目錄

簡介

必要條件

需求

採用元件

慣例

背景理論

設定

配置本地FC Analyzer

為遠端FC Analyzer配置

設定本地SPAN

設定遠端SPAN

連線埠分析器配接器裝置說明

驗證

疑難排解

相關資訊

簡介

與Cisco路由器產品線的調試功能類似，Cisco MDS儲存交換機具有光纖通道(FC)分析器來檢查資料包。FC分析器檢查進出交換機提供的實體的資料包。FC分析器能夠對交換機負責接收或傳送到儲存裝置的幀進行調試。FC分析器無法檢查終端站之間的幀。

要檢查會話流，應使用MDS交換機的交換埠分析器(SPAN)功能。與Cisco乙太網路交換器上的SPAN功能類似，MDS產品線上的SPAN會將資料複製到SPAN目的地連線埠，以便第三方裝置可以收集資料。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco MDS 9216交換器

- Cisco MDS 9509交換器

- 兩者均運行儲存區域網路作業系統(SAN-OS)1.2.1a。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景理論

您必須知道何時使用FC Analyzer工具以及何時使用SPAN功能。

FC分析器是一種工具，用於收集發往MDS Supervisor或來自MDS Supervisor的幀。使用此工具可以看到節點到交換機或交換機到交換機的流量。

SPAN是一種功能，允許將暫時連線到交換器的訊框複製到第二個連線埠進行分析。使用此方法可以看到節點到節點的流量。

如需圖示，請參閱下圖：

綠色箭頭表示可使用FC分析器工具進行跟蹤的流量，而粉紅色箭頭表示可使用SPAN方法捕獲的流量。FC分析器無法觀察從主機到儲存的流量。在左側交換機上運行FC analyzer時，只能看到從主機到交換機或從右側的交換機發出的流量。

SPAN可用於追蹤交換器上任何連線埠的進（輸入）和出（輸出）流量。如前面的圖所示，遠端SPAN(RSPAN)可用於收集從左側交換器（分析儀連線到右側交換器）上的主機連線埠進出的訊框。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

配置本地FC Analyzer

注意：其目的是收集源自9612 Supervisor或發往9612 Supervisor的FC幀。從主機到JBOD的幀不會使用FC分析器工具收集。

FC analyzer local通過控制檯附件或Telnet從命令列介面(CLI)運行。您可以運行一個簡短的顯示以只顯示每個幀的一小部分，或者運行一個詳細的跟蹤以顯示整個幀。

在配置模式下會啟動跟蹤，在按Ctrl-C時跟蹤會停止。預設情況下，僅捕獲100幀。要捕獲100多個幀，請將limit-captured-frames命令選項新增到用於啟動跟蹤的命令中。

也可以使用顯示過濾器將跟蹤的輸出限製為僅特定幀。

!--- VSAN 13 (0xd) is used here as example.

MDS9216# show fcdomain domain-list vsan 13

Number of domains: 2

Domain ID              WWN

---------    -----------------------

0x66(102)    20:0d:00:05:30:00:47:9f [Local] [Principal]

0x6b(107)    20:0d:00:05:30:00:51:1f

MDS9216# show fcns data vsan 13

VSAN 13:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x6600dc    NL    21:00:00:20:37:15:a2:49 (Seagate)       scsi-fcp:target

0x6600e0    NL    21:00:00:04:cf:6e:4a:8c (Seagate)       scsi-fcp:target

0x6600e1    NL    21:00:00:04:cf:6e:37:8b (Seagate)       scsi-fcp:target

0x660101    NL    10:00:00:01:73:00:81:82 (JNI)

0x660201    N     10:00:00:05:30:00:47:9f (Cisco)         ipfc

0x6b0001    N     10:00:00:05:30:00:51:23 (Cisco)         ipfc

Total number of entries = 6

!--- Configure FC analyzer for brief output.

MDS9216# config t

Enter configuration commands, one per line.  End with CNTL/Z.

