目錄

簡介

必要條件

需求

採用元件

慣例

LLDP概述

設定

網路圖表

組態

驗證

簡介

本檔案將提供Catalyst 3750/3750-E/3750-X系列交換器上連結層探索通訊協定(LLDP)功能的範例設定和驗證。具體而言，本檔案將說明如何在Catalyst 3750交換器上設定連線埠型流量控制功能。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 具備有關Cisco Catalyst 3750/3750-E/3750-X系列交換器上的組態的基本知識

- 對LLDP功能有基礎認識

採用元件

本檔案中的資訊是根據Cisco Catalyst 3750系列交換器。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

LLDP概述

LLDP是一種鄰居發現協定，允許非Cisco裝置向網路中的其他裝置通告有關自身的資訊。思科交換機支援IEEE 802.1AB LLDP，它允許非思科裝置實現其他裝置之間的互操作性。LLDP通過資料鏈路層運行，允許運行不同網路層協定的兩台裝置相互瞭解資訊。

LLDP通過使用一組包含型別、長度和值說明的屬性來發現鄰居裝置。這些屬性稱為TLV。LLDP支援的裝置可以使用TLV接收資訊並將其傳送給鄰居。此協定可以通告詳細資訊，例如配置資訊、裝置功能和裝置標識。

交換機支援以下基本管理TLV，它們是強制性的LLDP TLV:

- 埠描述TLV

- 系統名稱TLV

- 系統描述TLV

- 系統功能TLV

- 管理地址TLV

這些特定於組織的LLDP TLV也被通告以支援LLDP-MED:

- 連線埠VLAN ID TLV（IEEE 802.1組織上特定的TLV）

- MAC/PHY組態/狀態TLV（IEEE 802.3組織特定的TLV）

設定

本節提供配置本文檔所述的LLDP功能所需的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

Catalyst 3750交換器

Switch#configure terminal

!--- Enable LLDP globally on the switch.

Switch(config)#lldp run

!--- Specify time for the device to hold LLDP information.

Switch(config)#lldp holdtime 180

!--- Set the time for sending frequency of LLDP updates.

Switch(config)#lldp timer 50

!--- Enable LLDP specific to an interface.

Switch(config)#interface gigabitethernet 1/0/1

!--- Enable the interface to send LLDP.

Switch(config-if)#lldp transmit

!--- Enable the interface to receive LLDP.

Switch(config-if)#lldp receive

!--- Return to privileged EXEC mode.

Switch(config-if)#end

!--- Save the configurations in the device.

switch(config)#copy running-config startup-config

Switch(config)#exit

!--- Disable LLDP feature on the switch.

Switch(config)#no lldp run

Switch(config)#end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show指令輸出的分析。

使用show lldp interface [interface-id] 命令以顯示有關已啟用LLDP的介面的資訊。

例如：

Switch#show lldp interface gigabitethernet1/0/1

GigabitEthernet1/0/1:

Tx: enabled

Rx: enabled

Tx state: IDLE

Rx state: WAIT FOR FRAME

使用show lldp neighbors 命令以顯示有關鄰居的資訊。

例如：

Switch#show lldp neighbors

Capability codes:

(R) Router, (B) Bridge, (T) Telephone, (C) DOCSIS Cable Device

(W) WLAN Access Point, (P) Repeater, (S) Station, (O) Other

Device ID           Local Intf     Hold-time  Capability      Port ID

Nortel IP Phone     Gi1/0/1        180        T               0019.e1e7.018d

Polycom SoundPoint IGi1/0/19       180        T               0004.f22f.88b7

Baseline Switch 2426Gi1/0/18       180        P,B             Ethernet0/26

Baseline Switch 2426Gi1/0/22       180        P,B             Ethernet0/26

Total entries displayed: 4

使用show lldp neighbors detail命令以詳細顯示鄰居的相關資訊。

例如：

Switch#show lldp neig detail

Chassis id: 47.11.133.116

Port id: 0019.e1e7.018d

Port Description: Nortel IP Phone

System Name - not advertised

System Description:

Nortel IP Telephone 1230E, Firmware:062AC53

Time remaining: 166 seconds

System Capabilities: B,T

Enabled Capabilities: T

Management Addresses - not advertised

Auto Negotiation - supported, enabled

Physical media capabilities:

Other/unknown

10base-T(HD)

Symm Pause(FD)

Symm, Asym Pause(FD)

1000baseX(FD)

1000baseT(HD)

Media Attachment Unit type: 16

MED Information:

MED Codes:

(NP) Network Policy, (LI) Location Identification

(PS) Power Source Entity, (PD) Power Device

(IN) Inventory

F/W revision: 062AC53

Manufacturer: Nortel-05

Model: IP Phone 1230E

Capabilities: NP, LI, PD, IN

Device type: Endpoint Class III

Network Policy(Voice): Unknown

PD device, Power source: Unknown, Power Priority: High, Wattage: 6.0

使用show lldp traffic 命令以顯示LLDP計數器。

例如：

Switch#show lldp traffic

LLDP traffic statistics:

Total frames out: 560

Total entries aged: 0

Total frames in: 211

Total frames received in error: 0

Total frames discarded: 0

Total TLVs discarded: 208

Total TLVs unrecognized: 208

使用show lldp errors 命令以顯示LLDP錯誤計數器。

例如：

Switch#show lldp errors

LLDP errors/overflows:

Total memory allocation failures: 0

Total encapsulation failures: 0

Total input queue overflows: 0

Total table overflows: 0

相關資訊

- Cisco Catalyst 3750系列交換器支援頁面

- Cisco Catalyst 3750-E系列交換器支援頁面

- Cisco Catalyst 3750-X系列交換器支援頁面

- 交換器產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems