目錄

簡介

必要條件

採用元件

背景資訊

預期重新啟動

意外重新啟動

要點

收集日誌捆綁包進行分析

不同重新啟動和關閉條件的預期輸出

從作業系統重新啟動 — ESXi、RHEL和Windows

OBFL日誌

RHEL - /var/log/messages

Windows — 事件日誌

從作業系統關閉 — ESXi、RHEL和Windows

OBFL日誌：

ESXi - /var/log/hostd.log

RHEL - /var/log/messages

Windows — 事件日誌

從CIMC開啟電源

OBFL日誌：

從CIMC重新通電

OBFL日誌

從CIMC斷電

OBFL日誌

PSU故障導致斷電

OBFL日誌

前按鈕電源關閉

OBFL日誌

開啟前按鈕電源

OBFL日誌

相關資訊

簡介

本文件說明如何判斷重新開機或關機是由硬體或作業系統 (OS) 所造成的。

當您確定伺服器重新啟動或關閉的原因時，需要注意幾個好的日誌位置。當您搜尋思科整合管理控制器(CIMC)技術支援時，請檢視/var/log/messages或Onboard Failure Logging(OBFL)日誌。

本文檔中提供的示例輸出來自/var/log/messages或OBFL以及ESXi、RHEL和Windows的作業系統日誌。

必要條件

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 思科整合運算系統(UCS)C200-M1韌體版本1.4(3w)

- Cisco UCS C210-M2韌體版本1.4(3w)

- Cisco UCS C220-M3韌體版本2.0(3d)

- Cisco UCS C220-M4韌體版本2.0(3f)

- ESXi 5.0 U2

- RHEL 6.6

- Windows 2008 R2

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

背景資訊

重新啟動可能是預期的，也可能是意外的。當預期到重啟時，可能並非所有利益相關方都期望重啟。為任何重新引導或關閉維護任務設定變更控制過程非常重要，這樣才能確保每個人都知道該操作。

預期重新啟動

這是由人員、進程或指令碼故意啟動的任何重新啟動或關閉事件。可通過多種方式之一啟動此操作。這些日誌片段有助於確定發生了哪個重新啟動場景，以便您可以跟蹤執行操作的人員或對象：

- 通過CIMC GUI

- 從作業系統

- 按下伺服器前面的前面板按鈕時

意外重新啟動

這是未計畫或預期的任何重新啟動，但發起操作的人員或進程仍可以預料到它。 此外，可能存在硬體故障，例如PSU故障或資料中心斷電。可以通過多種方式啟動這些功能。

如果確定前面板按鈕已按下，您可以找到在重新啟動時哪些人可以實際訪問資料中心。如果是電源問題，請與資料中心團隊聯絡，瞭解當時是否有電源故障。

- 通過CIMC GUI

- 從作業系統

- 按下伺服器前面的前面板按鈕時

- 硬體故障（例如PSU故障或電源線故障）

- 資料中心中的配電裝置(PDU)故障

- 資料中心的不間斷電源(UPS)故障、斷電或斷電

要點

- CIMC啟動的重新啟動、關閉和電源開啟始終在日誌中包含「do_power」關鍵字。

- 運行較新的韌體版本時，前面板按鈕會按下「passthrough_pin2_isr」。此外，可能沒有與此相關的OS級別事件。

- OS啟動的重新啟動和關機具有相關的OS級別事件。另請注意，「do_power」未記錄，因此可以改為記錄「High Voltage Mode」。

收集日誌捆綁包進行分析

在檢視相關日誌之前，首先需要生成日誌繫結。使用這些資源可建立必要的日誌，供您與本文檔中的輸出示例進行比較時參考：

C系列CIMC技術支援

收集技術支援檔案（B和C系列）的可視指南

ESXi

vmware知識庫

RHEL

什麼是sosreport，以及如何在Red Hat Enterprise Linux 4.6及更高版本中建立一個？

Windows

存檔Windows事件日誌

不同重新啟動和關閉條件的預期輸出

從作業系統重新啟動 — ESXi、RHEL和Windows

OBFL日誌

5:2017 Mar  2 09:46:44:BMC:kernel:-:<5>[lpc_reset_isr_handler]:79:LPC Reset ISR -> ResetState: 1

5:2017 Mar  2 09:46:44:BMC:kernel:-:<5>[readPostData]:525:BIOS_POST_CMPLT Asserted --> BIOS has completed

5:2017 Mar  2 09:46:44:BMC:kernel:-:<5>[lpc_reset_isr_handler]:79:LPC Reset ISR -> ResetState: 0

5:2017 Mar  2 09:46:44:BMC:kernel:-:<5>[lpc_reset_handler_Port80_Capture_setup]:566:

BIOS_POST_CMPLT De-asserted --> BIOS is running

5:2017 Mar  2 09:46:44:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]:1860:

block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ: HostDescriptor = 4740 : Filename = BiosTech_7.txt

5:2017 Mar  2 09:46:44:BMC:BIOSReader:1304: BIOSReader.c:242:File Open : BiosTech_7.txt

5:2017 Mar  2 09:46:44:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]:1944:

block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE : HostBTDescr = 4740 : FName = BiosTech_7.txt

5:2017 Mar  2 09:46:44:BMC:BIOSReader:1304: BIOSReader.c:748:File Close : /var/nuova/BIOS/BiosTech_7.txt

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: lv_dimm.c:129:[lpc_reset_seen]

LPC Reset Count is Different [0x77:0x78] Asserted LPC Reset Seen

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x83.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x84.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x85.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x86.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x89.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x8a.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x91.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x92.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: lv_dimm.c:200:[transition_function]

Starting Transition to [High Voltage Mode] from [Unknown Mode]

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x83.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x84.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x85.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x86.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x89.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x8a.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x91.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: common.c:940:Disabling Sensor scan for sensor 0x92.

5:2017 Mar  2 09:46:44:BMC:lv_dimm:1625: lv_dimm.c:220:[transition_function]

Transition to [High Voltage Mode] Success

...

5:2017 Mar  2 09:47:01:BMC:BIOSReader:1304: BIOSReader.c:748:File Close : /var/nuova/BIOS/DimmTempOffset

5:2017 Mar  2 09:47:06:BMC:kernel:-:<5>[lpc_reset_isr_handler]:79:LPC Reset ISR -> ResetState: 1

5:2017 Mar  2 09:47:06:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/se_pilot2_udc_usb1_1.c:2290:

USB FS: VDD Power WAKEUP- Power Good = OFF

5:2017 Mar  2 09:47:06:BMC:BIOSReader:1304: BIOSReader.c:748:File Close : /var/nuova/BIOS/BiosTech.txt

5:2017 Mar  2 09:47:06:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]:2561:USB HS: VDD Power = OFF

5:2017 Mar  2 09:47:06:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]:1944:

block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE : HostBTDescr = 4756 : FName = BiosTech.txt

5:2017 Mar  2 09:47:06:BMC:IPMI:1497: Rack_FanCtrl.c:1183:fscUpdateActualFanPolicyFile:

Applied Policy: N/A, Configuration Status: PENDING - Host powered off

5:2017 Mar  2 09:47:06:BMC:IPMI:1466: Pilot2SrvPower.c:466:Blade Power Changed To: [ OFF ]

5:2017 Mar  2 09:47:06:BMC:selparser:1547: selparser.c:710:

# 7E 03 00 00 01 02 00 00 6A 30 B8 58 20 00 04 25 05 00 00 00 08 00 FF FF # 37e | 03/02/2017 09:47:06

| CIMC | Entity presence MAIN_POWER_PRS #0x05 | Device Absent | Asserted

...

5:2017 Mar  2 09:47:12:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]:2561:USB HS: VDD Power = ON

5:2017 Mar  2 09:47:12:BMC:kernel:-:<5>[se_pilot2_udc_usb_connect]:2685:Failed  USB2.0 register test

5:2017 Mar  2 09:47:12:BMC:kernel:-:last message repeated 2 times

5:2017 Mar  2 09:47:12:BMC:kernel:-:<5>[lpc_reset_isr_handler]:79:LPC Reset ISR -> ResetState: 0

5:2017 Mar  2 09:47:12:BMC:kernel:-:<5>[lpc_reset_handler_Port80_Capture_setup]:566:

BIOS_POST_CMPLT De-asserted --> BIOS is running

5:2017 Mar  2 09:47:12:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]:1860:

block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ: HostDescriptor = 4778 : Filename = BiosTech_7.txt

5:2017 Mar  2 09:47:12:BMC:BIOSReader:1304: BIOSReader.c:242:File Open : BiosTech_7.txt

5:2017 Mar  2 09:47:12:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]:1944:

block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE : HostBTDescr = 4778 : FName = BiosTech_7.txt

5:2017 Mar  2 09:47:12:BMC:BIOSReader:1304: BIOSReader.c:748:File Close : /var/nuova/BIOS/BiosTech_7.txt

5:2017 Mar  2 09:47:12:BMC:selparser:1547: selparser.c:710:

# 7F 03 00 00 01 02 00 00 6F 30 B8 58 20 00 04 25 05 00 00 00 08 01 FF FF # 37f

| 03/02/2017 09:47:11 | CIMC | Entity presence MAIN_POWER_PRS #0x05 | Device Present | Asserted

5:2017 Mar  2 09:47:12:BMC:IPMI:1495: Pilot2SrvPower.c:466:Blade Power Changed To: [ ON ]

檢查ESXi日誌以瞭解有關作業系統為什麼啟動此事件的詳細資訊。

- /var/log/vmksummary.log

- /var/log/vmkernel.log

- /var/log/hostd.log

- /var/log/shell.log

VMware KB

RHEL - /var/log/messages

May 12 12:55:00 localhost rtkit-daemon[10450]: Demoting known real-time threads.

May 12 12:55:00 localhost rtkit-daemon[10450]: Successfully demoted thread

10987 of process 10987 (/usr/bin/pulseaudio).

May 12 12:55:00 localhost console-kit-daemon[10311]: WARNING: no sender#012

May 12 12:55:00 localhost rtkit-daemon[10450]: Demoted 1 threads.

May 12 12:55:00 localhost rpcbind: rpcbind terminating on signal.

Restart with "rpcbind -w" May 12 12:55:00 localhost init:

Disconnected from system bus

May 12 12:55:00 localhost auditd[3587]: The audit daemon is exiting.

