目錄

簡介

必要條件

需求

採用元件

問題：高磁碟效能利用率

疑難排解

思科整合運算系統(UCS)系列

惠普(HP)硬體

解決方案

簡介

本文檔描述了以下過程：當您遇到磁碟效能利用率達到100%時，並且需要檢查是應用程式問題還是硬體問題，您需要運行多個命令來分析這種情況。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 思科整合運算系統(UCS)系列

- 惠普(HP)伺服器

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

問題：高磁碟效能利用率

系統運行緩慢且不穩定。您的磁碟效能利用率達到100%。

疑難排解

快速而簡單的方法是訪問管理Web介面並檢查儲存硬體狀態。

無法訪問思科整合管理控制器(CIMC)時 對於HP伺服器上的統一計算系統(UCS)系列或整合無人值守(ILO)的遠端管理，您可以使用以下方法獲取有關RAID和磁碟的資訊：

對於思科統一計算系統(UCS)伺服器：

Debian發行版使用名為「megacli」的軟體包。

有關此工具的更多資訊 — http://hwraid.le-vert.net/wiki/LSIMegaRAIDSAS

示例如何使用命令 — http://www.mostlychris.com/blog/2009/07/29/check-raid-status-with-megacli/

可以下載並安裝debian程式包。

附註：使用megacli_8.07.14-1_amd64.deb對其進行測試

若要檢查使用的是哪些硬體控制器，請運行命令：sudo lspci -vv | grep -i RAID

例如

82:00.0 RAID匯流排控制器：LSI Logic / Symbios Logic MegaRAID SAS 2208 [Thunderbolt]（版本05）

正在使用的核心驅動程式：megaraid_sas

有關此命令的更多資訊，請參閱：

http://www.cisco.com/c/en/us/support/docs/servers-unified-computing/ucs-c-series-rack-servers/115020-intro-lsi-megacli-00.html

以root身份運行，運行命令: sudo /usr/bin/megacli

思科整合運算系統(UCS)系列

步驟1.查詢RAID控制器詳細資訊，運行命令：lspci -vv | grep -i RAID。

RAID控制器是裝置。

$ lspci -vv | grep -i RAID

82:00.0 RAID bus controller: LSI Logic / Symbios Logic MegaRAID SAS 2208 [Thunderbolt] (rev 05)

Kernel driver in use: megaraid_sas

$ sudo lspci -vv | grep -A60 -i RAID

82:00.0 RAID bus controller: LSI Logic / Symbios Logic MegaRAID SAS 2208 [Thunderbolt] (rev 05)

Subsystem: LSI Logic / Symbios Logic Device 9271

Control: I/O+ Mem+ BusMaster+ SpecCycle- MemWINV- VGASnoop- ParErr+ Stepping- SERR+ FastB2B- DisINTx+

Status: Cap+ 66MHz- UDF- FastB2B- ParErr- DEVSEL=fast >TAbort- <TAbort- <MAbort- >SERR- <PERR- INTx-

Latency: 0, Cache Line Size: 64 bytes

Interrupt: pin A routed to IRQ 56

Region 0: I/O ports at f000 [size=256]

Region 1: Memory at fbe60000 (64-bit, non-prefetchable) [size=16K]

Region 3: Memory at fbe00000 (64-bit, non-prefetchable) [size=256K]

Expansion ROM at fbe40000 [disabled] [size=128K]

Capabilities: [50] Power Management version 3

Flags: PMEClk- DSI- D1+ D2+ AuxCurrent=0mA PME(D0-,D1-,D2-,D3hot-,D3cold-)

