目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

在獨立伺服器上重置裝置聯結器

步驟1.安裝CIMC庫

步驟2.設定IP和憑據

步驟3.檢查雲DNS並準備身份

步驟4.重置裝置聯結器

步驟5.斷開與CIMC的連線

重置UCS Manager上的裝置聯結器

步驟1.安裝UCSM庫

步驟2.設定IP和憑據

步驟3.檢查雲DNS並準備身份

步驟4.重置裝置聯結器

步驟5.斷開與UCSM的連線

相關資訊

簡介

本文檔介紹如何將UCS Manager或思科整合管理控制器的裝置聯結器重置為出廠預設設定。

必要條件

需求

思科建議您瞭解以下主題：

- 對統一計算系統伺服器(UCS)的基本瞭解

- 對UCS Manager(UCSM)有基礎認識

- 對思科整合管理控制器(CIMC)的基本瞭解

- 對Intersight的基本理解

- 對Powershell的基本瞭解

採用元件

本檔案所述內容不限於特定軟體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

嘗試此組態之前，請確保符合以下要求。

- Intersight管理員帳戶

- 連線到Intersight和UCSM或CIMC

- 具有Powershell的電腦

設定

附註：繼續此過程之前，需要先安裝Powershell。

在獨立伺服器上重置裝置聯結器

步驟1.安裝CIMC庫

在電腦中啟動Powershell並運行命令：

PS /Users/admin>  Install-Module -Name Cisco.IMC

步驟2.設定IP和憑據

附註：您需要設定管理員帳戶和密碼。您還可以使用具有管理員許可權的使用者。

PS /Users/admin> $ip = “x.x.x.x"

PS /Users/admin> $credentials = New-Object -TypeName System.Management.Automation.PSCredential -ArgumentList "admin",$(ConvertTo-SecureString -Force -AsPlainText "PASSWORD")

PS /Users/admin> $cookie = Connect-Imc $ip -Credential $credentials | Select Cookie

PS /Users/admin> $headers = @{

>>  'ucsmcookie'="ucsm-cookie="+$cookie.cookie

>>  }

步驟3.檢查雲DNS並準備身份

PS /Users/admin> Invoke-WebRequest https://$ip/connector/DeviceConnections -Headers $headers -SkipCertificateCheck | Select content -Expand Content | ConvertFrom-Json | Select CloudDns

您會得到如下輸出：

CloudDns

--------

svc.intersight.com

將雲DNS輸出用於正文變數。

PS /Users/admin> $body = @{

>>     "CloudDns" ="svc.intersight.com"

>>     "ForceResetIdentity" = $true

>>     "ResetIdentity" = $true

>> }

步驟4.重置裝置聯結器

PS /Users/admin> Invoke-WebRequest -Method 'Put' -Uri https://$ip/connector/DeviceConnections  -Body ($body|ConvertTo-Json) -Headers $headers -ContentType "application/json" -SkipCertificateCheck

您會得到如下輸出：

StatusCode        : 200

StatusDescription : OK

Content           : [

{}

]

RawContent        : HTTP/1.1 200 OK

Server: webserver

Date: Wed, 27 Sep 2023 00:54:16 GMT

Transfer-Encoding: chunked

Connection: keep-alive

X-Frame-Options: SAMEORIGIN

Cache-Control: no-store, no-cache, max-age=0

Prevent…

Headers           : {[Server, System.String[]], [Date, System.String[]], [Transfer-Encoding, System.String[]], [Connection, System.String[]]…}

Images            : {}

InputFields       : {}

Links             : {}

RawContentLength  : 8

RelationLink      : {}

步驟5.斷開與CIMC的連線

Disconnect-Imc

重置UCS Manager上的裝置聯結器

步驟1.安裝UCSM庫

在電腦中啟動Powershell並運行命令：

PS /Users/admin>  Install-Module -Name Cisco.UCSManager

步驟2.設定IP和憑據

附註：您需要設定管理員帳戶和密碼。您還可以使用具有管理員許可權的使用者。

PS /Users/admin> $ip = “x.x.x.x"

PS /Users/admin> $credentials = New-Object -TypeName System.Management.Automation.PSCredential -ArgumentList "admin",$(ConvertTo-SecureString -Force -AsPlainText "PASSWORD")

PS /Users/admin> $cookie = Connect-Ucs $ip -Credential $credentials | Select Cookie

PS /Users/admin> $headers = @{

>>  'ucsmcookie'="ucsm-cookie="+$cookie.cookie

>>  }

步驟3.檢查雲DNS並準備身份

PS /Users/admin> Invoke-WebRequest https://$ip/connector/DeviceConnections -Headers $headers -SkipCertificateCheck | Select content -Expand Content | ConvertFrom-Json | Select CloudDns

您會得到如下輸出：

CloudDns

--------

svc.ucs-connect.com

將雲DNS輸出用於正文變數。

PS /Users/admin> $body = @{

>>     "CloudDns" =“svc.ucs-connect.com"

>>     "ForceResetIdentity" = $true

>>     "ResetIdentity" = $true

>> }

步驟4.重置裝置聯結器

PS /Users/admin> Invoke-WebRequest -Method 'Put' -Uri https://$ip/connector/DeviceConnections  -Body ($body|ConvertTo-Json) -Headers $headers -ContentType "application/json" -SkipCertificateCheck

您會得到如下輸出：

StatusCode        : 200

StatusDescription : OK

Content           : [

{

"CloudDns": "svc.ucs-connect.com",

"CloudDnsList": [

"svc-static1.intersight.com",

"svc.ucs-connect.com",

"svc-static1.ucs-connect.com",

"svc.intersight.com"

…

RawContent        : HTTP/1.1 200 OK

Date: Wed, 27 Sep 2023 00:33:09 GMT

Server: Apache

Strict-Transport-Security: max-age=31536000; includeSubDomains

Cache-Control: no-store, must-revalidate, no-cache

Pragma: no-cache

X-…

Headers           : {[Date, System.String[]], [Server, System.String[]], [Strict-Transport-Security, System.String[]], [Cache-Control, System.String[]]…}

Images            : {}

InputFields       : {}

Links             : {}

RawContentLength  : 20468

RelationLink      : {}

步驟5.斷開與UCSM的連線

Disconnect-Ucs

相關資訊

- 裝置連接器

- 帶UCS的Powershell

- 技術支援與文件 - Cisco Systems