MDS9216(config)# fcanalyzer local brief display-filter mdshdr.vsan==0xd

Capturing on eth2

0.000000     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

0.000095     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

18.721559     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

18.721879     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

19.970287     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

19.970368     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

38.941558     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

38.941849     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

39.940546     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

39.940628     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

在下一個示例中，您有相同的資料。但這一次，命令中省略brief選項，以提供每個資料包的詳細檢視。

MDS9216(config)# fcanalyzer local display-filter mdshdr.vsan==0xd

Capturing on eth2

Frame 1 (100 bytes on wire, 100 bytes captured)

Arrival Time: Jul  4, 2003 12:31:18.310251000

Time delta from previous packet: 0.000000000 seconds

Time relative to first packet: 0.000000000 seconds

Frame Number: 1

Packet Length: 100 bytes

Capture Length: 100 bytes

Ethernet II, Src: 00:00:00:00:00:0a, Dst: 00:00:00:00:ee:00

Destination: 00:00:00:00:ee:00 (00:00:00:00:ee:00)

Source: 00:00:00:00:00:0a (00:00:00:00:00:0a)

Type: Unknown (0xfcfc)

Vegas (FC, SOFf/EOFn)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 70

TTL: 255

0111 .... = User Priority: 7

.... 0000 0010 11.. = Dst Index: 0x000b

.... ..00 1111 1111 = Src Index: 0x00ff

Ctrl Bits: Index Directed frame (0x01)

Timestamp: 42678

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 0

Vegas Trailer

EOF: EOFn (3)

CRC: 4022250974

Fibre Channel

R_CTL: 0x02

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: SW_ILS (0x22)

F_CTL: 0x380000 (Exchange Originator, Seq Initiator, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Abort/MS, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1eb4

RX_ID: 0xffff

Parameter: 0x00000000

SW_ILS

Cmd Code: HLO (0x14)

FSPF Header

Version: 0x02

AR Number: 0x00

Authentication Type: 0x00

Originating Domain ID: 102

Authentication: 0000000000000000

Options: 00000000

Hello Interval (secs): 20

Dead Interval (secs): 80

Recipient Domain ID: 107

Originating Port Idx: 0x01000b

Frame 2 (60 bytes on wire, 60 bytes captured)

Arrival Time: Jul  4, 2003 12:31:18.310563000

Time delta from previous packet: 0.000312000 seconds

Time relative to first packet: 0.000312000 seconds

Frame Number: 2

Packet Length: 60 bytes

Capture Length: 60 bytes

Ethernet II, Src: 00:00:00:00:00:00, Dst: 00:00:00:00:00:00

Destination: 00:00:00:00:00:00 (00:00:00:00:00:00)

Source: 00:00:00:00:00:00 (00:00:00:00:00:00)

Type: Unknown (0x0000)

Vegas (FC, SOFf/EOFt)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 30

TTL: 255

0111 .... = User Priority: 7

.... 0011 1111 11.. = Dst Index: 0x00ff

.... ..00 0000 1011 = Src Index: 0x000b

Ctrl Bits: 0 (0x00)

Timestamp: 42679

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 241

Vegas Trailer

EOF: EOFt (1)

CRC: 1019832848

Fibre Channel

R_CTL: 0xc0(ACK1)

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: Unknown (0x00)

F_CTL: 0xf80000 (Exchange Responder, Seq Recipient, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Cont, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1eb4

RX_ID: 0x1e66

Parameter: 0x00000001

Frame 3 (100 bytes on wire, 100 bytes captured)

Arrival Time: Jul  4, 2003 12:31:19.309559000

Time delta from previous packet: 0.998996000 seconds

Time relative to first packet: 0.999308000 seconds

Frame Number: 3

Packet Length: 100 bytes

Capture Length: 100 bytes

Ethernet II, Src: 00:00:00:00:00:00, Dst: 00:00:00:00:00:00

Destination: 00:00:00:00:00:00 (00:00:00:00:00:00)

Source: 00:00:00:00:00:00 (00:00:00:00:00:00)

Type: Unknown (0x0000)

Vegas (FC, SOFf/EOFn)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 70

TTL: 255

0111 .... = User Priority: 7

.... 0011 1111 11.. = Dst Index: 0x00ff

.... ..00 0000 1011 = Src Index: 0x000b

Ctrl Bits: 0 (0x00)

Timestamp: 42779

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 101

Vegas Trailer

EOF: EOFn (3)

CRC: 4200187557

Fibre Channel

R_CTL: 0x02

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: SW_ILS (0x22)

F_CTL: 0x380000 (Exchange Originator, Seq Initiator, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Abort/MS, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1e67

RX_ID: 0xffff

Parameter: 0x00000000

SW_ILS

Cmd Code: HLO (0x14)

FSPF Header

Version: 0x02

AR Number: 0x00

Authentication Type: 0x00

Originating Domain ID: 107

Authentication: 0000000000000000

Options: 00000000

Hello Interval (secs): 20

Dead Interval (secs): 80

Recipient Domain ID: 102

Originating Port Idx: 0x01011c

Frame 4 (60 bytes on wire, 60 bytes captured)