May 12 12:55:00 localhost kernel: type=1305 audit(1431453300.949:33):

audit_pid=0 old=3587 auid=4294967295 ses=4294967295 subj=system_u:

system_r:auditd_t:s0 res=1

May 12 12:55:01 localhost kernel: type=1305 audit(1431453301.053:34):

audit_enabled=0 old=1 auid=4294967295 ses=4294967295 subj=system_u:

system_r:auditctl_t:s0 res=1

May 12 12:55:01 localhost kernel: Kernel logging (proc) stopped.

May 12 12:55:01 localhost rsyslogd: [origin software="rsyslogd" swVersion="5.8.10"

x-pid="3617" x-info="http://www.rsyslog.com"] exiting on signal 15.

May 12 12:58:27 localhost kernel: imklog 5.8.10, log source = /proc/kmsg started.

May 12 12:58:27 localhost rsyslogd: [origin software="rsyslogd" swVersion="5.8.10"

x-pid="3631" x-info="http://www.rsyslog.com"] start

May 12 12:58:27 localhost kernel: Initializing cgroup subsys cpuset

May 12 12:58:27 localhost kernel: Initializing cgroup subsys cpu

May 12 12:58:27 localhost kernel: Linux version 2.6.32-504.el6.x86_64

(mockbuild@x86-023.build.eng.bos.redhat.com) (gcc version 4.4.7 20120313

(Red Hat 4.4.7-11) (GCC) ) #1 SMP Tue Sep 16 01:56:35 EDT 2014

May 12 12:58:27 localhost kernel: Command line:

ro root=/dev/mapper/VolGroup-lv_root rd_NO_LUKS LANG=en_US.UTF-8

rd_NO_MD rd_LVM_LV=VolGroup/lv_swap SYSFONT=latarcyrheb-sun16 crashkernel=auto

rd_LVM_LV=VolGroup/lv_root  KEYBOARDTYPE=pc KEYTABLE=us rd_NO_DM rhgb quiet

有關如何排除RHEL重新啟動故障的更多提示，請參閱此Red Hat 文章。

Windows — 事件日誌

Event 1074

The process Explorer.EXE has initiated the restart of computer

WIN-5JPBKNMMRNF on behalf of user WIN-5JPBKNMMRNF\Administrator

for the following reason: Other (Planned)

Reason Code: 0x85000000

Shutdown Type: restart

Comment: C-Series Test

Event 1074

The process C:\Windows\system32\winlogon.exe (WIN-5JPBKNMMRNF) has initiated the restart

of computer WIN-5JPBKNMMRNF on behalf of user WIN-5JPBKNMMRNF\Administrator

for the following reason: No title for this reason could be found

Reason Code: 0x500ff

Shutdown Type: restart  Comment:

Event 109

The kernel power manager has initiated a shutdown transition.

Event 13

The operating system is shutting down at system time ?2015?-?05?-?18T08:26:32.778837300Z.

Event 12

The operating system started at system time ?2015?-?05?-?18T08:28:28.610798500Z.

有關Windows事件日誌的更多提示，請檢視此TechNet文章 。

從作業系統關閉 — ESXi、RHEL和Windows

OBFL日誌：

5:2015 May 12 18:03:37:BMC:IPMI:1563: Bridge.c:1478:audit from:kcs

Fn:0x6 Cmd:0x6 Data&colon; 0x85 0x83

5:2015 May 12 18:03:37:BMC:IPMI:1563: Bridge.c:1484:audit Resp:0x0

5:2015 May 12 18:03:38:BMC:kernel:-:<5>[lpc_reset_isr_handler]:79:LPC

Reset ISR -> ResetState: 1

5:2015 May 12 18:03:38:BMC:kernel:-:<5>[readPostData]:519:BIOS_POST_

CMPLT Asserted --> BIOS has completed

5:2015 May 12 18:03:38:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/se_pilot2_udc_

usb1_1.c:2288:USB FS:

VDD Power WAKEUP- Power Good = OFF

5:2015 May 12 18:03:38:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]

:2561:USB HS: VDD Power = OFF

5:2015 May 12 18:03:38:BMC:IPMI:1563: Pilot3SrvPower.c:484:Blade Power Changed To: [ OFF ]

5:2015 May 12 18:03:38:BMC:video_trigger:-: video_trigger.c:262:

Sending event_ipmi_power_state_change (OFF) ..

5:2015May 12 18:03:39:BMC:selparser:1602: selparser.c:678:

# 11 04 00 00 01 02 00 00 7A 40 52 55 2C 60 04 DC 1A 00 00 00 F4 03 00 00

# 411 | 05/12/2015 18:03:38 | Unknown #0x602c | Unknown #0x1a |

5:2015 May 12 18:03:39:BMC:selparser:1602: selparser.c:678:

# 12 04 00 00 01 02 00 00 7A 40 52 55 20 00 04 25 A9 00 00 00 08 00 FF FF  # 412 |

05/12/2015 18:03:38 | CIMC | Entity presence MAIN_POWER_PRS #0xa9 | Device Absent | Asserted

ESXi - /var/log/hostd.log

2015-05-15T00:46:01.809Z [28B69B90 info 'TaskManager'] Task Created :

haTask--vim.host.AutoStartManager.autoPowerOff-245137084

2015-05-15T00:46:01.810Z [28AE7B90 info 'TaskManager'] Task Completed :

haTask--vim.host.AutoStartManager.autoPowerOff-245137084 Status success

2015-05-15T00:46:01.814Z [28AE7B90 verbose 'Default']

