目錄

簡介

必要條件

在禁用之前終止USRM/VRSM例項一致性檢查

正在下載實用程式。

RedHat/Linux命令

ESXi說明

在VMware ESXi 5.x上安裝

VMware Vsphere命令

簡介

本文檔介紹在LSI RAID控制器上禁用獨立磁碟冗餘陣列(RAID)控制器一致性檢查的步驟，該檢查可能會對具有嚴格輸入/輸出(I/O)要求的某些應用程式產生負面影響。 一旦這些具有嚴格I/O要求的應用程式組成為通用會話和資源管理器/Videoscape會話資源管理器(USRM/VSRM)。由於運行一致性檢查時可能會對這些應用程式產生I/O等待影響，建議在所有虛擬驅動器/raid卷上禁用一致性檢查。 請參閱CSCuw01134

必要條件

採用LSI 92XX型號Raid控制器的思科統一計算系統(UCS)M3機架式伺服器。

禁用一致性檢查將需要USRM/VSRM應用程式的維護視窗。

在禁用之前終止USRM/VRSM例項一致性檢查

UCS C220上最多有8個USRM/VSRM例項。  在執行禁用一致性檢查的過程之前，需要終止每個例項。  完成一致性檢查過程後，必須手動重新啟動每個例項。

附註：下面的2個流程應包含在針對各個客戶系統/要求編寫的高級流程方法(MOP)中。  例如：mop將包括協調伺服器故障切換和回切，以最大程度地減少客戶的影響。  每個客戶可能具有在《議定書》中所滿足的不同要求。

要終止USRM/VSRM軟體，請執行以下步驟。  附註：需要為USRM/VSRM的每個例項完成這些步驟。

1. 在瀏覽器中開啟USRM/VSRM Web使用者介面(UI)

2. 導覽至Reset頁面

3. 使用下拉框將ServerState設定為「終止」。

4. 按一下「提交更改」按鈕。

Result:USRM/VSRM軟體將終止且不重新啟動。

禁用一致性檢查的流程完成後，需要手動啟動USRM/VSRM的每個例項。  針對USRM/VSRM的每個例項執行以下步驟。

1. 開啟與USRM/VSRM的SSH會話。

2. 導航到正確的目錄

1. 對於USRM:/opt/usrm

2. 對於VSRM:/common/usrm

3. 執行命令以啟動USRM/VSRM:  ./usrm -<選項（自動或受監控）> -d

1. 監督模式示例：./usrm — 受監督 — d

2. 自動模式示例：./usrm —auto -d

附註：選項前有2個破折號，引數前有1個破折號。

Result:usrm/VSRM軟體將啟動並開始處理請求。

正在下載實用程式。

下載StorCli Utility http://docs.avagotech.com/docs/12351437

StorCLI zip檔案將包含包含不同作業系統(OS)平台的安裝檔案的資料夾。

在RedHat Linux上安裝

從zip檔案的/StorCli_All_OS/Linux/資料夾提取storcli rpm檔案，然後安裝：

# rpm -ivh <StorCLI-x.xx-x.noarch.rpm>

RedHat/Linux命令

Change to the folder where storcli64 executable file was installed to, typically /opt/MegaRAID/storcli/

#cd /opt/MegaRAID/storcli

Check to make sure no consistency checks are currently in progress

storcli]#./storcli64 /c0 /vall show cc

VD Operation Progress% Status

---------------------------------------

0 CC - Not in progress <<<<<<<<<<<

1 CC - Not in progress <<<<<<<<<<<

From the output above, if any of the VDs show anything other than ‘Not in progress’, then issue the command to stop any consistency checks running:

./storcli64 /c0/vall stop cc

Issue the command to disable consistency checks from being run in the future:

./storcli64 /c0 set cc=off

Confirm that consistency checks have been disabled:

./storcli64 /c0 show cc

Controller Properties :

=====================

-----------------------------------------------

Ctrl_Prop Value

-----------------------------------------------

CC Operation Mode Disabled <<<<<<<<<<<<<<<<

CC Execution Delay 0

CC Next Starttime 06/20/1999, 19:00:00

CC Current State Stopped

CC Number of iterations 0

CC Number of VD completed 0

CC Excluded VDs None

Confirm the CC Operation Mode line shows ‘Disabled’

ESXi說明

如果環境要求在Vmware ESXi環境中禁用一致性檢查，則StorCLI應用工具安裝過程會有所不同，但storcli命令語法相同。 vSphere中預設禁用安全殼層(SSH)，在嘗試開啟主機的SSH終端之前，您需要啟用SSH。

在VMware ESXi 5.x上安裝

從zip檔案的/StorCli_All_OS/Vmware-MN/資料夾提取/複製vmware-esx-storcli-xxxxxx.vib檔案。

將vmware-esx-storcli-xxxxxx.vib檔案複製到ESXi主機的本地檔案系統，並將其複製到/tmp檔案夾。

現在運行esxcli命令進行安裝。

# esxcli software vib install -v "/tmp/vmware-esx-storcli-xxxxxx.vib" -no-sig-check

VMware Vsphere命令

Change to the folder where the Storcli executable was installed to, typically /opt/lsi/storcli

#cd /opt/lsi/storcli

Please note the ESXi storcli executable is storcli

Check to make sure no consistency checks are currently in progress

storcli]#./storcli /c0 /vall show cc

VD Operation Progress% Status

---------------------------------------

0 CC - Not in progress <<<<<<<<<<<

1 CC - Not in progress <<<<<<<<<<<

From the output above, if any of the VDs show anything other than ‘Not in progress’, then issue the command to stop any consistency checks running:

./storcli /c0/vall stop cc

Issue the command to disable consistency checks from being run in the future:

./storcli /c0 set cc=off

Confirm that consistency checks have been disabled:

./storcli /c0 show cc

Controller Properties :

=====================

-----------------------------------------------

Ctrl_Prop Value

-----------------------------------------------

CC Operation Mode Disabled <<<<<<<<<<<<<<<<

CC Execution Delay 0

CC Next Starttime 06/20/1999, 19:00:00

CC Current State Stopped

CC Number of iterations 0

CC Number of VD completed 0

CC Excluded VDs None

Confirm the CC Operation Mode line shows ‘Disabled’