Status: D0 NoSoftRst+ PME-Enable- DSel=0 DScale=0 PME-

Capabilities: [68] Express (v2) Endpoint, MSI 00

DevCap: MaxPayload 4096 bytes, PhantFunc 0, Latency L0s <64ns, L1 <1us

ExtTag+ AttnBtn- AttnInd- PwrInd- RBE+ FLReset+

DevCtl: Report errors: Correctable- Non-Fatal+ Fatal+ Unsupported-

RlxdOrd- ExtTag- PhantFunc- AuxPwr- NoSnoop+ FLReset-

MaxPayload 256 bytes, MaxReadReq 512 bytes

DevSta: CorrErr+ UncorrErr- FatalErr- UnsuppReq+ AuxPwr- TransPend-

LnkCap: Port #0, Speed 8GT/s, Width x8, ASPM L0s, Latency L0 <64ns, L1 <1us

ClockPM- Surprise- LLActRep- BwNot-

LnkCtl: ASPM Disabled; RCB 64 bytes Disabled- Retrain- CommClk+

ExtSynch- ClockPM- AutWidDis- BWInt- AutBWInt-

LnkSta: Speed 8GT/s, Width x8, TrErr- Train- SlotClk+ DLActive- BWMgmt- ABWMgmt-

DevCap2: Completion Timeout: Range BC, TimeoutDis+

DevCtl2: Completion Timeout: 65ms to 210ms, TimeoutDis-

LnkCtl2: Target Link Speed: 8GT/s, EnterCompliance- SpeedDis-, Selectable De-emphasis: -6dB

Transmit Margin: Normal Operating Range, EnterModifiedCompliance- ComplianceSOS-

Compliance De-emphasis: -6dB

LnkSta2: Current De-emphasis Level: -6dB, EqualizationComplete+, EqualizationPhase1+

EqualizationPhase2+, EqualizationPhase3+, LinkEqualizationRequest+

Capabilities: [d0] Vital Product Data

Unknown small resource type 00, will not decode more.

Capabilities: [a8] MSI: Enable- Count=1/1 Maskable- 64bit+

Address: 0000000000000000 Data&colon; 0000

Capabilities: [c0] MSI-X: Enable+ Count=16 Masked-

Vector table: BAR=1 offset=00002000

PBA: BAR=1 offset=00003000

Capabilities: [100 v2] Advanced Error Reporting

UESta: DLP- SDES- TLP- FCP- CmpltTO- CmpltAbrt- UnxCmplt- RxOF- MalfTLP- ECRC- UnsupReq- ACSViol-

UEMsk: DLP- SDES- TLP- FCP- CmpltTO- CmpltAbrt- UnxCmplt- RxOF- MalfTLP- ECRC- UnsupReq+ ACSViol-

UESvrt: DLP+ SDES+ TLP- FCP+ CmpltTO- CmpltAbrt- UnxCmplt- RxOF+ MalfTLP+ ECRC- UnsupReq- ACSViol-

CESta: RxErr- BadTLP- BadDLLP- Rollover- Timeout- NonFatalErr+

CEMsk: RxErr- BadTLP- BadDLLP- Rollover- Timeout- NonFatalErr+

AERCap: First Error Pointer: 00, GenCap- CGenEn- ChkCap- ChkEn-

Capabilities: [1e0 v1] #19

Capabilities: [1c0 v1] Power Budgeting <?>

Capabilities: [190 v1] #16

Capabilities: [148 v1] Alternative Routing-ID Interpretation (ARI)

ARICap: MFVC- ACS-, Next Function: 0

ARICtl: MFVC- ACS-, Function Group: 0

Kernel driver in use: megaraid_sas

步驟2.檢查統一計算系統系列(UCS)物理和虛擬驅動器，運行命令：  sudo megacli -ldinfo -lALL -aAL。

$ sudo megacli -ldinfo -lALL -aALL

Adapter 0 -- Virtual Drive Information:

Virtual Drive: 0 (Target Id: 0)

Name                :RAID10_1234

RAID Level          : Primary-1, Secondary-0, RAID Level Qualifier-0

Size                : 1.088 TB

Sector Size         : 512

Is VD emulated      : No

Mirror Data         &colon; 1.088 TB

State               : Optimal

Strip Size          : 64 KB

Number Of Drives per span:2

Span Depth          : 2

Default Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Current Cache Policy: WriteThrough, ReadAdaptive, Direct, No Write Cache if Bad                                   BBU