CloseSession called for session id=526869fe-3f96-f54a-4bb6-41250fa3242b

2015-05-15T00:46:01.814Z [28AE7B90 info 'ha-eventmgr'] Event 107 : User dcui logged out

2015-05-15T00:46:01.822Z [28AA6B90 verbose 'Proxysvc Req00060'] New proxy client SSL

(TCP(local=127.0.0.1:0, peer=127.0.0.1:58274))

2015-05-15T00:46:01.822Z [28AA6B90 warning 'Proxysvc Req00060'] Error reading from

client while waiting for header: N7Vmacore15SystemExceptionE(Connection reset by peer)

2015-05-15T00:46:02.077Z [29441B90 verbose 'Proxysvc Req00061'] New proxy client

SSL(TCP(local=127.0.0.1:443, peer=127.0.0.1:58877))

2015-05-15T00:46:02.088Z [28AE7B90 verbose 'Ticket 52 27 9e 4d f0 16 ac aa-13 f8

86 f9 f1 a3 61 8b'] Ticket issued for dcui

2015-05-15T00:46:02.090Z [2930AB90 verbose 'Ticket 52 27 9e 4d f0 16 ac aa-13 f8

86 f9 f1 a3 61 8b'] Ticket used

Accepted password for user dcui from 127.0.0.1

2015-05-15T00:46:02.090Z [2930AB90 info 'Vimsvc'] [Auth]: User dcui

2015-05-15T00:46:02.091Z [2930AB90 info 'ha-eventmgr'] Event 108 :

User dcui@127.0.0.1 logged in

2015-05-15T00:46:02.093Z [29366B90 info 'InternalServiceInstance'] Shutting down service

2015-05-15T00:46:22.104Z [FFAB2AD0 error 'Default'] SSLStreamImpl::

BIORead (291a1000) timed out

Section for VMware ESX, pid=2882, version=5.0.0, build=build-914586, option=Release

RHEL - /var/log/messages

May 12 13:03:24 localhost init: tty (/dev/tty2) main process

(10152) killed by TERM signal

May 12 13:03:24 localhost init: tty (/dev/tty3) main process

(10154) killed by TERM signal

May 12 13:03:24 localhost init: tty (/dev/tty4) main process

(10156) killed by TERM signal

May 12 13:03:24 localhost init: tty (/dev/tty5) main process

(10158) killed by TERM signal

May 12 13:03:24 localhost init: tty (/dev/tty6) main process

(10162) killed by TERM signal

May 12 13:03:25 localhost abrtd: Got signal 15, exiting

May 12 13:03:29 localhost acpid: exiting

May 12 13:03:30 localhost NetworkManager[9732]: <info>

caught signal 15, shutting down normally.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth0): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth0): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth1): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth1): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth4): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth4): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth5): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth5): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth6): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth6): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth7): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth7): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth2): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth2): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth3): cleaning up...

May 12 13:03:30 localhost NetworkManager[9732]: <info> (eth3): taking down device.

May 12 13:03:30 localhost NetworkManager[9732]: <info> exiting (success)

May 12 13:03:31 localhost rpcbind: rpcbind terminating on signal.

Restart with "rpcbind -w"

May 12 13:03:31 localhost rtkit-daemon[10367]: Demoting known real-time threads.

May 12 13:03:31 localhost rtkit-daemon[10367]: Successfully demoted thread 1

0365 of process 10365 (/usr/bin/pulseaudio).

May 12 13:03:31 localhost rtkit-daemon[10367]: Demoted 1 threads.

May 12 13:03:31 localhost console-kit-daemon[10228]: WARNING: no sender#012

May 12 13:03:31 localhost init: Disconnected from system bus

May 12 13:03:31 localhost auditd[3601]: The audit daemon is exiting.

May 12 13:03:31 localhost kernel: type=1305 audit(1431453811.355:22):

audit_pid=0 old=3601 auid=4294967295 ses=4294967295 subj=system_u

:system_r:auditd_t:s0 res=1

May 12 13:03:31 localhost kernel: type=1305 audit(1431453811.459:23):

audit_enabled=0 old=1 auid=4294967295 ses=4294967295 subj=system_u

:system_r:auditctl_t:s0 res=1

May 12 13:03:31 localhost kernel: Kernel logging (proc) stopped.

May 12 13:03:31 localhost rsyslogd: [origin software="rsyslogd"

swVersion="5.8.10" x-pid="3631" x-info="http://www.rsyslog.com"] exiting on signal 15.

Windows — 事件日誌

Event 1074

The process C:\Windows\system32\winlogon.exe (WIN-5JPBKNMMRNF)

has initiated the power off of computer WIN-5JPBKNMMRNF on behalf

of user WIN-5JPBKNMMRNF\Administrator

for the following reason: No title for this reason could be found

Reason Code: 0x500ff

Shutdown Type: power off

Comment

Event 1074

The process Explorer.EXE has initiated the shutdown of computer

WIN-5JPBKNMMRNF on behalf of

user WIN-5JPBKNMMRNF\Administrator for the following reason: Other (Planned)

Reason Code: 0x85000000

Shutdown Type: shutdown

Comment: Shut down Test

Event 109

The kernel power manager has initiated a shutdown transition.

Event 13

The operating system is shutting down at system time ?2015?-?05?-?18T08:38:13.237425300Z.

