目錄

簡介

必要條件

需求

採用元件

交換機啟動順序

交換器提示

復原程式

簡介

本文說明如何從開機載入器提示和開機模式中復原多層資料中心交換器(MDS)。

為了正常工作，MDS交換機需要有效的未損壞的Kickstart和系統映像才能完全啟動。無效、損壞或缺少Kickstart映像會阻止交換機啟動並在啟動載入程式提示符處停止。具有有效Kickstart映像，但系統映像無效或丟失的交換機最終處於引導模式。

必要條件

需求

思科建議您瞭解以下主題：

- MDS9000 CLI配置命令

- 如何設定與MDS交換機的控制檯連線。

- 如何設定MDS交換機或通過其管理埠將其連線到網路。

- 熟悉TFTP。

採用元件

本檔案中的資訊是根據軟體要求版本6.2(9)和更新版本。

本文檔使用的是支援12到48個線速16 Gbps光纖通道埠的MDS9148S交換機switch name tempest。

本文中的資訊是根據特定實驗室環境內的裝置所建立。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

交換機啟動順序

BIOS > Loader > Kickstart Image > System Image

1. 基本輸入輸出系統(BIOS)載入載入程式。

2. 載入器將Kickstart映像載入到RAM中，並啟動Kickstart映像。

3. 啟動映像載入並啟動系統映像。

4. 系統映像讀取啟動配置檔案。

交換器提示

Phase

提示

說明

BIOS

不可啟動

BIOS開始加電自檢和記憶體測試。

載入器

載入器>

啟動載入器解壓縮載入的軟體以啟動kickstart映像。

按Ctrl + C（修飾鍵和C鍵）進入引導載入程式提示。

Kickstart

switch(boot)#

引導載入程式階段結束時，按Ctrl + ]（修飾鍵和右括弧鍵）進入引導模式。

系統

登入:

系統映像載入啟動配置檔案，並將交換機返回登入提示。

復原程式

從交換機控制檯會話。

載入器>

步驟1.下載交換機的Kickstart和System映像，並將其放入TFTP伺服器目錄中。

在本例中， TFTP伺服器的IP地址為64.104.204.100。

步驟2.配置交換機管理IP地址及其預設網關。

1. 配置交換機的介面管理IP地址。

loader> net —ip=10.66.78.80

2. 配置交換機的介面管理子網掩碼

loader> net —nm=255.255.255.128

3. 配置交換機的預設網關IP地址。

loader> net —gw=10.66.78.4

在本例中：

- 交換機介面mgmt0 IP地址為10.66.78.80 255.255.255.128

- 交換機預設網關IP地址為10.66.78.4

步驟3.測試TFTP伺服器和交換機之間的IP連通性。

從TFTP伺服器ping交換機管理IP地址。

C:\Users\mpandika> ping 10.66.78.80

Pinging 10.66.78.80 with 32 bytes of data:

Reply from 10.66.78.80: bytes=32 time=2ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Ping statistics for 10.66.78.80:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 2ms, Maximum = 3ms, Average = 2ms

C:\Users\mpandika>

步驟4.啟動位於TFTP伺服器目錄中的Kickstart映像，將交換器進入開機模式。

loader> boot tftp://64.104.204.100/ m9100-s5ek9-kickstart-mz.8.3.1.bin

eTSEC2: Speed 1000, full duplex

Using eTSEC2 device

TFTP from server 64.104.204.100; our IP address is 10.66.78.80; sending through gateway 10.66.78.4

Filename 'm9100-s5ek9-kickstart-mz.8.3.1.bin'.

Load address: 0x8000000

Loading:         *#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#######

done

Bytes transferred = 26027008 (18d2400 hex)

NBI at 08000000 size 26027008

Booting image at addr 0x00800000 ...

Memory <- <0x0 0x0 0x1 0x0> (4096MB)

ethernet0: local-mac-address <- 10:05:ca:b6:c5:a0

ethernet1: local-mac-address <- 00:e0:0c:00:01:fd

ethernet2: local-mac-address <- 00:e0:0c:00:02:fd

CPU clock-frequency <- 0x3f941f80 (1067MHz)

CPU timebase-frequency <- 0x3f941f8 (67MHz)

CPU bus-frequency <- 0x1fca0fc0 (533MHz)

zImage starting: loaded at 0x00800000 (sp: 0x7fedc620)

Allocating 0x620d88 bytes for kernel ...

gunzipping (0x00000000 <- 0x00817000:0x00de3838)...done 0x5bc060 bytes

Using loader supplied ramdisk at 0x2800000-0x3de8e00

initrd head: 0x1f8b0808

Linux/PowerPC load: rw root=/dev/ram0 rdbase=0x7000000 card_index=9046 maxcpus=2 ip=off ramdisk_size=262144 noquiet obfl_type_ide=1 kgdboc=ttyS0,9600,B console=ttyS0,9600n8nn loader_ver="02.01.17" card_index=9046 quiet bootdev=mgmt0 server_ip=64.104.204.100 ksimg=m9100-s5ek9-kickstart-mz.8.3.1.bin isanimg=  Finalizing device tree... flat tree at 0xdf0140

Ísetup_arch: bootmem

mpc85xx_ds_setup_arch()

arch: exit

[    0.060378] Host controller irq 26

[    0.103390] Assign root port irq 26

[    0.144046] Host controller irq 24

[    0.193691] Assign root port irq 24

[    0.810630] physmap-flash physmap-flash.0: Could not reserve memory region

[    1.084751] Enabling all PCI devices

INIT: Checking all filesystems..r.r.r.retval=[1]

r done

WARNING: Image sync is going to be disabled after a loader netboot.

