目錄

問題

環境

問題

如何在思科網路安全裝置上配置手動DNS條目？

環境

思科網路安全裝置(WSA)，所有AsyncOS版本

在命令列介面(CLI)中輸入以下命令，如下所示：

WSA> dnsconfig

Choose the operation you want to perform:

- NEW - Add a new server.

- SETUP - Configure general settings.

- SEARCH - Configure DNS domain search list.

[]> localhosts

Local IP to Host mappings:

Choose the operation you want to perform:

- NEW - Add new local IP to host mapping.

- DELETE - Delete an existing mapping.

[]> new

Enter the IP address of the host you are adding.

[]> 1.1.1.1

Enter the canonical host name and any additional aliases (separate values with spaces)

[]> example.com

Local IP to Host mappings:

1. 1.1.1.1 example.com

Choose the operation you want to perform:

- NEW - Add new local IP to host mapping.

- DELETE - Delete an existing mapping.

[]>

在CLI提示符下，請使用CLI命令 — commit — 提交DNS配置更改。

附註：CLI命令「dnsconfig」中的「localhosts」選項是隱藏選項。