Arrival Time: Jul  4, 2003 12:31:19.309646000

Time delta from previous packet: 0.000087000 seconds

Time relative to first packet: 0.999395000 seconds

Frame Number: 4

Packet Length: 60 bytes

Capture Length: 60 bytes

Ethernet II, Src: 00:00:00:00:00:0a, Dst: 00:00:00:00:ee:00

Destination: 00:00:00:00:ee:00 (00:00:00:00:ee:00)

Source: 00:00:00:00:00:0a (00:00:00:00:00:0a)

Type: Unknown (0xfcfc)

Vegas (FC, SOFf/EOFt)

Vegas Header

.000 .... = Version: 0

.... 0000 = Andiamo Type: Normal FC frame (0)

#MPLS Labels: 0

Packet Len: 30

TTL: 255

0111 .... = User Priority: 7

.... 0000 0010 11.. = Dst Index: 0x000b

.... ..00 1111 1111 = Src Index: 0x00ff

Ctrl Bits: Index Directed frame (0x01)

Timestamp: 42778

.... .000 = Status: 0 (0)

0000 0... = Reason Code: 0 (0x00)

.... 0000 0000 1101 = VSAN: 13

Checksum: 0

Vegas Trailer

EOF: EOFt (1)

CRC: 4022250974

Fibre Channel

R_CTL: 0xc0(ACK1)

Dest Addr: ff.ff.fd

CS_CTL: 0x00

Src Addr: ff.ff.fd

Type: Unknown (0x00)

F_CTL: 0xf80000 (Exchange Responder, Seq Recipient, Exchg First,

Exchg Last, Seq Last, CS_CTL, Last Data Frame - No Info,

ABTS - Cont, )

SEQ_ID: 0xe7

DF_CTL: 0x00

SEQ_CNT: 0

OX_ID: 0x1e67

RX_ID: 0x1eb5

Parameter: 0x00000001

再次顯示簡短的追蹤軌跡。但是這一次，連線埠1/16上的PC拔出並重新插入以強制登入。您可以看到與其他FC交換機之間的幀，以及與所連線的本地節點(PC)之間的幀。

MDS9216(config)# fcanalyzer local brief display-filter mdshdr.vsan==0xd

Capturing on eth2

0.000000     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

0.000310     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

0.999598     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

0.999684     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

19.990040     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

19.990295     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

20.990602     ff.ff.fd -> ff.ff.fd     SW_ILS HLO

20.990682     ff.ff.fd -> ff.ff.fd     FC Link Ctl, ACK1

26.028780     ff.fc.66 -> ff.fc.6b     SW_ILS SW_RSCN

26.029087     ff.fc.6b -> ff.fc.66     FC Link Ctl, ACK1

26.029541     ff.fc.6b -> ff.fc.66     SW_ILS SW_ACC (SW_RSCN)

26.029596     ff.fc.66 -> ff.fc.6b     FC Link Ctl, ACK1

31.151197     00.00.01 -> ff.ff.fe     FC ELS FLOGI

31.162809     ff.ff.fe -> 66.01.01     FC ELS ACC (FLOGI)

31.162841     ff.ff.fe -> 66.01.01     FC ELS ACC (FLOGI)

31.163139     66.01.01 -> ff.ff.fd     FC ELS SCR

31.163583     ff.ff.fd -> 66.01.01     FC ELS ACC (SCR)

31.163603     ff.ff.fd -> 66.01.01     FC ELS ACC (SCR)

31.163835     66.01.01 -> ff.ff.fc     FC ELS PLOGI

31.163965     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.163985     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.164186     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.164305     ff.fc.66 -> ff.fc.6b     SW_ILS SW_RSCN

31.164479     ff.fc.6b -> ff.fc.66     FC Link Ctl, ACK1

31.164628     ff.fc.6b -> ff.fc.66     SW_ILS SW_ACC (SW_RSCN)

31.164670     ff.fc.66 -> ff.fc.6b     FC Link Ctl, ACK1

31.165030     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165050     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165125     ff.fc.6b -> ff.fc.66     dNS GE_ID

31.165193     ff.fc.66 -> ff.fc.6b     FC Link Ctl, ACK1

31.165419     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.165577     ff.fc.66 -> ff.fc.6b     dNS ACC (GE_ID)

31.165781     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165804     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.165943     ff.fc.6b -> ff.fc.66     FC Link Ctl, ACK1

31.166063     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.166870     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.166892     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.167268     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.167529     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.167549     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.168704     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.169272     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.169294     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.169568     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.170453     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.170473     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.170756     66.01.01 -> ff.ff.fc     dNS GA_NXT

