協商 僅在千兆埠上使用此命令。對10/100 Mbps埠使用速度和雙工命令。

set port negotiation mod/port enable

無速度非協商 僅在千兆埠上使用此命令。對10/100 Mbps埠使用速度和雙工命令。

set port speed

速度 預設行為會有所不同，具體取決於線卡。

設定qos

mls qos

set span

監控會話

set spantree

生成樹

set system crossbar-fallback

service internal [no] fabric switching-mode allow [bus-only |已截斷]

set test diaglevel

診斷級別 這是啟動診斷級別。

set trace

debug 請謹慎使用此命令。有些調試是干擾性的。

set trunk 預設模式為自動。

switchport mode trunk 預設模式為desirable。

set udld

udld 可以全域性配置此命令，也可以按介面配置。

set vlan

vlan switchport access vlan 此命令是VLAN資料庫命令。 該命令是介面命令，不會建立VLAN。

set vtp

vtp 此命令是VLAN資料庫命令。

show boot

show bootvar 此命令顯示引導引數。

show cam dynamic

show mac-address-table dynamic

show channel info show port channel

show etherchannel summary

show errordetection

show errdisable detect

show errdisable-timeout

show errdisable recovery

show port show mac

顯示介面

顯示連線埠狀態

顯示介面狀態

show span

顯示監視器

show sprom

show idprom 此命令有助於確定機箱序列號。

show system crossbar-fallback

show fabric switching-mode

show test [diaglevel | mod]

show diagnostic [level | mod module]

show qos

show mls qos

顯示流量

show catalyst6000 traffic-meter 此命令顯示底板利用率。

show trunk show port trunk

show interfaces trunk

show udld

show udld

show vlan

show vlan

show vtp domain

show vtp status

交換器主控台

遠端登入 此命令僅與思科技術支援結合使用，以進行特定故障排除。

相關資訊

- LAN 產品支援

- LAN 交換技術支援

- 工具與資源

- 技術支援與文件 - Cisco Systems