簡介

本文檔介紹通過Cisco Intersight對Cisco Nutanix HCI群集執行韌體升級的過程。

背景資訊

雖然建議在修復ISM/IMM群集的韌體時使用生命週期管理器(LCM)，但是某些特定情況(如觸碰錯誤或現場通知(FN))可能需要選擇升級或降級的特定版本。在這些情況下，可以通過Intersight應用韌體更改。

與LCM過程不同，離線升級需要逐個主機手動編輯和修補韌體。在執行這些操作之前，必須瞭解群集的工作負載和容量。

使用者手動將主機置於維護模式，通過Intersight應用韌體更改，然後退出維護模式。對群集中的每個節點重複此操作。

提示：要瞭解有關群集可承受的同步缺失節點數的更多詳細資訊，請參閱Nutanix文檔群集容錯。

手動升級步驟概覽

1. 使用新的韌體版本編輯每個韌體策略。

2. 無需立即重新啟動即可部署所有配置檔案以暫存韌體。

3. 通過稜鏡元件或稜鏡中心將單個節點置於維護模式。

4. 在維護模式下啟用伺服器配置檔案以重啟伺服器並應用韌體。

5. 對群集中的所有節點重複步驟3和4。

6. 驗證升級是否完成以及群集是否正常

修改韌體策略

Intersight通過韌體策略推送韌體。每個節點都有自己的策略，通過編輯這些策略選擇新版本。

韌體策略名稱的語法為：ntnx_firmware_<序列號>_<部署UUID>

查詢並編輯策略

導覽至Policies > Click Filters > Check Firmware。

選擇要修改的策略，然後點選編輯。

從下拉清單中選擇所需的韌體版本，然後按一下Save & Deploy。

暫存韌體

重新部署伺服器配置檔案時，請確保Reboot Immediately選項未選中。這會將新韌體暫存到刀片上；僅在下一個電源週期之後執行更改。

部署開始後：

- 新的工作流程將出現在Requests頁籤中。

- 韌體下載已啟動。

- 部署伺服器而不立即重新啟動後，伺服器配置檔案顯示Inconsistent狀態。在啟用配置檔案之前，這是預期值。

繼續編輯其他所有韌體策略，並在不立即重新啟動的情況下進行部署。

通過稜鏡中心或稜鏡元件將伺服器置於維護模式

為避免中斷，必須將伺服器置於維護模式，以便在重新啟動之前遷移工作負載。

通過稜鏡元件

1. 導覽至Hardware > Diagram。

2. 選擇AHV#。

3. 選擇進入維護模式。

通過稜鏡中心

1. 導覽至Infrastructure > Hardware > Clusters。

2. 選擇Cluster。

3. 選擇特定的節點，將其置於維護模式下。

啟用配置檔案和推送韌體

一旦主機處於維護模式，韌體就可以推送到節點

1. 導航到Profiles頁籤。

2. 通過序列號查詢處於維護模式的伺服器配置檔案。

3. 選擇Actions > Activate。

（可選）通過KVM控制檯監視韌體升級進度。

驗證升級並退出維護模式

啟用完成後，伺服器配置檔案的狀態會轉換為OK。

現在，可以將該節點從維護模式中移除。

對其餘節點重複該過程，直到所有配置檔案顯示「正常」狀態。

驗證群集運行狀況

在Prism中，驗證Cluster Resiliency是OK。

相關資訊

Cisco UCS硬體相容性清單

Nutanix平台相容性和互操作性矩陣

KB-15110 LCM預檢查：test_cisco_validate_credentials_and_setup

Perform Cisco Nutanix HCI Cluster Offline Upgrade Through Intersight

## Introduction

This document describes the process to manually perform an offline firmware upgrade for Cisco Nutanix HCI clusters using Cisco Intersight when LCM is not used.

## Background Information

While it is recommended to use Life Cycle Manager (LCM) when remediating firmware for ISM/IMM Clusters, specific scenarios—such as hitting a bug or Field Notice (FN)—may require selecting a specific version for an upgrade or downgrade. In these cases, firmware changes can be applied through Intersight.

Unlike the LCM process, an offline upgrade requires editing and patching firmware on a per-host basis. It is mandatory to understand the workload and capacity of the cluster before performing these actions. During this process, the user manually places the host in Maintenance Mode, applies the firmware change via Intersight, and then exits Maintenance Mode. This is repeated for each node in the cluster.

## Manual Upgrade Steps at a Glance

1. Edit the Firmware Policy with the new firmware version.

2. Deploy all profiles without an immediate reboot to stage the firmware.

3. Place the node in Maintenance Mode via Prism Element or Prism Central.

4. Activate the profile for the server in Maintenance Mode to power cycle the server and apply firmware.

5. Repeat steps 3 and 4 for all nodes in the cluster.

## Modify Firmware Policies

Intersight pushes firmware through a Firmware Policy. Each node has its own policy, and new versions are selected by editing these policies.

The syntax for the firmware policy name is: `ntnx_firmware_

_

`

### Locate and Edit Policies

1. Navigate to **Policies** > Click **Filters** > **Type** > Check **Firmware**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image.png)

2. Select the Policy and click **Edit**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%201.png)

3. Select the desired firmware version from the drop-down list and click **Save & Deploy**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%202.png)

### Stage the Firmware

When redeploying the server profile, ensure the **Reboot Immediately** option is **unchecked**. This stages the new firmware on the blade; the change is only executed after the next power cycle. This method saves time by staging firmware across all nodes simultaneously.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%203.png)

Once deployment starts:

* A new workflow appears in the **Requests** tab.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%204.png)

* The firmware download is initiated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%205.png)

* After the server is deployed without an immediate reboot, the Server Profile will show an **Inconsistent** status. This is expected until the profile is activated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%206.png)

## Place Servers in Maintenance Mode Through Prism Central or Prism Element

To avoid disruption, servers must be placed into Maintenance Mode to migrate workloads before the reboot.

### Using Prism Element

1. Navigate to **Hardware** > **Diagram**.

2. Select the **AHV#**.

3. Select **Enter Maintenance Mode**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%207.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%208.png)

### Using Prism Central

1. Navigate to **Infrastructure** > **Hardware** > **Clusters**.

2. Select the **Cluster**.

3. Select the specific **Node** to place it in Maintenance Mode.

## Activate Profiles and Push Firmware

Once the host is in Maintenance Mode, you can push the firmware.

1. Navigate to the **Profiles** tab.

2. Locate the profile of the server in Maintenance Mode using its Serial Number.

3. Select **Actions** > **Activate**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%209.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2010.png)

4. (Optional) Monitor the firmware upgrade progress through the KVM console.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2011.png)

## Verify Upgrade and Exit Maintenance Mode

Once the activation is complete:

1. The Server Profile status transitions to **OK**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2012.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2013.png)

2. The node can now be taken out of Maintenance Mode.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2014.png)

3. Repeat the process for the remaining nodes until all profiles show an **OK** status.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2015.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2016.png)