Default Access Policy: Read/Write

Current Access Policy: Read/Write

Disk Cache Policy   : Disk's Default

Encryption Type     : None

PI type: No PI

Is VD Cached: No

Exit Code: 0x00

您需要檢查 — 當前快取策略下的值

回寫 — 正常

直寫 — 錯誤

以下是相同專案的範例：

$ sudo megacli -ldinfo -lALL –aALL

Adapter 0 -- Virtual Drive Information:

Virtual Drive: 0 (Target Id: 0)

Name                :RAID10_1234

RAID Level          : Primary-1, Secondary-0, RAID Level Qualifier-0

Size                : 1.088 TB

Sector Size         : 512

Is VD emulated      : No

Mirror Data         : 1.088 TB

State               : Optimal

Strip Size          : 64 KB

Number Of Drives per span:2

Span Depth          : 2

Default Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Current Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Default Access Policy: Read/Write

Disk Cache Policy   : Disk's Default

Disk Cache Policy   : Disk's Default

Encryption Type     : None

PI type: No PI

Is VD Cached: No

Exit Code: 0x00

intucell@deb017:/intucell/maintenance_portal_6$

步驟3.電池檢查，運行命令: sudo megacli -AdpBbuCmd -GetBbuStatus -aALL -NoLog。

$ sudo megacli -AdpBbuCmd -GetBbuStatus -aALL -NoLog

BBU status for Adapter: 0

BatteryType: CVPM02

Voltage: 9849 mV

Current: 0 mA

Temperature: 25 C

Battery State: Optimal

BBU Firmware Status:

Charging Status              : None

Voltage                                 : OK

Temperature                             : OK

Learn Cycle Requested                   : No

Learn Cycle Active                      : No

Learn Cycle Status                      : OK

Learn Cycle Timeout                     : No

I2c Errors Detected                     : No

Battery Pack Missing                    : No

Battery Replacement required            : No

Remaining Capacity Low                  : No

Periodic Learn Required                 : No

Transparent Learn                       : No

No space to cache offload               : No

Pack is about to fail & should be replaced : No

Cache Offload premium feature required  : No

Module microcode update required        : No

BBU GasGauge Status: 0x654e

Pack energy             : 334 J

Capacitance             : 101

Remaining reserve space : 93

Exit Code: 0x00

步驟4.物理磁碟資訊，運行命令:sudo megacli -AdpAllInfo -aALL。

$ sudo megacli -AdpAllInfo -aALL

Adapter #0

==============================================================================

Versions

================

Product Name    : LSI MegaRAID SAS 9271-8i

Serial No       : SV50206143

FW Package Build: 23.29.0-0014

Mfg. Data

================

Mfg. Date       : 01/04/15

Rework Date     : 00/00/00

Revision No     : 33B

Battery FRU     : N/A

Image Versions in Flash:

