目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

復原程式

相關資訊

簡介

本檔案介紹Cisco Catalyst第2層和Cisco Catalyst第3層固定組態交換器的密碼復原程式。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案是以交換器2900XL/3500XL、2940、2950/2955、2960、2970、3550、3560和3750系列為基礎。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

本文件將介紹 Cisco Catalyst 第 2 層固定配置交換器 2900XL/3500XL、2940、2950/2955、2960 和 2970 系列的密碼復原程序，以及 Cisco Catalyst 第 3 層固定組態交換器 3550、3560 和 3750 系列。

復原程式

要恢復口令，請執行以下操作：

1. 將終端機或具有終端模擬的 PC（例如超級終端機）連接到交換器的主控台連接埠。

使用以下終端機設定：

- 每秒位元數（鮑率）：9600

- 資料位：8

- 同位：無

- 停止位元：1

- 流量控制：Xon/Xoff

注意：有關佈線和將終端機連線到主控台連線埠的其他資訊，請參閱將終端機連線到Catalyst交換器上的主控台連線埠。

2. 拔下電源線。

3. 開啟交換器電源並進入switch:提示

若使用 2900XL、3500XL、2940、2950、2960、2970、3550、3560 和 3750 系列交換器，請執行以下操作：

按住位於前面板左側的「模式」按鈕，同時將電源線重新接上交換器。

Catalyst 交換器系列

LED 表現方式和「模式」按鈕放開動作

2900XL、3500XL、3550

overPort1的LED熄滅時，放開「模式」按鈕。

2940、2950

狀態 (STAT) LED 熄滅時，約過 5 秒後放開「模式」按鈕。放開「模式」按鈕時，SYSTLED會閃爍琥珀色燈。

2960、2970

SYSTLED閃爍琥珀色燈時，放開「模式」按鈕，隨即會變為常亮綠燈。放開「模式」按鈕時，SYSTLED會閃爍綠燈。

3560、3750

SYST LED 變為常亮綠燈時，大約過 15 秒後放開「模式」按鈕。放開「模式」按鈕時，SYST LED 會閃爍綠燈。

註:LED位置可能因型號而異。

Catalyst 3524XL

Catalyst 3524XL

Catalyst 2950-24

Catalyst 2950-24

僅適用於 2955 系列交換器：

Catalyst 2955 系列交換器無法使用外部模式按鈕進行密碼復原。而是交換器開機載入器會基於密碼復原目的，使用Break鍵偵測來停止自動開機順序。Break 按鍵順序取決於使用的終端應用程式和作業系統。在Windows 2000上執行的超級終端機使用Ctrl + Break。在執行UNIX的工作站上,Break鍵是Ctrl-C。如需詳細資訊，請參閱密碼復原期間的標準 Break 按鍵順序組合。

下一個範例在2955上使用超級終端機進入switch:模式。

C2955 Boot Loader (C2955-HBOOT-M) Version 12.1(0.0.514), CISCO DEVELOPMENT TEST

VERSION

Compiled Fri 13-Dec-02 17:38 by madison

WS-C2955T-12 starting...

Base ethernet MAC Address: 00:0b:be:b6:ee:00

Xmodem file system is available.

Initializing Flash...

flashfs[0]: 19 files, 2 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 7741440

flashfs[0]: Bytes used: 4510720

flashfs[0]: Bytes available: 3230720

flashfs[0]: flashfs fsck took 7 seconds.

...done initializing flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

*** The system will autoboot in 15 seconds ***

Send break character to prevent autobooting.

!--- Wait until you see this message before !--- you issue the break sequence.

!--- Ctrl+Break is entered using Hyperterm.

The system has been interrupted prior to initializing the flash file system to finish

loading the operating system software:

flash_init

load_helper

boot

switch:

4.發出flash_init指令。

switch: flash_init

Initializing Flash...

flashfs[0]: 143 files, 4 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 3612672

flashfs[0]: Bytes used: 2729472

flashfs[0]: Bytes available: 883200

flashfs[0]: flashfs fsck took 86 seconds

....done Initializing Flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

switch:

!--- This output is from a 2900XL switch. Output from

!--- other switches will vary slightly.

5.發出load_helper指令。

switch: load_helper

switch:

6.發出dir flash: 命令。

註：請確保在dir flash後鍵入冒號(:)。

交換器檔案系統隨即顯示：

switch: dir flash:

Directory of flash:/

2    -rwx  1803357   <date>               c3500xl-c3h2s-mz.120-5.WC7.bin

!--- This is the current version of software.

4    -rwx  1131      <date>               config.text

!--- This is the configuration file.

5    -rwx  109       <date>               info

6    -rwx  389       <date>               env_vars

7    drwx  640       <date>               html

18   -rwx  109       <date>               info.ver

403968 bytes available (3208704 bytes used)

switch:

!--- This output is from a 3500XL switch. Output from

!--- other switches will vary slightly.

1. 輸入rename flash:config.text flash:config.old 以重新命名配置檔案。

switch: rename flash:config.text flash:config.old

switch:

!--- The config.text file contains the password

!--- definition.

2. 發出boot指令以啟動系統。

switch: boot

Loading "flash:c3500xl-c3h2s-mz.120-5.WC7.bin"...###############################

################################################################################

######################################################################

File "flash:c3500xl-c3h2s-mz.120-5.WC7.bin" uncompressed and installed, entry po

int: 0x3000

executing...

!--- Output suppressed.

!--- This output is from a 3500XL switch. Output from other switches

!--- will vary slightly.

3. 顯示提示時輸入「n」 以中止初始組態對話方塊。

--- System Configuration Dialog ---

At any point you can enter a question mark '?' for help.

Use ctrl-c to abort configuration dialog at any prompt.

Default settings are in square brackets '[]'.

Continue with configuration dialog? [yes/no]: n

!--- Type "n" for no.

Press RETURN to get started.

!--- Press Return or Enter.

Switch>

!--- The Switch> prompt is displayed.

4. 交換器顯示提示時，輸入 en 以進入啟用模式。

Switch>en

Switch#

5. 輸入rename flash:config.old flash:config.text，將組態檔重新命名為其原始名稱。

Switch#rename flash:config.old flash:config.text

Destination filename [config.text]

!--- Press Return or Enter.

Switch#

6. 將組態檔複製到記憶體中。

Switch#copy flash:config.text system:running-config

Destination filename [running-config]?

!--- Press Return or Enter.

1131 bytes copied in 0.760 secs

Sw1#

此時組態檔會重新載入。

7. 覆寫您不知道的目前密碼。選擇至少包含一個大寫字母、一個數字和一個特殊字元的強式密碼。

註：覆寫所需的密碼。您無需覆寫所有提及的密碼。

Sw1#configure terminal

!--- To overwrite existing secret password

Sw1(config)#enable secret

!--- To overwrite existing enable password

Sw1(config)#enable password

!--- To overwrite existing vty password

Sw1(config)#line vty 0 15

Sw1(config-line)#password

Sw1(config-line)#login

!--- To overwrite existing console password

Sw1(config-line)#line con 0

Sw1(config-line)#password

8. 使用 write memory 指令將執行中的組態寫入組態檔。

Sw1#write memory

Building configuration...

[OK]

Sw1#

相關資訊

- 思科技術支援與下載