目錄

簡介

必要條件

需求

採用元件

遷移步驟

步驟1.記錄本地SP的池ID/策略/VLAN/VSAN/模板，如下所示。

步驟2.在UCS Central中重新建立所有ID/策略/VLAN/VSAN/模板和全域性SP。

步驟3.向UCS Central註冊UCSM。

步驟4.將本地配置檔案遷移到全域性配置檔案。

步驟5.驗證新的全域性配置檔案。

步驟6.將GLOBAL-SP關聯到指定的伺服器。

步驟7.分配新的全域性SP後，從SAN LUN引導伺服器

相關資訊

簡介

本文檔介紹如何將本地服務配置檔案遷移到全域性，或者如果域意外從中心註銷

必要條件

需求

思科建議您瞭解以下主題：

- 思科整合運算系統

- UCS Central

- 將本地配置檔案遷移到全域性配置檔案的過程

在下面的步驟中，假設最有挑戰性的使用案例：使用已分割槽到每個服務配置檔案中的目標啟動器(WWPN)的遠端儲存引導LUN從SAN引導。ID在遷移過程中必須保持不變。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 思科整合運算系統管理員(UCSM)

- 光纖互連(FI)

- 在ESXi VM上運行的UCS Central

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

遷移步驟

1. 記錄本地SP的池ID/策略/VLAN/VSAN/模板。

2. 在UCS Central中重新建立所有ID/策略/VLAN/VSAN/模板和全域性SP。

3. 向UCS Central註冊UCSM。

4. 將本地配置檔案遷移到全域性配置檔案。

5. 驗證新GLOBAL-SP中特定分割槽伺服器的ID是否正確。

6. 將GLOBAL-SP關聯到指定的伺服器。

7. 從SAN LUN引導伺服器。

步驟1.記錄本地SP的池ID/策略/VLAN/VSAN/模板，如下所示。

UCS-FI # scope org /

UCS-FI /org # show service-profile status

Service Profile Name Server Assignment Association   Power State   Op State

-------------------- ------- ---------- -------------- -------------- --------

SP01                1/3     Assigned   Associated     On             Ok

UCS-FI /org # scope service-profile SP01

UCS-FI /org/service-profile # show detail

Service Profile:

Service Profile Name: SP01

Boot Policy: LocalDisk

BIOS Policy: ESX_BIOS

Host f/w Policy: global-default

Local Disk Policy: LocalDisk

Maintenance Policy: UserAck

Power Policy: PowerCap

Stats Policy: TemThreshold

Scrub Policy: global-default

UCS-FI /org/service-profile # show identity

Service Profile Name: SP01

UUID Suffix Pool: P_1

Dynamic UUID: c9fe0fd0-d051-11e3-00ff-000000000101

VNIC FC Node:

WWNN Pool: P_N_1

Dynamic WWNN: 20:FF:00:25:B5:00:01:01

UCS-FI /org/service-profile # show vnic identity

vNIC:

Name       Type   Fabric ID Dynamic MAC Addr

---------- ------- --------- ----------------

ESX_Dat_A1 Ether   A         00:25:B5:0A:04:01

ESX_Dat_A2 Ether   A         00:25:B5:0A:04:02

ESX_Dat_A3 Ether   A         00:25:B5:0A:04:03

ESX_Dat_A4 Ether   A         00:25:B5:0A:04:04

vHBA:

Name       Type   Fabric ID Dynamic WWPN

---------- ------- --------- ------------

ESX_FCDat_A1 Fc     A         20:FF:00:25:B5:0A:04:01

ESX_FCDat_A2 Fc     A         20:FF:00:25:B5:0A:04:02

ESX_FCDat_B1 Fc     B         20:FF:00:25:B5:0B:04:01

UCS-FI /org/service-profile # show vnic ESX_Vcon detail

vNIC:

Adapter Policy: global-VMWare

QoS Policy: ESX_QoS

Network Control Policy: CDP_EN

Stats Policy: TemThreshold

UCS-FI /org/service-profile # show vhba ESX_SB_A1 detail

vHBA:

Adapter Policy: global-VMWare

Stats Policy: G-TemThreshold

步驟2.在UCS Central中重新建立所有ID/策略/VLAN/VSAN/模板和全域性SP。

- 建立全域性池、策略、VLAN、VSAN、vNIC模板、vHBA模板、LAN

- 連線策略、 SAN連線策略、全域性服務配置檔案模板和全域性服務配置檔案。

- 在UCS Manager中建立與本地定義的VSAN具有相同ID的全域性VSAN時，請確保全域性名稱是唯一的，考慮VSAN名稱前面的「G — 」，同時確保新建立的全域性VSAN上的FCoE VLAN ID與對應的本地VSAN上配置的FCoE VLAN ID完全匹配。如果VSAN ID相同，而FCoE ID不同，則會在全域性服務配置檔案關聯時引發故障。

- 建立全域性SP將從其各自的全域性ID池中分配新的UUID、MAC、WWNN和WWPN。

- 將這些新策略應用於新的全域性模板。

- 從模板部署全域性服務配置檔案SP01_GP

- 將WWNN/WWPN/MAC設定為新的全域性配置檔案SP01_GP以保留相同的ID

附註：建立全域性SP將從其各自的全域性ID池中分配新的UUID、MAC、WWNN和WWPN。

有關如何通過CLI分配ID，請參閱配置指南

UCS-CENTRAL# connect resource-mgr

UCS-CENTRAL(resource-mgr)# scope org /

UCS-CENTRAL(resource-mgr) /org # scope service-profile SP01_GP

UCS-CENTRAL(resource-mgr) /org/service-profile # set identity dynamic-wwnn 20:FF:00:25:B5:00:01:01