================

BIOS Version       : 5.47.05.0_4.16.08.00_0x06080500

WebBIOS Version    : 6.1-71-e_71-Rel

Preboot CLI Version: 05.07-00:#%00011

FW Version         : 3.410.05-3484

NVDATA Version     : 2.1406.03-0134

Boot Block Version : 2.05.00.00-0010

BOOT Version       : 07.26.26.219

Pending Images in Flash

================

None

PCI Info

================

Controller Id   : 0000

Vendor Id       : 1000

Device Id       : 005b

SubVendorId     : 1000

SubDeviceId     : 9271

Host Interface  : PCIE

ChipRevision    : D1

Link Speed           : 0

Number of Frontend Port: 0

Device Interface  : PCIE

Number of Backend Port: 8

Port  :  Address

0        74a2e6a2b23600bf

1        0000000000000000

2        0000000000000000

3        0000000000000000

4        0000000000000000

5        0000000000000000

6        0000000000000000

7        0000000000000000

HW Configuration

================

SAS Address      : 500605b009f61dd0

BBU              : Present

Alarm            : Present

NVRAM            : Present

Serial Debugger  : Present

Memory           : Present

Flash            : Present

Memory Size      : 1024MB

TPM              : Absent

On board Expander: Absent

Upgrade Key      : Absent

Temperature sensor for ROC    : Present

Temperature sensor for controller    : Absent

ROC temperature : 74  degree Celsius

Settings

================

Current Time                     : 7:3:27 2/19, 2016

Predictive Fail Poll Interval    : 300sec

Interrupt Throttle Active Count  : 16

Interrupt Throttle Completion    : 50us

Rebuild Rate                     : 30%

PR Rate                          : 30%

BGI Rate                         : 30%

Check Consistency Rate           : 30%

Reconstruction Rate              : 30%

Cache Flush Interval             : 4s

Max Drives to Spinup at One Time : 2

Delay Among Spinup Groups        : 12s

Physical Drive Coercion Mode     : 1GB

Cluster Mode                     : Disabled

Alarm                            : Enabled

Auto Rebuild                     : Enabled

Battery Warning                  : Enabled

Ecc Bucket Size                  : 15

Ecc Bucket Leak Rate             : 1440 Minutes

Restore HotSpare on Insertion    : Disabled

Expose Enclosure Devices         : Enabled

Maintain PD Fail History         : Disabled

Host Request Reordering          : Enabled

Auto Detect BackPlane Enabled    : SGPIO/i2c SEP

Load Balance Mode                : Auto

Use FDE Only                     : Yes

Security Key Assigned            : No

Security Key Failed              : No

Security Key Not Backedup        : No

Default LD PowerSave Policy      : Automatic

Maximum number of direct attached drives to spin up in 1 min : 10

Auto Enhanced Import             : Yes

Any Offline VD Cache Preserved   : No

Allow Boot with Preserved Cache  : No

Disable Online Controller Reset  : No

PFK in NVRAM                     : Yes

Use disk activity for locate     : No

POST delay                       : 90 seconds

BIOS Error Handling              : Pause on Errors

Current Boot Mode                 :Normal

Capabilities

================

RAID Level Supported             : RAID0, RAID1, RAID5, RAID6, RAID00, RAID10, RAID50, RAID60, PRL 11, PRL 11 with spanning, SRL 3 supported, PRL11-RLQ0 DDF layout with no span, PRL11-RLQ0 DDF layout with span

Supported Drives                 : SAS, SATA

Allowed Mixing:

