目錄

簡介

必要條件

需求

採用元件

設定

執行NX-OS軟體版本6.2(9)的MDS 9509

執行NX-OS軟體版本6.2(9)的MDS 9148

網路圖表

從MDS 9148(NPV)到MDS 9509(NPIV)的F-port-channel-trunk

拓撲

驗證

MDS 9509

MDS 9148

疑難排解

VSAN仍在初始化中

已看到EPP失敗消息

簡介

本文說明如何將F-port-channel-trunk從使用N_Port ID Virtualization(NPIV)功能運行的多層資料交換機(MDS)9500配置為運行N_Port Virtualization(NPV)功能的MDS 9148。

F-port-channel-trunk允許通過port-channel對NPV交換機的交換矩陣登入進行虛擬化。如果單個成員鏈路發生故障，這將提供無中斷冗餘。預設情況下，各個鏈路處於速率模式共用狀態，但也可以是速率模式專用鏈路。

必要條件

需求

思科建議您瞭解以下主題：

- N_Port虛擬化

- 光纖通道

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 執行NX-OS軟體版本6.2(9)的MDS 9509

- 插槽2 - DS-X9148 - 48埠1/2/4 Gbps FC模組

- 插槽4 - DS-X9124 - 24埠1/2/4 Gbps FC模組

- 執行NX-OS軟體版本6.2(9)的MDS 9148

本檔案依賴於以下功能：

- SAN-OS軟體版本3.3中新增了功能NPV和NPIV

- 在NX-OS軟體版本4.1(3)中新增了fport-channel-trunk功能

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

附註：使用命令查詢工具(僅供已註冊客戶使用)可獲取本節中使用的命令的更多資訊。

附註：

所有介面都應位於同一個虛擬儲存區域網路(VSAN)中。 本示例使用VSAN 1。

最佳做法是將成員介面分配到不同的線卡上。

「switchport rate-mode dedicated」是可選的。預設情況下，如果需要，中繼F(TF)埠介面可以在速率模式下運行。如果port-group的頻寬可用，則可使用switchport rate-mode dedicated命令配置它們。您可以輸入show port-resources module x命令，以便檢視每個連線埠群組和可用的頻寬。

執行NX-OS軟體版本6.2(9)的MDS 9509

feature fport-channel-trunk

feature npiv

interface port-channel 1

channel mode active

switchport mode F

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

interface fc2/2

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

interface fc4/8

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

執行NX-OS軟體版本6.2(9)的MDS 9148

附註：

9148上的所有埠都是專用的（全速率模式），因此9148上無需配置即可確保專用。事實上，「switchport rate-mode dedicated」命令是自動新增的，不能更改。

無需在MDS NPV交換機上配置「feature fport-channel-trunk」。

對NPV模式的更改會清除當前配置，並在NPV模式下重新啟動交換機。

feature npv

interface port-channel 1

channel mode active

switchport mode NP

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

switchport trunk mode on

interface fc1/2

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

interface fc1/14

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

網路圖表

從MDS 9148(NPV)到MDS 9509(NPIV)的F-port-channel-trunk

拓撲

MDS 9509模組資訊：

mds9509# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

2    48     1/2/4 Gbps FC Module                DS-X9148           ok

4    24     1/2/4 Gbps FC Module                DS-X9124           ok

5    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    active *

6    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    ha-standby

MDS 9148模組資訊：

mds9148# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

1    48     1/2/4/8 Gbps FC/Supervisor-3        DS-C9148-K9-SUP    active *

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)支援某些show命令。使用輸出直譯器工具來檢視show命令輸出的分析。

MDS 9509

此命令表示port-channel 1有兩個可操作埠。

mds9509# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc4/8

此命令顯示port-channel和所有成員介面。第一個工作埠(FOP)標有星號：

mds9509(config-if)# show port-channel data

port-channel1

Administrative channel mode is active

Operational channel mode is active

Last membership update succeeded

First operational port is fc4/8

2 ports in total, 2 ports up

Ports:   fc2/2    [up]

fc4/8    [up] *

此命令顯示port-channel 1介面處於「trunking」狀態，這是所需的狀態。

附註：VSAN 1和20都為up，這表示兩個VSAN中有埠在9148上為up。

mds9509# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 112 bits/sec, 14 bytes/sec, 0 frames/sec

5 minutes output rate 152 bits/sec, 19 bytes/sec, 0 frames/sec

25798 frames input, 1399932 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

23082 frames output, 1013152 bytes

0 discards, 0 errors

18 input OLS, 14 LRR, 29 NOS, 0 loop inits

17 output OLS, 0 LRR, 21 NOS, 0 loop inits

Member[1] : fc4/2

Member[2] : fc4/8

Interface last changed at Thu Mar  6 06:27:36 2014

此命令顯示兩個成員介面也處於「中繼」狀態。

mds9509# show interface fc2/2, fc4/8

fc2/2 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:42:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 0 bits/sec,0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec,0 bytes/sec, 0 frames/sec

31 frames input,4476 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

30 frames output,4224 bytes

0 discards,0 errors

3 input OLS,3  LRR,7 NOS,0 loop inits

5 output OLS,0 LRR, 4 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters  :never

fc4/8 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:c8:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 8 bits/sec,1 bytes/sec, 0 frames/sec

5 minutes output rate 8 bits/sec,1 bytes/sec, 0 frames/sec

45855 frames input,1934340 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

23018 frames output,1115304 bytes

0 discards,0 errors

8 input OLS,5  LRR,8 NOS,0 loop inits

7 output OLS,0 LRR, 6 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters 2w 1d

MDS 9148

此命令表示port-channel 1有兩個可操作埠。

mds9148# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc1/2

此命令顯示port-channel 1介面處於「trunking」狀態，這是所需的狀態。

附註：VSAN 1和20都為up，這表示兩個VSAN中有埠在9148上為up。

mds9148# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:fc:40:c0

Admin port mode is NP, trunk mode is on

snmp link state traps are enabled

Port mode is TNP

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 32 bits/sec,4 bytes/sec, 0 frames/sec

5 minutes output rate 32 bits/sec,4 bytes/sec, 0 frames/sec

688 frames input,91096 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

661 frames output,89080 bytes

3 discards,0 errors

14 input OLS,0  LRR,0 NOS,0 loop inits

32 output OLS,29 LRR, 14 NOS, 0 loop inits

Member[1] : fc1/2

Member[2] : fc1/14

Interface last changed at Thu Mar  6 18:48:57 2014

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

如果port-channel未啟動，請檢視以下資訊：

僅當埠和PortChannel中的配置相同時，才能將埠配置為靜態PortChannel的成員：

- 速度

- 模式

- 速率模式

- 埠VSAN

- 中繼模式

- 允許的VSAN清單或VF-ID清單

將埠配置為不在埠通道中，並驗證它是否啟動。

如需詳細資訊，請參閱設定連線埠通道。

VSAN仍在初始化中

當MDS 9148上不存在到VSAN的介面時，VSAN顯示為正在初始化。VSAN在埠通道上啟動後，如果MDS 9148上VSAN的最後一個剩餘埠關閉，則VSAN保持啟動。

已看到EPP失敗消息

確保已啟用中繼協定(EPP)。切勿將其關閉：

rtp-san-34-15-9509(config)# show trunk protocol

Trunk Protocol is enabled

如果中繼協定被禁用，則重新開啟：

mds9509(config)# show trunk protocol

Trunk Protocol is disabled

mds9509(config)# trunk protocol

mds9509(config)#

mds9509(config)# show trunk protocol

Trunk Protocol is enabled