從CIMC開啟電源

OBFL日誌：

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[__do_power_on]:340:__do_power_on

5:2015 May 12 18:08:31:BMC:IPMI:1563: Bridge.c:1478:audit from:kcs Fn:0x0 Cmd:0x2

Data&colon; 0x1

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[__do_power_on]:345:Power Driver:

Power On Logic Pulse for 250ms @ 25164275955:2015 May 12 18:08:31:BMC:IPMI:

1563: Bridge.c:1484:audit Resp:0x0

5:2015 May 12 18:08:31:BMC:AUDIT:20723: Server power state modify (op:power-on)

5:2015 May 12 18:08:31:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/

se_pilot2_udc_usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = ON

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]

:2561:USB HS: VDD Power = ON

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[se_pilot2_udc_usb_connect]:

2685:Failed  USB2.0 register test

5:2015 May 12 18:08:31:BMC:IPMI:1565: Pilot3SrvPower.c:481:  ->

Power State On: LPC RESET is NOT IN RESET; powerOnLPCOff[2]

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[se_pilot2_udc_usb_connect]

:2685:Failed  USB2.0 register test

5:2015 May 12 18:08:31:BMC:IPMI:1565: Pilot3SrvPower.c:484:Blade

Power Changed To: [ ON ]

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[lpc_reset_isr_handler]

:79:LPC Reset ISR -> ResetState: 0

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[lpc_reset_handler_Port80_Capture_setup]

:560:BIOS_POST_CMPLT De-asserted --> BIOS is running

5:2015 May 12 18:08:31:BMC:IPMI:1566: Pilot3SrvPower.c:191:Pilot2SrvPowerOn

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[__do_power_on]:375:

Power Driver: Power On Logic Done @ 2516427846

5:2015 May 12 18:08:31:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_7.txt

5:2015 May 12 18:08:31:BMC:BIOSReader:1247: BIOSReader.c:748:File Close

: /var/nuova/BIOS/BiosTech_7.txt

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 1406 : Filename = BiosTech_7.txt

5:2015 May 12 18:08:31:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1944:block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE :

HostBTDescr = 1406 : FName = BiosTech_7.txt

5:2015 May 12 18:08:32:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 1408 : Filename = BiosTech_6.txt

5:2015 May 12 18:08:32:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_6.txt

5:2015 May 12 18:08:32:BMC:BIOSReader:1247: BIOSReader.c:748:File Close

: /var/nuova/BIOS/BiosTech_6.txt

5:2015 May 12 18:08:32:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1944:block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE :

HostBTDescr = 1408 : FName = BiosTech_6.txt

5:2015 May 12 18:08:32:BMC:video_trigger:-: video_trigger.c:262:Sending

event_ipmi_power_state_change (ON) ..

5:2015 May 12 18:08:32:BMC:video_trigger:-: video_trigger.c:137:Sending

event_server_boot_start..

5:2015 May 12 18:08:32:BMC:video_trigger:-: video_trigger.c:148:

Will be able to send event_server_crash..

5:2015 May 12 18:08:32:BMC:selparser:1602: selparser.c:678:

# 13 04 00 00 01 02 00 00 A0 41 52 55 2C 60 04 DC 1A 00 00 00 74 07 00 00

# 413 | 05/12/2015 18:08:32 | Unknown

#0x602c | Unknown #0x1a |

5:2015 May 12 18:08:32:BMC:selparser:1602: selparser.c:678:

# 14 04 00 00 01 02 00 00 A0 41 52 55 20 00 04 25 00 00 00 00 08 00 FF FF

# 414 | 05/12/2015 18:08:32 | CIMC | Entity presence BIOS_POST_CMPLT

#0x00 | Device Absent | Asserted

5:2015 May 12 18:08:32:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 1410 : Filename = BiosTech_5.txt

5:2015 May 12 18:08:32:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1944:block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE :

HostBTDescr = 1410 : FName = BiosTech_5.txt

5:2015 May 12 18:08:32:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_5.txt

從CIMC重新通電

OBFL日誌

5:2015 May 12 19:18:45:BMC:kernel:-:<5>[do_cycle]:560:do_cycle

5:2015 May 12 19:18:45:BMC:IPMI:1563: Bridge.c:1478:audit from:kcs Fn:0x0

Cmd:0x2 Data&colon; 0x2

5:2015 May 12 19:18:45:BMC:kernel:-:<5>[__do_power_off]:298:__do_power_off

5:2015 May 12 19:18:45:BMC:IPMI:1563: Bridge.c:1484:audit Resp:0x0

5:2015 May 12 19:18:45:BMC:kernel:-:<5>[__do_power_off]:300:Power Driver:

Power Off Logic @ 2520641182

5:2015 May 12 19:18:45:BMC:IPMI:1566: Pilot3SrvPower.c:539:

Pilot2SrvPowerCycle

5:2015 May 12 19:18:45:BMC:AUDIT:20723: Server power state modify

(op:power-cycle)

5:2015 May 12 19:18:49:BMC:kernel:-:<5>[lpc_reset_isr_handler]:

79:LPC Reset ISR -> ResetState: 1

5:2015 May 12 19:18:49:BMC:kernel:-:<5>[readPostData]:519:

BIOS_POST_CMPLT Asserted --> BIOS has completed

5:2015 May 12 19:18:49:BMC:kernel:-:<5>drivers/bmc/usb/

usb1.1/se_pilot2_udc_usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = OFF

5:2015 May 12 19:18:49:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]

:2561:USB HS: VDD Power = OFF

5:2015 May 12 19:18:49:BMC:video_trigger:-: video_trigger.c:262:

Sending event_ipmi_power_state_change (OFF) ..