Mix in Enclosure Allowed

Mix of SAS/SATA of HDD type in VD Allowed

Mix of SAS/SATA of SSD type in VD Allowed

Status

================

ECC Bucket Count                 : 0

Limitations

================

Max Arms Per VD          : 32

Max Spans Per VD         : 8

Max Arrays               : 128

Max Number of VDs        : 64

Max Parallel Commands    : 1008

Max SGE Count            : 60

Max Data Transfer Size   : 8192 sectors

Max Strips PerIO         : 42

Max LD per array         : 64

Min Strip Size           : 8 KB

Max Strip Size           : 1.0 MB

Max Configurable CacheCade Size: 0 GB

Current Size of CacheCade      : 0 GB

Current Size of FW Cache       : 866 MB

Device Present

================

Virtual Drives    : 1

Degraded        : 0

Offline         : 0

Physical Devices  : 6

Disks           : 4

Critical Disks  : 0

Failed Disks    : 0

Supported Adapter Operations

================

Rebuild Rate                    : Yes

CC Rate                         : Yes

BGI Rate                        : Yes

Reconstruct Rate                : Yes

Patrol Read Rate                : Yes

Alarm Control                   : Yes

Cluster Support                 : No

BBU                             : Yes

Spanning                        : Yes

Dedicated Hot Spare             : Yes

Revertible Hot Spares           : Yes

Foreign Config Import           : Yes

Self Diagnostic                 : Yes

Allow Mixed Redundancy on Array : No

Global Hot Spares               : Yes

Deny SCSI Passthrough           : No

Deny SMP Passthrough            : No

Deny STP Passthrough            : No

Support Security                : No

Snapshot Enabled                : No

Support the OCE without adding drives : Yes

Support PFK                     : Yes

Support PI                      : Yes

Support Boot Time PFK Change    : No

Disable Online PFK Change       : No

Support LDPI Type1                      : No

Support LDPI Type2                      : No

Support LDPI Type3                      : No

PFK TrailTime Remaining         : 0 days 0 hours

Support Shield State            : Yes

Block SSD Write Disk Cache Change: No

Support Online FW Update        : Yes

Supported VD Operations

================

Read Policy          : Yes

Write Policy         : Yes

IO Policy            : Yes

Access Policy        : Yes

Disk Cache Policy    : Yes

Reconstruction       : Yes

Deny Locate          : No

Deny CC              : No

Allow Ctrl Encryption: No

Enable LDBBM         : No

Support Breakmirror  : No

Power Savings        : No

Supported PD Operations

================

Force Online                            : Yes

Force Offline                           : Yes

Force Rebuild                           : Yes

Deny Force Failed                       : No

Deny Force Good/Bad                     : No

Deny Missing Replace                    : No

Deny Clear                              : No

Deny Locate                             : No

Support Temperature                     : Yes

NCQ                                     : Yes

Disable Copyback                        : No

Enable JBOD                             : No

Enable Copyback on SMART                : No

Enable Copyback to SSD on SMART Error   : Yes

Enable SSD Patrol Read                  : No

PR Correct Unconfigured Areas           : Yes

Enable Spin Down of UnConfigured Drives : Yes

Disable Spin Down of hot spares         : No

Spin Down time                          : 30

T10 Power State                         : No

Error Counters

================

Memory Correctable Errors   : 0

Memory Uncorrectable Errors : 0

Cluster Information

================

Cluster Permitted     : No

Cluster Active        : No

Default Settings

================

Phy Polarity                     : 0

Phy PolaritySplit                : 0

Background Rate                  : 30

Strip Size                       : 64kB

Flush Time                       : 4 seconds

Write Policy                     : WB

Read Policy                      : Adaptive

Cache When BBU Bad               : Disabled

Cached IO                        : No

SMART Mode                       : Mode 6

Alarm Disable                    : Yes

Coercion Mode                    : 1GB

ZCR Config                       : Unknown

Dirty LED Shows Drive Activity   : No

BIOS Continue on Error           : 1

Spin Down Mode                   : Internal Only

Allowed Device Type              : SAS/SATA Mix

Allow Mix in Enclosure           : Yes

Allow HDD SAS/SATA Mix in VD     : Yes

Allow SSD SAS/SATA Mix in VD     : Yes

Allow HDD/SSD Mix in VD          : No

Allow SATA in Cluster            : No

Max Chained Enclosures           : 16

Disable Ctrl-R                   : Yes

Enable Web BIOS                  : Yes

Direct PD Mapping                : No

BIOS Enumerate VDs               : Yes

Restore Hot Spare on Insertion   : No

Expose Enclosure Devices         : Yes

Maintain PD Fail History         : No

Disable Puncturing               : No

Zero Based Enclosure Enumeration : No

PreBoot CLI Enabled              : Yes

LED Show Drive Activity          : No

Cluster Disable                  : Yes

SAS Disable                      : No

Auto Detect BackPlane Enable     : SGPIO/i2c SEP

Use FDE Only                     : Yes

Enable Led Header                : No

Delay during POST                : 0

EnableCrashDump                  : No

Disable Online Controller Reset  : No

EnableLDBBM                      : No

Un-Certified Hard Disk Drives    : Allow

Treat Single span R1E as R10     : No

Max LD per array                 : 64

Power Saving option              : All power saving options are enabled

Default spin down time in minutes: 30

Enable JBOD                      : No

TTY Log In Flash                 : Yes

Auto Enhanced Import             : Yes

BreakMirror RAID Support         : No

Disable Join Mirror              : No

Enable Shield State              : No

Time taken to detect CME         : 60s

Exit Code: 0x00

步驟5.一致性檢查，運行命令: sudo megacli -ldinfo -lALL -aALL。

$ sudo megacli -ldinfo -lALL -aALL

Adapter 0 -- Virtual Drive Information:

Virtual Drive: 0 (Target Id: 0)

Name                :RAID10_1234

RAID Level          : Primary-1, Secondary-0, RAID Level Qualifier-0

Size                : 1.088 TB

Sector Size         : 512

Is VD emulated      : No

Mirror Data         &colon; 1.088 TB

State               : Optimal

Strip Size          : 64 KB

Number Of Drives per span:2

Span Depth          : 2

Default Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Current Cache Policy: WriteBack, ReadAdaptive, Direct, No Write Cache if Bad BBU

Default Access Policy: Read/Write

Current Access Policy: Read/Write

Disk Cache Policy   : Disk's Default

Ongoing Progresses:

Check Consistency        : Completed 43%, Taken 11 min.

Encryption Type     : None

PI type: No PI

Is VD Cached: No

Exit Code: 0x00

步驟6.一致性檢查間隔設定，運行命令: sudo megacli -AdpCcSched -Info -aALL。

RAID控制器每7天執行一次RAID一致性檢查。此處顯示的值延遲168以小時為單位。

$ sudo megacli -AdpCcSched -Info -aALL

Adapter #0

Operation Mode: Concurrent

Execution Delay: 168

Next start time: 02/20/2016, 03:00:00

Current State: Active

Number of iterations: 43

Number of VD completed: 0

Excluded VDs          : None

Exit Code: 0x00

步驟7.獲取RAID事件日誌，運行命令：sudo megacli -AdpEventLog -GetEvents -f events.log -aALL && cat events.log |更多。

$ sudo megacli -AdpEventLog -GetEvents -f events.log -aALL && cat events.log | more

Success in AdpEventLog

Exit Code: 0x00

Adapter: 0 - Number of Events : 1404

seqNum: 0x00000002

Seconds since last reboot: 78

Code: 0x0000001e

Class: 0

Locale: 0x20

Event Description: Event log cleared

Event Data&colon;

===========

None

seqNum: 0x00000003

Seconds since last reboot: 78

Code: 0x0000002b

Class: 0

Locale: 0x20

Event Description: Test event: 'Event log adjusted, possibly due Firmware version incompatibility'

Event Data&colon;

===========

String: Event log adjusted, possibly due Firmware version incompatibility

seqNum: 0x00000004

Seconds since last reboot: 4

Code: 0x00000000

Class: 0

Locale: 0x20

Event Description: Firmware initialization started (PCI ID 005b/1000/9271/1000)

Event Data&colon;

<Snip>

檢視儲存控制器的思科整合管理Web介面上出現的問題：

電池檢查

可以儲存日誌供以後分析。

惠普(HP)硬體

對於HP，有一個用於Debian的特殊包，需要安裝該包才能訪問RAID控制器和物理磁碟。該軟體包名為hpacucli_9.40.1-1._amd64.deb

步驟1.安裝：

- 使用您的專用帳戶登入到Linux系統。

- 將軟體包下載到您的Linux系統： wget http://downloads.linux.hpe.com/SDR/repo/mcp/debian/pool/non-free/hpacucli_9.40.1-1._amd64.deb

- run命令：  sudo dpkg -i hpacucli_9.40.1-1._amd64.deb

安裝完成後，您可以使用以下CLI工具處理RAID操作：hpacucli

該工具允許從RAID控制器獲取適當資訊以及使用RAID元件更改配置。

步驟2.顯示控制器配置詳細資訊，運行命令：  hpacucli ctrl all show config detail。

# hpacucli ctrl all show config detail

Smart Array P410i in Slot 0 (Embedded)