31.170975     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.170994     ff.ff.fc -> 66.01.01     dNS ACC (GA_NXT)

31.171400     66.01.01 -> 66.02.01     FC ELS PLOGI

31.171562     66.02.01 -> 66.01.01     FC ELS ACC (PLOGI)

31.171581     66.02.01 -> 66.01.01     FC ELS ACC (PLOGI)

31.171752     66.01.01 -> 66.02.01     FC ELS PRLI

31.171812     66.02.01 -> 66.01.01     FC ELS LS_RJT (PRLI)

31.171832     66.02.01 -> 66.01.01     FC ELS LS_RJT (PRLI)

31.173863     66.01.01 -> ff.ff.fc     FC ELS LOGO

31.175020     ff.ff.fc -> 66.01.01     FC ELS ACC (LOGO)

31.175047     ff.ff.fc -> 66.01.01     FC ELS ACC (LOGO)

31.175182     66.01.01 -> ff.ff.fc     FC ELS PLOGI

31.175290     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.175310     ff.ff.fc -> 66.01.01     FC ELS ACC (PLOGI)

31.175632     66.01.01 -> ff.ff.fa     FC ELS PLOGI

31.175753     ff.ff.fa -> 66.01.01     FC ELS ACC (PLOGI)

31.175777     ff.ff.fa -> 66.01.01     FC ELS ACC (PLOGI)

32.460020     ff.fc.66 -> 66.01.01     FC ELS PLOGI

32.460050     ff.fc.66 -> 66.01.01     FC ELS PLOGI

32.460207     66.01.01 -> ff.fc.66     FC ELS ACC (PLOGI)

32.460246     66.01.01 -> ff.fc.66     FC ELS ACC (PLOGI)

32.460340     ff.fc.66 -> 66.01.01     FC ELS PRLI

32.460362     ff.fc.66 -> 66.01.01     FC ELS PRLI

32.460492     66.01.01 -> ff.fc.66     FC ELS LS_RJT (PRLI)

32.460525     66.01.01 -> ff.fc.66     FC ELS LS_RJT (PRLI)

32.461839     ff.fc.66 -> 66.01.01     FC ELS LOGO

32.461866     ff.fc.66 -> 66.01.01     FC ELS LOGO

32.462046     66.01.01 -> ff.fc.66     FC ELS ACC (LOGO)

32.462080     66.01.01 -> ff.fc.66     FC ELS ACC (LOGO)

MDS9216(config)# ^C

MDS9216(config)# exit

為遠端FC Analyzer配置

注意：其目的是收集源自9612 Supervisor或發往9612 Supervisor的FC幀。從主機到JBOD的幀不會使用FC分析器工具收集。

FC分析器遠端運行於使用Ethereal 0.9(9)或更高版本和WinPcap 的PC上。PC的IP地址是在為啟動MDS CLI上的FC分析器跟蹤而發出的命令中指定的。在PC上，還必須從命令列啟動Ethereal，並且必須在命令中指定MDS管理介面的IP地址。

1. 要停止MDS FC分析器跟蹤，您必須從CLI按Ctrl-C。

MDS9216# config t

Enter configuration commands, one per line.  End with CNTL/Z.

MDS9216(config)# fcanalyzer remote 64.102.58.114

MDS9216(config)# ^C

請勿在上一個命令上指定active選項，否則啟動Ethereal時，您需要在PC上的命令列中新增其他選項。新增active關鍵字通常意味著您還必須配置TCP埠號。建議您使用預設值。

2. 在PC上，驗證IP地址並啟動Ethereal遠端捕獲程式。

d:\> ipconfig

Windows 2000 IP Configuration

Ethernet adapter wireless:

Connection-specific DNS Suffix  . : cisco.com

IP Address. . . . . . . . . . . . : 64.102.58.114

Subnet Mask . . . . . . . . . . . : 255.255.255.128

Default Gateway . . . . . . . . . : 64.102.58.1

Ethernet adapter builtinE:

Connection-specific DNS Suffix  . : cisco.com

Autoconfiguration IP Address. . . : 169.254.219.141

Subnet Mask . . . . . . . . . . . : 255.255.0.0

Default Gateway . . . . . . . . . :

d:\> cd ethereal099

D:\Ethereal099> ethereal099 -i rpcap://172.18.172.56/eth2

3. 程式啟動後，選擇Capture，然後按一下OK以啟動資料包收集。

在摘要顯示中，收集的FC資料包顯示為Other。

4. 按一下停止以停止資料包收集並啟動程式的跟蹤檢視部分。

可以使用過濾器將顯示限製為特定流量流。

5. 如果遠端捕獲啟動出現問題，您可能會看到與下一個影象中的錯誤螢幕相似的錯誤螢幕。FC分析器在MDS上處於非活動狀態，或者在沒有指定埠的情況下使用了active關鍵字。