5:2015 May 12 19:18:49:BMC:IPMI:1532: Pilot3SrvPower.c:484:

Blade Power Changed To: [ OFF ]

5:2015 May 12 19:18:49:BMC:selparser:1602: selparser.c:678:

# 1A 04 00 00 01 02 00 00 19 52 52 55 20 00 04 25 A9 00 00 00 08 00 FF FF

# 41a | 05/12/2015 19:18:49 | CIMC | Entity presence MAIN_POWER_PRS #0xa9

| Device Absent | Asserted

5:2015 May 12 19:18:55:BMC:selparser:1602: selparser.c:678:

# 1B 04 00 00 01 02 00 00 1E 52 52 55 2C 60 04 DC 1A 00 00 00 74 03 00 00

# 41b | 05/12/2015 19:18:54 | Unknown #0x602c | Unknown #0x1a |

5:2015 May 12 19:18:55:BMC:selparser:1602: selparser.c:678:

# 1C 04 00 00 01 02 00 00 1E 52 52 55 2C 60 04 16 16 00 00 00 0A 00 00 00

# 41c | 05/12/2015 19:18:54 | Unknown

#0x602c | Microcontroller/Coprocessor

#0x16 | Transition to Running | Asserted

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[__do_power_on]:340:__do_power_on

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[__do_power_on]:345:

Power Driver: Power On Logic Pulsefor 250ms @ 2520661694

5:2015 May 12 19:19:05:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/

se_pilot2_udc_usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = ON

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]

:2561:USB HS: VDD Power = ON

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[se_pilot2_udc_usb_connect]:

2685:Failed  USB2.0 register test

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[se_pilot2_udc_usb_connect]:

2685:Failed  USB2.0 register test

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[lpc_reset_isr_handler]

:79:LPC Reset ISR -> ResetState: 0

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[lpc_reset_handler_Port80_Capture_setup]

:560:BIOS_POST_CMPLT De-asserted --> BIOS is running

5:2015 May 12 19:19:05:BMC:IPMI:1566: Pilot3SrvPower.c:542:Pilot2SrvPowerCycle

5:2015 May 12 19:19:05:BMC:kernel:-:<5>[__do_power_on]

:375:Power Driver: Power On Logic Done @ 2520661945

5:2015 May 12 19:19:05:BMC:IPMI:1566: Pilot3SrvPower.c:481:

-> Power State On: LPC RESET is NOT IN RESET; powerOnLPCOff[2]

5:2015 May 12 19:19:05:BMC:IPMI:1566: Pilot3SrvPower.c:484:

Blade Power Changed To: [ ON ]

5:2015 May 12 19:19:06:BMC:BIOSReader:1247: BIOSReader.c:242:

File Open : BiosTech_7.txt

5:2015 May 12 19:19:06:BMC:BIOSReader:1247: BIOSReader.c:748:

File Close : /var/nuova/BIOS/BiosTech_7.txt

5:2015 May 12 19:19:06:BMC:kernel:-:<5>[block_transfer_fetch_host_

request_for_app]:1860:block_transfer_fetch_host_request_for_app:

BT_OPEN_FOR_READ: HostDescriptor = 1466 : Filename = BiosTech_7.txt

5:2015 May 12 19:19:06:BMC:kernel:-:<5>[block_transfer_fetch_host_

request_for_app]:1944:block_transfer_fetch_host_request_for_app :

BT_FILE_CLOSE : HostBTDescr = 1466 : FName = BiosTech_7.txt

5:2015 May 12 19:19:06:BMC:selparser:1602: selparser.c:678:

# 1D 04 00 00 01 02 00 00 29 52 52 55 2C 60 04 DC 1A 00 00 00 74 07 00 00

# 41d | 05/12/2015 19:19:05 | Unknown #0x602c | Unknown #0x1a |

5:2015 May 12 19:19:06:BMC:video_trigger:-: video_trigger.c:262:

Sending event_ipmi_power_state_change (ON) ..

5:2015 May 12 19:19:06:BMC:video_trigger:-: video_trigger.c:137:

Sending event_server_boot_start  ..

5:2015 May 12 19:19:06:BMC:video_trigger:-: video_trigger.c:148:

Will be able to send event_server_crash  ..

5:2015 May 12 19:19:06:BMC:kernel:-:<5>[block_transfer_fetch_host_

request_for_app]:1860:block_transfer_fetch_host_request_for_app:

BT_OPEN_FOR_READ: HostDescriptor = 1468 : Filename = BiosTech_6.txt

從CIMC斷電

OBFL日誌

5:2015 May 12 20:18:25:BMC:kernel:-:<5>[__do_power_off]:298:__do_power_off

5:2015 May 12 20:18:25:BMC:IPMI:1563: Bridge.c:1478:audit from:kcs Fn:0x0

Cmd:0x2 Data&colon; 0x0

5:2015 May 12 20:18:25:BMC:kernel:-:<5>[__do_power_off]:300:Power Driver:

Power Off Logic@ 2524221543

5:2015 May 12 20:18:25:BMC:IPMI:1563: Bridge.c:1484:audit Resp:0x0

5:2015 May 12 20:18:25:BMC:AUDIT:20723: Server power state modify (op:power-off)