Bus Interface: PCI

Slot: 0

Serial Number: 50123456789ABCDE

Cache Serial Number: PACCQ9SY9NUH

RAID 6 (ADG) Status: Disabled

Controller Status: OK

Hardware Revision: C

Firmware Version: 2.50

Rebuild Priority: Medium

Expand Priority: Medium

Surface Scan Delay: 15 secs

Surface Scan Mode: Idle

Queue Depth: Automatic

Monitor and Performance Delay: 60  min

Elevator Sort: Enabled

Degraded Performance Optimization: Disabled

Inconsistency Repair Policy: Disabled

Wait for Cache Room: Disabled

Surface Analysis Inconsistency Notification: Disabled

Post Prompt Timeout: 0 secs

Cache Board Present: True

Cache Status: OK

Cache Ratio: 25% Read / 75% Write

Drive Write Cache: Disabled

Total Cache Size: 256 MB

Total Cache Memory Available: 144 MB

No-Battery Write Cache: Disabled

Cache Backup Power Source: Batteries

Battery/Capacitor Count: 1

Battery/Capacitor Status: OK

SATA NCQ Supported: True

Array: A

Interface Type: SAS

Unused Space: 0  MB

Status: OK

Array Type: Data

Logical Drive: 1

Size: 136.7 GB

Fault Tolerance: 1

Heads: 255

Sectors Per Track: 32

Cylinders: 35132

Strip Size: 128 KB

Full Stripe Size: 128 KB

Status: OK

Caching:  Enabled

Unique Identifier: 600508B1001037383941424344450E00

Disk Name: /dev/cciss/c0d0

Mount Points: /boot 243 MB

OS Status: LOCKED

Logical Drive Label: A00F9DBE50123456789ABCDEA8A8

Mirror Group 0:

physicaldrive 1I:1:1 (port 1I:box 1:bay 1, SAS, 146 GB, OK)

Mirror Group 1:

physicaldrive 1I:1:2 (port 1I:box 1:bay 2, SAS, 146 GB, OK)

Drive Type: Data

physicaldrive 1I:1:1

Port: 1I

Box: 1

Bay: 1

Status: OK

Drive Type: Data Drive

Interface Type: SAS

Size: 146 GB

Rotational Speed: 10000

Firmware Revision: HPD5

Serial Number: D0A1P9B09YJW0949

Model: HP      EG0146FARTR

Current Temperature (C): 18

Maximum Temperature (C): 39

PHY Count: 2

PHY Transfer Rate: 6.0Gbps, Unknown

physicaldrive 1I:1:2

Port: 1I

Box: 1

Bay: 2

Status: OK

Drive Type: Data Drive

Interface Type: SAS

Size: 146 GB

Rotational Speed: 10000

Firmware Revision: HPD5

Serial Number: D0A1P9B09YKM0949

Model: HP      EG0146FARTR

Current Temperature (C): 17

Maximum Temperature (C): 47

PHY Count: 2

PHY Transfer Rate: 6.0Gbps, Unknown

SEP (Vendor ID PMCSIERA, Model  SRC 8x6G) 250

Device Number: 250

Firmware Version: RevC

WWID: 50123456789ABCED

Vendor ID: PMCSIERA

Model:  SRC 8x6G

步驟3.顯示控制器狀態，運行命令： hpacucli ctrl all show status。

# hpacucli ctrl all show status

Smart Array P410i in Slot 0 (Embedded)

Controller Status: OK

Cache Status: OK

Battery/Capacitor Status: OK

步驟4.顯示物理狀態，運行命令：   hpacucli ctrl slot=0 pd all show status。

# hpacucli ctrl slot=0 pd all show status

physicaldrive 1I:1:1 (port 1I:box 1:bay 1, 146 GB): OK

physicaldrive 1I:1:2 (port 1I:box 1:bay 2, 146 GB): OK

步驟5.  顯示邏輯狀態，運行命令： hpacucli ctrl slot=0 ld all show status。

# hpacucli ctrl slot=0 pd all show status

physicaldrive 1I:1:1 (port 1I:box 1:bay 1, 146 GB): OK

physicaldrive 1I:1:2 (port 1I:box 1:bay 2, 146 GB): OK

root@deb011:/intucell# hpacucli ctrl slot=0 ld all show status

logicaldrive 1 (136.7 GB, 1): OK

解決方案

有時某個伺服器中的電池故障可能是導致此問題的原因。你應該換掉它。

這解決了問題並降低了高磁碟效能利用率。