UCS-CENTRAL(resource-mgr) /org/service-profile* # commit-buffer

UCS-CENTRAL(resource-mgr) /org/service-profile # scope vnic ESX_Dat_A1

UCS-CENTRAL(resource-mgr) /org/service-profile/vnic # set identity dynamic-mac 00:25:B5:0A:04:01

UCS-CENTRAL(resource-mgr) /org/service-profile/vnic* # commit-buffer

UCS-CENTRAL((resource-mgr) /org/service-profile # scope vhba ESX_FCDat_A1

UCS-CENTRAL((resource-mgr) /org/service-profile/vhba # set identity dynamic-wwpn 20:FF:00:25:B5:0A:04:01

CODVQUCSCEN01(resource-mgr) /org/service-profile/vhba* # commit-buffer

利用簡單的UCS Central PowerTool指令碼交換或分配原始（正確分割槽）WWPN和其他ID。這些ID屬於建立的全域性池，這些ID正確分配後，ID Universe將反映「使用中」狀態。

這只是一個UCS Central PowerTools指令碼示例，並非思科官方支援的產品。請您自擔風險，在生產中使用之前先在實驗室中測試。請根據您的全域性SP設定、組織、ID、策略等編輯指令碼。

有關詳細資訊，請參閱指南

Change To (from Local SP) UUID: dc81c8de-3b00-11e5-0000-000000000025 Change To (from Local SP) MAC for vnic0: 00:25:B5:00:00:25

Change To (from Local SP) MAC for vnic1: 00:25:B5:00:00:26

Change To (from Local SP) WWNN ID: 20:00:00:25:B5:00:00:25

Change To (from Local SP) WWPN for A Fabric: 20:00:00:25:B5:AA:00:25 Change To (from Local SP) WWPN for B Fabric: 20:00:00:25:B5:BB:00:25

Start-UcsCentralTransaction

$mo = Get-UcsCentralOrg -Name root | Add-UcsCentralServiceProfile -Name “SP01_GP” -ModifyPresent -Uuid "0909ac8a-2411-11e4-0000-181401000099”

$mo_1 = $mo | Add-UcsCentralVnic -ModifyPresent -Name “eth0" -Addr "00:25:B5:0A:04:01”

$mo_2 = $mo | Add-UcsCentralVnic -ModifyPresent -Name “eth1" -Addr "00:25:B5:0A:04:02”

$mo_3 = $mo | Add-UcsCentralVhba -ModifyPresent -Name “fc0" -Addr "20:FF:00:25:B5:0A:04:01”

$mo_4 = $mo | Add-UcsCentralVhba -ModifyPresent -Name “fc1" -Addr "20:FF:00:25:B5:0A:04:02”

$mo_5 = $mo | Add-UcsCentralVnicFcNode -ModifyPresent -Addr "20:01:00:25:B5:14:01:99” Complete-UcsCentralTransaction

Start-UcsCentralTransaction

$mo = Get-UcsCentralOrg -Name root | Add-UcsCentralServiceProfile -Name “SP01_GP” -ModifyPresent -Uuid derived

$mo_1 = $mo | Add-UcsCentralVnic -ModifyPresent -Name “eth0" -Addr derived

$mo_2 = $mo | Add-UcsCentralVnic -ModifyPresent -Name “eth1" -Addr derived

$mo_3 = $mo | Add-UcsCentralvhba -ModifyPresent -Name “fc0" -Addr derived

$mo_4 = $mo | Add-UcsCentralvhba -ModifyPresent -Name “fc1" -Addr derived

$mo_5 = $mo | Add-UcsCentralVnicFcNode -ModifyPresent -Addr pool-derived

對每個ID重複以手動分配

步驟3.向UCS Central註冊UCSM。

步驟4.將本地配置檔案遷移到全域性配置檔案。

- 使用本地SP正常關閉伺服器

- 取消本地SP關聯

- Delete Local-SP（將分配的ID恢復回具有未使用狀態的池）

有關如何在UCSM中管理服務配置檔案的詳細資訊，請參閱配置指南

步驟5.驗證新的全域性配置檔案。

UCS-FI /org # show service-profile status

Central(resource-mgr) /org/service-profile # show identity

步驟6.將GLOBAL-SP關聯到指定的伺服器。

請參閱配置指南，瞭解如何從central關聯SP

步驟7.分配新的全域性SP後，從SAN LUN引導伺服器

檢查伺服器是否可以通過KVM控制檯從SAN啟動

相關資訊

- UCSM配置指南

http://www.cisco.com/c/en/us/support/servers-unified-computing/ucs-central-software/products-installation-and-configuration-guides-list.html

- 中心最佳做法

https://communities.cisco.com/servlet/JiveServlet/downloadBody/66619-102-3-120435/UCS%20Central%20Operations%20and%20Best%20Practice%20Guide.pdf

- 中央配置指南

http://www.cisco.com/c/en/us/support/servers-unified-computing/ucs-manager/products-installation-and-configuration-guides-list.html

- PowerTools套件

https://communities.cisco.com/docs/DOC-37154