5:2015 May 12 20:18:30:BMC:kernel:-:<5>[lpc_reset_isr_handler]:

79:LPC Reset ISR -> ResetState: 1

5:2015 May 12 20:18:30:BMC:kernel:-:<5>[readPostData]:519:BIOS_POST_CMPLT

Asserted --> BIOS has completed

5:2015 May 12 20:18:30:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/se_pilot2_udc_

usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = OFF

5:2015 May 12 20:18:30:BMC:IPMI:1567: Pilot3SrvPower.c:484:Blade Power Changed To: [ OFF ]

5:2015 May 12 20:18:30:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]:

2561:USB HS: VDD Power = OFF

5:2015 May 12 20:18:30:BMC:selparser:1602: selparser.c:678:

# 24 04 00 00 01 02 00 00 16 60 52 55 20 00 04 25 A9 00 00 00 08 00 FF FF

# 424 | 05/12/2015 20:18:30 | CIMC | Entity presence MAIN_POWER_PRS

#0xa9 | Device Absent | Asserted

5:2015 May 12 20:18:30:BMC:video_trigger:-: video_trigger.c:262:

Sending event_ipmi_power_state_change (OFF) ..

5:2015 May 12 20:18:31:BMC:vkcs_mux:1582: vkcs_mux.c:76:[REQ] 00 01

5:2015 May 12 20:18:36:BMC:IPMI:1566: Pilot3SrvPower.c:348:Pilot2SrvPowerOff

5:2015 May 12 20:18:37:BMC:kernel:-:<5>[__do_power_off]:298:__do_power_off

5:2015 May 12 20:18:37:BMC:blade-power:11311: host-power.c:53:POWER Off

5:2015 May 12 20:18:38:BMC:run-update:11313: ../..

/src/runupdate.c:511:Run-update Process Starting.

5:2015 May 12 20:18:38:BMC:run-update:11313: ../..

/src/runupdate.c:44:Setting FP Button Lock: current state 0

5:2015 May 12 20:18:38:BMC:kernel:-:<5>[lock_front_panel_buttons]

:1373:Front Panel Power Button is now permanently locked.

5:2015 May 12 20:18:38:BMC:kernel:-:<5>[lock_front_panel_buttons]

:1378:Front Panel Reset Button is now permanently locked.

PSU故障導致斷電

OBFL日誌

5:2015 May 15 14:29:12:BMC:kernel:-:<5>[lpc_reset_isr_handler]:

79:LPC Reset ISR -> ResetState: 1

5:2015 May 15 14:29:12:BMC:kernel:-:<5>[readPostData]:519:

BIOS_POST_CMPLT Asserted --> BIOS has completed

5:2015 May 15 14:29:12:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/

se_pilot2_udc_usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = OFF

5:2015 May 15 14:29:12:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]

:2561:USB HS: VDD Power = OFF

5:2015 May 15 14:29:12:BMC:IPMI:1532: Pilot3SrvPower.c:484:

Blade Power Changed To: [ OFF ]

5:2015 May 15 14:29:12:BMC:video_trigger:-: video_trigger.c:262:

Sending event_ipmi_power_state_change (OFF) ..

5:2015 May 15 14:29:13:BMC:selparser:1602: selparser.c:678:

# 33 04 00 00 01 02 00 00 B8 02 56 55 20 00 04 08 27 00 00 00 03 00 FF FF

# 433 | 05/15/2015 14:29:12 | CIMC | Power supply PSU1_AC_OK

#0x27 | State Deasserted | Asserted

5:2015 May 15 14:29:13:BMC:selparser:1602: selparser.c:678:

# 34 04 00 00 01 02 00 00 B8 02 56 55 20 00 04 08 42 00 00 00 04 01 FF FF

# 434 | 05/15/2015 14:29:12 | CIMC | Power supply PMBUS_ALERT #0x42

| Predictive Failure asserted | Asserted

5:2015 May 15 14:29:13:BMC:selparser:1602: selparser.c:678:

# 35 04 00 00 01 02 00 00 B8 02 56 55 20 00 04 25 A9 00 00 00 08 00 FF FF

# 435 | 05/15/2015 14:29:12 | CIMC | Entity presence MAIN_POWER_PRS

#0xa9 | Device Absent | Asserted

5:1970 Jan  1 00:02:48:BMC:kernel:-:<5>Linux version 2.6.35.10

(buildsa@savbu-swbmc-vb1) (gcc version 3.4.5)

#2 Tue Nov 18 07:09:13 PST 2014 Unversioned directory

4:1970 Jan  1 00:02:48:BMC:kernel:-:<4>CPU: ARM926EJ-S [41069265]

revision 5 (ARMv5TEJ), cr=00053177

4:1970 Jan  1 00:02:48:BMC:kernel:-:<4>CPU: VIVT data cache, VIVT instruction cache

4:1970 Jan  1 00:02:48:BMC:kernel:-:<4>Machine: ServerEngines PILOT3 Hornet Board

4:1970 Jan  1 00:02:48:BMC:kernel:-:<4>Memory policy: ECC disabled, Data cache writeback

前按鈕電源關閉

OBFL日誌

5:2015 May 15 14:50:19:BMC:kernel:-:<5>[passthrough_pin2_isr]:158:x86

Host Power Button Press

5:2015 May 15 14:50:19:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/se_pilot2_udc_

usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = ON

5:2015 May 15 14:50:19:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]:2561:

USB HS: VDD Power = ON

5:2015 May 15 14:50:31:BMC:IPMI:1561: Bridge.c:1478:audit from:kcs Fn:0x6

Cmd:0x6 Data&colon; 0x85 0x83

5:2015 May 15 14:50:31:BMC:IPMI:1561: Bridge.c:1484:audit Resp:0x0

5:2015 May 15 14:50:35:BMC:kernel:-:<5>[lpc_reset_isr_handler]

:79:LPC Reset ISR -> ResetState: 1

5:2015 May 15 14:50:35:BMC:kernel:-:<5>[readPostData]:519:BIOS_POST_CMPLT

Asserted --> BIOS has completed

5:2015 May 15 14:50:35:BMC:video_trigger:-: video_trigger.c:262:

Sending event_ipmi_power_state_change (OFF) ..

5:2015 May 15 14:50:35:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/se_pilot2_udc_

usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = OFF

5:2015 May 15 14:50:35:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]:

2561:USB HS: VDD Power = OFF

5:2015 May 15 14:50:35:BMC:IPMI:1531: Pilot3SrvPower.c:484:

Blade Power Changed To: [ OFF ]

5:2015 May 15 14:50:35:BMC:selparser:1602: selparser.c:678:

# A2 04 00 00 01 02 00 00 BB 07 56 55 2C 60 04 DC 1A 00 00 00 F4 03 00 00

# 4a2 | 05/15/2015 14:50:35 | Unknown #0x602c | Unknown #0x1a |

5:2015 May 15 14:50:35:BMC:selparser:1602: selparser.c:678:

# A3 04 00 00 01 02 00 00 BB 07 56 55 20 00 04 25 A9 00 00 00 08 00 FF FF

# 4a3 | 05/15/2015 14:50:35 | CIMC | Entity presence MAIN_POWER_PRS

#0xa9 | Device Absent | Asserted

開啟前按鈕電源

OBFL日誌

5:2015 May 15 14:51:18:BMC:kernel:-:<5>[passthrough_pin2_isr]

:158:x86 Host Power Button Press

5:2015 May 15 14:51:18:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/se_pilot2

_udc_usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = OFF

5:2015 May 15 14:51:18:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]:

2561:USB HS: VDD Power = OFF

5:2015 May 15 14:51:19:BMC:kernel:-:<5>drivers/bmc/usb/usb1.1/se_pilot2_

udc_usb1_1.c:2288:USB FS: VDD Power WAKEUP- Power Good = ON

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[se_pilot2_wakeup_interrupt]

:2561:USB HS: VDD Power = ON

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[se_pilot2_udc_usb_connect]:

2685:Failed  USB2.0 register test

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[se_pilot2_udc_usb_connect]:

2685:Failed  USB2.0 register test

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[lpc_reset_isr_handler]:

79:LPC Reset ISR -> ResetState: 0

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[lpc_reset_handler_Port80_Capture_setup]

:560:BIOS_POST_CMPLT De-asserted --> BIOS is running

5:2015 May 15 14:51:19:BMC:IPMI:1561: Pilot3SrvPower.c:481:  ->

Power State On: LPC RESET is NOT IN RESET; powerOnLPCOff[0]

5:2015 May 15 14:51:19:BMC:IPMI:1561: Pilot3SrvPower.c:484:

Blade Power Changed To: [ ON ]

5:2015 May 15 14:51:19:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_7.txt

5:2015 May 15 14:51:19:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_6.txt

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 118 : Filename = BiosTech_7.txt

5:2015 May 15 14:51:19:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_5.txt

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 119 : Filename = BiosTech_6.txt

5:2015 May 15 14:51:19:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_4.txt

5:2015 May 15 14:51:19:BMC:BIOSReader:1247: BIOSReader.c:748:

File Close : /var/nuova/BIOS/BiosTech_4.txt

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 120 : Filename = BiosTech_5.txt

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 121 : Filename = BiosTech_4.txt

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1944:block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE :

HostBTDescr = 121 : FName = BiosTech_4.txt

5:2015 May 15 14:51:19:BMC:video_trigger:-: video_trigger.c:262:

Sending event_ipmi_power_state_change (ON) ..

5:2015 May 15 14:51:19:BMC:video_trigger:-: video_trigger.c:137:

Sending event_server_boot_start ..

5:2015 May 15 14:51:19:BMC:video_trigger:-: video_trigger.c:148

:Will be able to send event_server_crash  ..

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1860:block_transfer_fetch_host_request_for_app: BT_OPEN_FOR_READ:

HostDescriptor = 123 : Filename = BiosTech_3.txt

5:2015 May 15 14:51:19:BMC:BIOSReader:1247: BIOSReader.c:242:File Open : BiosTech_3.txt

5:2015 May 15 14:51:19:BMC:kernel:-:<5>[block_transfer_fetch_host_request_for_app]

:1944:block_transfer_fetch_host_request_for_app : BT_FILE_CLOSE :

HostBTDescr = 123 : FName = BiosTech_3.txt

5:2015 May 15 14:51:19:BMC:BIOSReader:1247: BIOSReader.c:748:

File Close : /var/nuova/BIOS/BiosTech_3.txt

相關資訊

- C系列重新開機疑難排解

- 技術支援與文件 - Cisco Systems