目錄

簡介

必要條件

需求

採用元件

背景資訊

如何檢視日誌

解決方案

相關資訊

簡介

本文檔介紹如何從RAID控制器UCSC-PSAS12GHBA收集日誌？

必要條件

需求

本文件沒有特定需求。

採用元件

- 控制器PID:UCSC-PSAS12GHBA

- 供應商：PMC-Sierra(Microsemi)

- 驅動程式：aacraid

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

UCSC-PSAS12GHBA(Microsemi PMC-Sierra HBA)是C240 M4伺服器上使用的唯一非LSI HBA控制器；與LSI RAID控制器不同，CIMC中的「儲存」磁碟不儲存此HBA卡的日誌。

如何檢視日誌

來自UCS伺服器的日誌示例：消息/

"Event log fetch is not valid for this controller type"

723: 6:2017 Dec 20 00:50:14 EST:BMC:storaged:1628: handy_utils.c:46:==>>>> ctlr 2 pd_list device_IDs: 0x0000000000000000 0x0000000000000000 0x0000000000000000 0x0000000000007f00

749: 6:2017 Dec 20 00:50:50 EST:BMC:storaged:1628: handy_utils.c:46:==>>>> ctlr 2 occupied slots according to pd_list: 0x0000000000000000 0x0000000000000000 0x0000000000000000 0x00000000000000fe

893: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: ALL;controller: SLOT-HBA;log: ;command: get-newest-entries;starting-entry: 1;entry-count: 500 '

894: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: ALL;controller: SLOT-HBA;log: ;command: get-newest-entries;starting-entry: 1;entry-count: 500 '

895: 4:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:169:CMD: write-status: Event log fetch is not valid for this controller type

896: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: RAID;controller: SLOT-HBA;operation: get-tty-log;mode: compressed '

897: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: RAID;controller: SLOT-HBA;operation: get-tty-log;mode: compressed '

898: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: RAID;controller: SLOT-HBA;operation: get-phy-errors '

899: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: RAID;controller: SLOT-HBA;operation: get-phy-errors '

900: 4:2017 Dec 20 01:29:12 EST:BMC:storaged:1628: service.c:169:CMD: write-status: Invalid controller operation

解決方案

此HBA控制器有一個CLI工具（與LSI控制器的storcli一樣），

Adaptec ARCCONF命令列實用程式v2.01.22270

https://storage.microsemi.com/en-us/speed/raid/storage_manager/arcconf_v2_01_22270_zip.php

使用者指南：

http://download.adaptec.com/pdfs/user_guides/cli_arc_v2_01_22270_users_guide.pdf

相關資訊

要獲取此控制器的驅動程式詳細資訊，請執行以下操作：

Linux:

$ modinfo aacraid

filename:       /lib/modules/2.6.32-696.6.3.el6.x86_64/kernel/drivers/scsi/aacraid/aacraid.ko

version:        1.2-0[30300]-ms

license:        GPL

description:    Dell PERC2, 2/Si, 3/Si, 3/Di, Adaptec Advanced Raid Products, HP NetRAID-4M, IBM ServeRAID & ICP SCSI driver

author:         Red Hat Inc and Adaptec

VMWare:

vmkload_mod -s aacraid | grep Version