目錄

問題

環境

CLI

問題

如何在Cisco Web或電子郵件安全裝置上備份配置？

環境

思科電子郵件安全裝置(ESA)、網路安全裝置(WSA)、安全管理裝置(SMA)，所有AsyncOS版本

可通過CLI或GUI備份配置。請參閱下面的說明。

CLI

-------------------------------------------------------------------------------------

通過CLI有兩種方法：

CLI> showconfig

Do you want to include passwords? Please be aware that a configuration without

passwords will fail when reloaded with loadconfig. [N]> Y

此命令將在CLI上顯示當前配置。您需要將文字複製出去，並將組態檔手動儲存到您的電腦中。

CLI> saveconfig

Do you want to include passwords? Please be aware that a configuration without

passwords will fail when reloaded with loadconfig. [N]> Y

The file S600-00137255E240-2L83V91-20060801T203323.xml has been saved in the

configuration directory on machine "S-Series".

這會將當前配置檔案儲存到代理上的硬碟中。您可以通過通過FTP連線到裝置並瀏覽到「configuration」資料夾來下載配置檔案。

附註：如果選擇了預設選項「否」，配置將不包含密碼。這樣將使檔案無法通過「loadconfig」命令載入回Proxy。

GUI

-------------------------------------------------------------------------------------

1. 轉到「系統管理」>「配置檔案」。

2. 選擇以下任一選項：

- 將檔案下載到本地電腦以檢視或儲存 — >下載配置檔案。

- 將檔案儲存到此裝置 — > 在WSA本地儲存配置檔案。

3. 取消選中「Mask passwords in the Configuration Files」框，以便通過「Load Configuration」選項將配置檔案上傳回WSA。

4. 按一下「Submit」按鈕。