設定本地SPAN

注意：目的是使用埠1/15上的FC分析器收集9216埠1/16上主機與主機之間的FC幀。

埠1/15上的FC分析器顯示有序集，但不顯示正在SPAN連線的鏈路上發生的有序集。FC分析器裝置可以是埠分析器介面卡(PAA)和運行Ethereal的PC，類似於Finisar裝置。

MDS 9216配置

MDS9216# show run

vsan 13

vsan 13 interface fc1/16

vsan 13 interface fc2/16

boot system bootflash:/m9200-ek9-mzg.1.2.0.77.bin

boot kickstart bootflash:/m9200-ek9-kickstart-mzg.1.2.0.77.bin

interface fc1/15

switchport mode SD

switchport speed 2000

no shutdown

interface fc1/16

no shutdown

interface mgmt0

ip address 172.18.172.56 255.255.255.0

span session 1

destination interface fc1/15

source interface fc1/16 rx

source interface fc1/16 tx

MDS 9216顯示器

MDS9216# show interface fc 1/15

fc1/15 is up

Hardware is Fibre Channel

Port WWN is 20:0f:00:05:30:00:47:9e

Admin port mode is SD

Port mode is SD

Port vsan is 1

Speed is 2 Gbps

Beacon is turned off

5 minutes input rate 73704 bits/sec, 9213 bytes/sec, 13 frames/sec

5 minutes output rate 2275584 bits/sec, 284448 bytes/sec, 430 frames/sec

2839098 frames input, 1883173240 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

3049460 frames output, 2038253240 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 0 loop inits

0 output OLS, 0 LRR, 0 NOS, 0 loop inits

MDS9216# show interface fc 1/16

fc1/16 is up

Hardware is Fibre Channel

Port WWN is 20:10:00:05:30:00:47:9e

Admin port mode is auto, trunk mode is on

Port mode is FL, FCID is 0x660100

Port vsan is 13

Speed is 2 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 771568 bits/sec, 96446 bytes/sec, 171 frames/sec

5 minutes output rate 1503144 bits/sec, 187893 bytes/sec, 258 frames/sec

1238843 frames input, 691853044 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1864744 frames output, 1357707740 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 49 loop inits

10 output OLS, 0 LRR, 10 NOS, 14 loop inits

MDS9216# show interface fc 2/16

fc2/16 is up

Hardware is Fibre Channel

Port WWN is 20:50:00:05:30:00:47:9e

Admin port mode is FX

Port mode is FL, FCID is 0x660000

Port vsan is 13

Speed is 1 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 12

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 1647552 bits/sec, 205944 bytes/sec, 283 frames/sec

5 minutes output rate 845624 bits/sec, 105703 bytes/sec, 188 frames/sec

1867680 frames input, 1361393600 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1241179 frames output, 694505284 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 2 loop inits

0 output OLS, 0 LRR, 0 NOS, 2 loop inits

MDS9216# show fcns data vsan 13

VSAN 13:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x6600dc    NL    21:00:00:20:37:15:a2:49 (Seagate)       scsi-fcp:target

0x6600e0    NL    21:00:00:04:cf:6e:4a:8c (Seagate)       scsi-fcp:target

0x6600e1    NL    21:00:00:04:cf:6e:37:8b (Seagate)       scsi-fcp:target

0x660101    NL    10:00:00:01:73:00:81:82 (JNI)

Total number of entries = 4

MDS9216# show span session brief

--------------------------------------------------------

Session  Admin          Oper           Destination

State          State          Interface

--------------------------------------------------------

1        no suspend     active         fc1/15

MDS9216# show span session 1

Session 1 (active)

Destination is fc1/15

No session filters configured

Ingress (rx) sources are

fc1/16,

Egress (tx) sources are

fc1/16,

MDS9216# show span internal info session 1

====================================

Admin Configuration for session [1]

====================================

Name:

Destination port: [100e000] [fc1/15] Flags [1]

State: [0] not suspended

Session Flags: [0] <>

Session Filter rx:  none

Session Filter tx:  none

Source interface - rx: fc1/16

Source interface - tx: fc1/16

Source vsan (rx):  none

Session [1] is UNLOCKED txn[0] cfg[0] rid[80000000]