Loading system software

No system image is specified

/etc/init.d/functions: li

INIT: Sending processes the KILL signal

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

switch(boot)#

步驟5.將交換器從開機模式中復原。

1. 配置介面管理IP地址和預設網關IP地址。

switch(boot)# config t

Enter configuration commands, one per line. End with CNTL/Z.

switch(boot)(config)# interface mgmt 0

switch(boot)(config-if)# ip address 10.66.78.80 255.255.255.128

switch(boot)(config-if)# no shut

switch(boot)(config-if)# exit

switch(boot)(config)# ip default-gateway 10.66.78.4

switch(boot)(config)# exit

2. 將Kickstart和System映像從TFTP伺服器下載到交換機的bootflash。

switch(boot)# copy tftp://64.104.204.100/m9100-s5ek9-kickstart-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

switch(boot)#copy tftp://64.104.204.100/m9100-s5ek9-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

3. 驗證Kickstart和System映像是否成功下載到交換機的bootflash中。

switch(boot)# dir bootflash:

4096   Dec 22 2002 01:38:31  .partner/

297  Nov 09 2017 07:18:54  MDS201711091818530370.lic

297  Nov 09 2017 07:28:42  MDS201711091828418770.lic

4096  Jul 23 2018 14:44:25  lost+found/

26027008  Aug 08 2018 02:55:31  m9100-s5ek9-kickstart-mz.8.3.1.bin

109635731  Aug 08 2018 02:53:38  m9100-s5ek9-mz.8.3.1.bin

3430222  Feb 01 2000 02:31:30  moonlake.1.f.xsvf

23467  Jul 30 2018 12:40:56  mts.log

347607  Jul 28 2017 04:46:31  portchannel

4096  Dec 22 2002 02:38:54  scripts/

31812  Jun 30 2018 05:07:27  snmp.pcap

Usage for bootflash: filesystem

1264746496 bytes used

2106781696 bytes free

3371528192 bytes total

switch(boot)#

4. 載入系統映像。

switch(boot)# load bootflash:m9100-s5ek9-mz.8.3.1.bin

Uncompressing system image: bootflash:/m9100-s5ek9-mz.8.3.1.bin

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

Load plugins that defined in image conf: /isan/plugin_img/img.conf

No Patching support on this platform

Loading plugin 0: core_plugin...

No Patching support on this platform

Enter pboot_chk_compatibility

num srgs 1

0: swid-core-s5ek9m, swid-core-s5ek9m

num srgs 1

0: swid-sup-mini-ks, swid-sup-mini-ks

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

switch(boot)#

INIT:

2018 Aug  8 03:13:03  %SYSLOG-2-SYSTEM_MSG : Syslogs wont be logged into logflash until logflash is online

2018 Aug  8 03:13:06  %KERN-0-SYSTEM_MSG: [    1.084751] Enabling all PCI devices - kernel

2018 Aug  8 03:14:13 switch %CARDCLIENT-2-REG: OK

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2018 Aug  8 03:14:22 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Started.

System is coming up ... Please wait ...

User Access Verification

10.66.78.80 login: 2018 Aug  8 03:14:41 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Done.

2018 Aug  8 03:14:44 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Config download success .

2018 Aug  8 03:14:45 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Started.

2018 Aug  8 03:14:45 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Policy (slowdrain) activation is successfull .

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_OK: Power supply 1 ok(Serial number QCS18242L8D)

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FANOK: Fan in Power supply 1 ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FAIL: Power supply 2 failed or shut down(Serial number QCS18242L0H)

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 14:15:35 tempest %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Done.

User Access Verification

tempest login:

附註：交換機以前配置有switchname tempest。

5. 登入交換器。

tempest login: admin

Password:

Last login: Wed Aug  8 14:20:01 on pts/0

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

tempest#

6. 驗證開機變數。

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

tempest#

7. 將引導變數設定為正確的映像。

tempest# show version

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Documents: http://www.cisco.com/en/US/products/ps9372/tsd_products_support_serie

s_home.html

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained herein are owned by

other third parties and are used and distributed under license.

Some parts of this software are covered under the GNU Public

License. A copy of the license is available at

http://www.gnu.org/licenses/gpl.html.

Software

BIOS:      version 2.1.17

loader:    version N/A

kickstart: version 8.3(1)

system:    version 8.3(1)

BIOS compile time:       01/08/14

system image file is:    bootflash:///m9100-s5ek9-mz.8.3.1.bin

system compile time:     7/30/2018 12:00:00 [07/12/2018 19:32:46]

Hardware

cisco MDS 9148S 16G 48 FC (1 Slot) Chassis ("2/4/8/16 Gbps FC/Supervisor")

Motorola, e500v2 with 4088556 kB of memory.

Processor Board ID JAE18250A8C

Device name: tempest

bootflash:    4018896 kB

Kernel uptime is 0 day(s), 0 hour(s), 47 minute(s), 44 second(s)

Last reset at 362296 usecs after Wed Aug  8 13:02:31 2018

Reason: Reset Requested by CLI command reload

System version: 8.1(1)

Service:

plugin

Core Plugin

tempest# config t

Enter configuration commands, one per line.  End with CNTL/Z.

tempest(config)# boot kickstart bootflash:m9100-s5ek9-kickstart-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest(config)# boot system bootflash:m9100-s5ek9-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

8. 儲存交換機的運行配置。

tempest# copy running-config startup-config

[########################################] 100%

Copy complete.

tempest#