目錄

簡介

必要條件

需求

採用元件

問題

解決方案

簡介

本文檔解釋了為什麼會出現F0935故障以及問題的解決方法/修復。

Fault Code: F0935: There are multiple VLANs with id [vlan id] have different accessibility configured

必要條件

需求

思科建議您瞭解以下主題：

- 瞭解UCS上的VLAN許可權

採用元件

本檔案所述內容不限於特定軟體和硬體版本的Cisco UCS。

問題

如果您有多個具有相同VLAN ID的命名VLAN，並且您限制了一個命名VLAN對組織或子組織的許可權，我們將收到此警報。如果有多個具有相同VLAN ID的命名VLAN，則所有命名VLAN（具有相同VLAN ID）都應該具有相同的VLAN許可權限制，或者都不應該具有VLAN許可權限制。

Fault Code: F0935: There are multiple VLANs with id [vlan id] have different accessibility configured

https://www.cisco.com/c/en/us/td/docs/unified_computing/ucs/sw/cli/config/guide/2-1/b_UCSM_CLI_Configuration_Guide_2_1/b_UCSM_CLI_Configuration_Guide_2_1_chapter_010000.html

例如：如果我們有2個具有相同VLAN ID 40的命名VLAN（我們將建立），並且您已設定其中一個的許可權以限制到特定組織/子組織。

已建立2個命名型VLAN（test-vlan和prmt-vlan），VLAN ID為「40」。

UCSmin-B# scope eth-uplink

UCSmin-B /eth-uplink # create vlan test-vlan 40

UCSmin-B /eth-uplink/vlan* # commit-buffer

UCSmin-B /eth-uplink/vlan # exit

UCSmin-B /eth-uplink # create vlan prmt-vlan 40

UCSmin-B /eth-uplink/vlan* # commit-buffer

UCSmin-B /eth-uplink/vlan # exit

UCSmin-B /eth-uplink # show vlan

VLAN:

Name       VLAN ID    Fabric ID Native VLAN Sharing Type Primary Vlan Multicast Policy Name Compression Type

---------- ---------- --------- ----------- ------------ ------------ --------------------- ----------------

default    1          Dual      Yes         None                                            Included

prmt-vlan  40         Dual      No          None                                            Included

test-vlan  40         Dual      No          None                                            Included

將其中一個命名VLAN許可權限製為示例中的特定組織「組織」。

UCSmin-B# scope org

UCSmin-B /org # create vlan-permit prmt-vlan

UCSmin-B /org* # commit-buffer

UCSmin-B /org # show vlan-permit

VLAN Permit:

Name

----

prmt-vlan

生成故障「ID為40的多個VLAN配置了不同的可訪問性。」

UCSmin-B# show fault

Severity  Code     Last Transition Time     ID       Description

--------- -------- ------------------------ -------- -----------

Warning   F0935    2017-09-01T02:41:34.028   4210549 There are multiple vlans with id 40 have different accessibility configured.

Warning   F0935    2017-09-01T02:41:34.028   4210550 There are multiple vlans with id 40 have different accessibility configured.

解決方案

解決方法/修復：分配相等的VLAN許可權限制，或者從所有具有相同VLAN ID的命名VLAN中刪除限制。在這兩種情況下，警報都將被清除。

正在刪除VLAN許可權限制：

UCSmin-B /org # delete vlan-permit prmt-vlan

UCSmin-B /org* # commit-buffer

UCSmin-B /org # show vlan-permit

UCSmin-B /org # top

UCSmin-B# show fault | inc vlan

Cleared   F0935    2017-09-01T02:45:22.695   4210549 There are multiple vlans with id 40 have different accessibility configured.

Cleared   F0935    2017-09-01T02:45:22.695   4210550 There are multiple vlans with id 40 have different accessibility configured.

新增VLAN許可權限制：

UCSmin-B /org # create vlan-permit test-vlan

UCSmin-B /org* # commit-buffer

UCSmin-B /org # top

UCSmin-B# show fault | inc vlan

Cleared   F0935    2017-09-01T02:42:34.833   4210549 There are multiple vlans with id 40 have different accessibility configured.

Cleared   F0935    2017-09-01T02:42:34.833   4210550 There are multiple vlans with id 40 have different accessibility configured.