====================================

Runtime Data for session [1]

====================================

Status <active: 0 inactive 1> : [0] active

State reason:[0] Flags [6]rx_span_bit [0] tx_span_bit[1] ( 4s invalid)

oper configured PHYSICAL ports

fc1/16

PHYSICAL ports undergoing configuration

none

PHYSICAL ports in error state

none

PHYSICAL ports (incl. dest) link status

fc1/15, fc1/16

設定遠端SPAN

註：目的是收集9216主機的FC幀（FC分析器連線到9509）。ST介面必須安裝Gigabit介面轉換器(GBIC)，且速度必須與9509上的Span目的地(SD)連線埠相符。

嘗試設定RSPAN之前，請確保解決了以下問題：

- 所有交換機都必須運行MDS代碼1.2或更高版本。

- 在Span終端(ST)埠中，不應將任何電纜連線到小型可插拔(SFP)。

- 在開始收集幀之前，請確保FC隧道已啟動。

- FC分析器可以是運行Ethereal的PAA和PC，類似於Finisar裝置。

如果SPAN來源和SPAN目的地交換器之間有任何中間交換器，請依照以下程式操作：

1. 在與隧道源和目標相同的子網中建立活動VSAN介面。

2. 啟用IP路由。

3. 啟用FC隧道。

4. 使用SAN-OS 1.2或更高版本。

MDS 9216配置

MDS9216# show version

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.7

loader:    version 1.0(3a)

kickstart: version 1.2(1) [build 1.2(0.77)] [gdb]

system:    version 1.2(1) [build 1.2(0.77)] [gdb]

BIOS compile time:       03/20/03

kickstart image file is: bootflash:/m9200-ek9-kickstart-mzg.1.2.0.77.bin

kickstart compile time:  6/29/2003 0:00:00

system image file is:    bootflash:/m9200-ek9-mzg.1.2.0.77.bin

system compile time:     6/29/2003 0:00:00

Hardware

RAM 963108 kB

bootflash: 503808 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

MDS9216 uptime is 0 days 21 hours 28 minute(s) 20 second(s)

Last reset at 50030 usecs after Thu Jul  3 13:09:31 2003

Reason: Reset Requested by CLI command reload

System version: 1.2(0.45c)

MDS9216# show run

Building Configuration ...

interface fc-tunnel 13

destination 10.0.0.2

source 10.0.0.1

no shutdown

vsan database

vsan 13

interface vsan13

ip address 10.0.0.1 255.255.255.0

no shutdown

vsan 13 interface fc1/16

vsan 13 interface fc2/16

boot system bootflash:/m9200-ek9-mzg.1.2.0.77.bin

boot kickstart bootflash:/m9200-ek9-kickstart-mzg.1.2.0.77.bin

fc-tunnel enable

ip routing

zone default-zone permit vsan 13

interface fc1/12

no shutdown

interface fc1/15

switchport mode ST

switchport speed 1000

rspan-tunnel interface fc-tunnel 13

no shutdown

interface fc1/16

no shutdown

interface fc2/16

no shutdown

interface mgmt0

ip address 172.18.172.56 255.255.255.0

span session 1

destination interface fc-tunnel 13

source interface fc1/16 rx

source interface fc1/16 tx

!--- Output suppressed.

MDS 9216顯示器

MDS9216# show interface fc 1/16

fc1/16 is up

Hardware is Fibre Channel

Port WWN is 20:10:00:05:30:00:47:9e

Admin port mode is auto, trunk mode is on

Port mode is FL, FCID is 0x660100

Port vsan is 13

Speed is 2 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 1480080 bits/sec, 185010 bytes/sec, 331 frames/sec

5 minutes output rate 2907712 bits/sec, 363464 bytes/sec, 498 frames/sec

574444 frames input, 320246452 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

865170 frames output, 629303788 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 10 loop inits

5 output OLS, 0 LRR, 5 NOS, 9 loop inits

MDS9216# show interface fc 2/16

fc2/16 is up

Hardware is Fibre Channel

Port WWN is 20:50:00:05:30:00:47:9e

Admin port mode is FX

Port mode is FL, FCID is 0x660000

Port vsan is 13

Speed is 1 Gbps

Transmit B2B Credit is 0

Receive B2B Credit is 12

Receive data field Size is 2112

Beacon is turned off

5 minutes input rate 2905056 bits/sec, 363132 bytes/sec, 498 frames/sec

5 minutes output rate 1480184 bits/sec, 185023 bytes/sec, 330 frames/sec

867932 frames input, 632889576 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

