目錄

簡介

必要條件

需求

採用元件

設定

CLI組態

GUI配置

疑難排解

簡介

本文檔介紹如何在Cisco UCS伺服器上配置上游埠通道。

必要條件

需求

思科建議您在嘗試此組態之前瞭解連線埠通道。

採用元件

本檔案中的資訊是根據思科整合運算系統(UCS)。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

UCS埠通道配置靜態設定為鏈路聚合控制協定(LACP)模式處於活動狀態。無法修改此配置；因此，所有上游埠通道配置也必須遵守LACP模式活動。或者，您可以配置上游交換機埠以進行LACP模式被動。

CLI組態

以下是無法修改的UCS介面配置示例：

UCS1-B(nxos)# show run interface eth1/19

!Command: show running-config interface Ethernet1/19

!Time: Fri Oct 12 20:25:59 2012

version 5.0(3)N2(2.11)

interface Ethernet1/19

description U: Uplink

pinning border

switchport mode trunk

switchport trunk allowed vlan 1,107,110-111,115,119,

168,175,179,183,200-201,279,283,379,383,555-556

channel-group 100 mode active

no shutdown

以下是連線埠通道介面組態：

UCS1-B(nxos)# show run interface po100

!Command: show running-config interface port-channel100

!Time: Fri Oct 12 20:21:19 2012

version 5.0(3)N2(2.11)

interface port-channel100

description U: Uplink

switchport mode trunk

pinning border

switchport trunk allowed vlan 1,107,110-111,115,119,

168,175,179,183,200-201,279,283,379,383,555-556

speed 10000

您可以在連線埠通道上執行show interface命令，以顯示連線埠通道成員：

UCS1-B(nxos)# show interface po100

port-channel100 is up

Hardware: Port-Channel, address: 000d.eccd.665a (bia 000d.eccd.665a)

Description: U: Uplink

MTU 1500 bytes, BW 20000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

Port mode is trunk

full-duplex, 10 Gb/s

Beacon is turned off

Input flow-control is off, output flow-control is off

Switchport monitor is off

EtherType is 0x8100

Members in this channel: Eth1/19, Eth1/20

上游埠通道必須是LACP才能匹配UCS配置。可能存在其他配置，但（至少）您應該看到以下配置：

5k# show run int eth1/3

!Command: show running-config interface Ethernet1/3

!Time: Sat Oct 13 00:30:51 2012

version 5.1(3)N2(1)

interface Ethernet1/3

switchport mode trunk

spanning-tree port type edge trunk

channel-group 100 mode active

注意NXOS裝置上的spanning-tree port type edge trunk。此配置可確保在鏈路擺動時，埠立即重新開啟。在故障情況下，上游交換機埠不能通過STP狀態非常重要，這會延長停機時間。有關此命令的詳細資訊，請參閱spanning-tree port type edge。

此命令的Cisco IOS等效命令是spanning-tree portfast trunk。

請參閱以下文件以瞭解更多資訊：

- Catalyst 3550多層次交換軟體組態設定指南

- 發生故障切換或回切事件時，STP可能會導致網路連線暫時中斷(1003804)

附註：使用命令查詢工具(僅供已註冊客戶使用)可獲取本節中使用的命令的更多資訊。

GUI配置

1. 建立埠通道介面。

2. 選擇埠並按一下雙箭頭將其新增到埠通道中。

3. 按一下「完成」後，埠通道顯示為「down」，而LACP會與上游交換機協商。

如果上游交換機配置正確，則整體狀態將變為Up狀態。

疑難排解

- 如果兩端的速度不同，則埠通道將不會啟動。這是常見的配置錯誤。

- 您可能需要首先單獨啟動所有鏈路並檢驗相鄰埠。使用show cdp neighbor驗證相鄰埠。