576681 frames output, 322771132 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 2 loop inits

0 output OLS, 0 LRR, 0 NOS, 2 loop inits

MDS9216# show interface fc 1/15

fc1/15 is up

Hardware is Fibre Channel

Port WWN is 20:0f:00:05:30:00:47:9e

Admin port mode is ST

Port mode is ST

Port vsan is 1

Speed is 1 Gbps

Rspan tunnel is fc-tunnel 13

Beacon is turned off

5 minutes input rate 4391896 bits/sec, 548987 bytes/sec, 827 frames/sec

5 minutes output rate 4391896 bits/sec, 548987 bytes/sec, 820 frames/sec

1431232 frames input, 941079708 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1406853 frames output, 941079708 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 0 loop inits

0 output OLS, 0 LRR, 0 NOS, 0 loop inits

MDS9216# show interface fc 1/12

fc1/12 is trunking

Hardware is Fibre Channel

Port WWN is 20:0c:00:05:30:00:47:9e

Peer port WWN is 20:5d:00:05:30:00:51:1e

Admin port mode is auto, trunk mode is on

Port mode is TE

Port vsan is 1

Speed is 2 Gbps

Transmit B2B Credit is 12

Receive B2B Credit is 255

Receive data field Size is 2112

Beacon is turned off

Trunk vsans (admin allowed and active) (1-5,13,20,777)

Trunk vsans (up)                       (1,13)

Trunk vsans (isolated)                 (2-5,20,777)

Trunk vsans (initializing)             ()

5 minutes input rate 384 bits/sec, 48 bytes/sec, 0 frames/sec

5 minutes output rate 4458296 bits/sec, 557287 bytes/sec, 827 frames/sec

19865 frames input, 2220112 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1468709 frames output, 971064244 bytes

0 discards, 0 errors

0 input OLS, 2 LRR, 0 NOS, 0 loop inits

2 output OLS, 2 LRR, 0 NOS, 2 loop inits

MDS9216# show interface fc-tunnel 13

fc-tunnel 13 is up

Dest   IP Addr: 10.0.0.2   Tunnel ID: 13

Source IP Addr: 10.0.0.1   LSP ID: 1

Explicit Path Name:

Outgoing interface: fc1/12

Outgoing Label(s) to Insert: 10005:0:1:ff'h

Record Routes:

10.0.0.2

MDS9216# show interface vsan 13

vsan13 is up, line protocol is up

WWPN is 10:00:00:05:30:00:47:9f, FCID is 0x660201

Internet address is 10.0.0.1/24

MTU 1500 bytes, BW 1000000 Kbit

2207 packets input, 170332 bytes, 0 errors, 0 multicast

14952 packets output, 2225444 bytes, 0 errors, 0 dropped

MDS9216# show span session 1

Session 1 (active)

Destination is fc-tunnel 13

No session filters configured

Ingress (rx) sources are

fc1/16,

Egress (tx) sources are

fc1/16,

MDS9216# show fc-tunnel internal states

number of sessions : 1

Sess: 10.0.0.2 Tunnel-ID 13 Ext-Tunnel-ID 10.0.0.1

MDS9216# show fc-tunnel internal data

vsan interfaces:

vsan 13: 10.0.0.1/255.255.255.0  [2]

vsan 2: 15.0.0.4/255.255.255.0  [2]

next hop switch information:

10.0.0.2 {vsan (13), 0x6b0001/8}: [4] fc1/12

layer 2 interfaces:

fc1/12: Trunking, Up

MDS 9509配置

RTP-9509-1# show run

Building Configuration ...

vsan database

vsan 13

interface vsan13

ip address 10.0.0.2 255.255.255.0

no shutdown

vsan 13 interface fc2/16

boot system bootflash:/m9500-sf1ek9-mzg.1.2.0.77.bin sup-1

boot kickstart bootflash:/m9500-sf1ek9-kickstart-mzg.1.2.0.77.bin sup-1

boot system bootflash:/m9500-sf1ek9-mzg.1.2.0.77.bin sup-2

boot kickstart bootflash:/m9500-sf1ek9-kickstart-mzg.1.2.0.77.bin sup-2

fc-tunnel enable

fc-tunnel tunnel-id-map 13 interface fc2/6

ip routing

switchname RTP-9509-1

interface fc2/6

switchport mode SD

switchport speed 1000

no shutdown

interface fc2/29

switchport mode E

no shutdown

interface mgmt0

ip address 172.18.172.57 255.255.255.0

MDS 9509顯示器

RTP-9509-1# show interface fc 2/29

fc2/29 is trunking

Hardware is Fibre Channel

Port WWN is 20:5d:00:05:30:00:51:1e

Peer port WWN is 20:0c:00:05:30:00:47:9e

Admin port mode is E, trunk mode is on

Port mode is TE

Port vsan is 501

Speed is 2 Gbps

Transmit B2B Credit is 255

Receive B2B Credit is 12

Receive data field Size is 2112

Beacon is turned off

Trunk vsans (admin allowed and active) (1,13,86,100,501)

Trunk vsans (up)                       (1,13)

Trunk vsans (isolated)                 (86,100,501)

Trunk vsans (initializing)             ()

5 minutes input rate 4497752 bits/sec, 562219 bytes/sec, 835 frames/sec

5 minutes output rate 344 bits/sec, 43 bytes/sec, 0 frames/sec

1934604 frames input, 1285716656 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

16903 frames output, 932076 bytes

0 discards, 0 errors

1 input OLS, 1 LRR, 2 NOS, 0 loop inits

3 output OLS, 1 LRR, 2 NOS, 0 loop inits

RTP-9509-1# show interface fc 2/6

fc2/6 is up

Hardware is Fibre Channel

Port WWN is 20:46:00:05:30:00:51:1e

Admin port mode is SD

Port mode is SD

Port vsan is 1

Speed is 1 Gbps

Beacon is turned off

5 minutes input rate 0 bits/sec, 0 bytes/sec, 0 frames/sec

5 minutes output rate 4421448 bits/sec, 552681 bytes/sec, 835 frames/sec

0 frames input, 0 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

1912319 frames output, 1263982444 bytes

0 discards, 0 errors

0 input OLS, 0 LRR, 0 NOS, 0 loop inits

0 output OLS, 0 LRR, 0 NOS, 0 loop inits

RTP-9509-1# show interface fc-tunnel 13

^

% invalid interface range detected at '^' marker.

!--- This is because the tunnel is not defined on the 9509.

RTP-9509-1# show interface vsan 13

vsan13 is up, line protocol is up

WWPN is 10:00:00:05:30:00:51:23, FCID is 0x6b0001

Internet address is 10.0.0.2/24

MTU 1500 bytes, BW 1000000 Kbit

15071 packets input, 2243728 bytes, 0 errors, 1 multicast

2342 packets output, 185864 bytes, 0 errors, 0 dropped

RTP-9509-1# show fc-tunnel tunnel-id-map

tunnel id  egress interface

13             fc2/6

14

RTP-9509-1# show fc-tunnel internal states

number of sessions : 1

Sess: 10.0.0.2 Tunnel-ID 13 Ext-Tunnel-ID 10.0.0.1

RTP-9509-1# show fc-tunnel internal data

vsan interfaces:

vsan 13: 10.0.0.2/255.255.255.0  [2]

next hop switch information:

layer 2 interfaces:

fc2/6: Non-Trunking, Up

連線埠分析器配接器裝置說明

乙太網埠是銅纜埠，其自動檢測速度為1 Gbps或100 Mbps。必須在PC上安裝Ethereal 0.9(9)或更高版本，以及WinPcap。

FC埠需要SFP和LC到LC電纜才能連線到MDS。

以下是PAA上的交換機設定：

- 交換機位置從左到右編號為1、2、3和4。

- 在下一個清單中，1表示dip開關為ON或UP。0表示dip開關已關閉或關閉。

0001 1G  NTM

1001 1G  ETM

0101 1G  STM

0011 1G  DTM

0000 2G  NTM

1000 2G  ETM

0100 2G  STM

0010 2G  DTM

1111 1G  MNM

!--- Used for diagnostics only.

- 開關4指定速度（開= 1G，關= 2G）。 交換機1、2和3指定截斷模式。任何更改都需要重新通電。

以下是模式：

- No Truncate Mode(NTM) — 無需修改即可傳遞FC幀。

- Ethernet Truncate Mode(ETM) — 將負載大小從528行減少到368行，以將FC幀中繼到最多1496位元組。

- Shallow Truncate Mode(STM) — 將負載大小從528行減少到58行，以將FC幀中繼到最多256位元組。

- 深度截斷模式(DTM) — 將負載大小從528行減少到10行，將FC幀中繼到最多64位元組。

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- MDS 9000多層次交換器硬體支援

- 儲存網路產品支援

- 技術支援 - Cisco Systems