目錄

簡介

本文檔介紹如何對無法加入現有群集的安全電子郵件網關(SEG)進行故障排除。

預申請

思科建議您瞭解以下主題：

- 如何將裝置加入集群（集中管理）。

- 所有ESA必須具有相同的AsyncOS版本（一直到修訂版本）。

需求

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您已瞭解任何指令的潛力

問題

將安全電子郵件網關(SEG)加入現有群集時出現問題。此問題導致連線出錯，這是因為ESA丟失了一些kex演算法/密碼演算法。

無法加入群集。

錯誤為：「（3, '找不到匹配的金鑰交換演算法。'）」

輸入集群中電腦的IP地址。

解決方案

必須使用sshconfig的預設值

esa> sshconfig

Choose the operation you want to perform:

- SSHD - Edit SSH server settings.

- USERKEY - Edit SSH User Key settings

- ACCESS CONTROL - Edit SSH whitelist/blacklist

[]> sshd

ssh server config settings:

Public Key Authentication Algorithms:

rsa1

ssh-dss

ssh-rsa

Cipher Algorithms:

aes128-ctr

aes192-ctr

aes256-ctr

aes128-cbc

3des-cbc

blowfish-cbc

cast128-cbc

aes192-cbc

aes256-cbc

rijndael-cbc@lysator.liu.se

MAC Methods:

hmac-md5

hmac-sha1

umac-64@openssh.com

hmac-ripemd160

hmac-ripemd160@openssh.com

hmac-sha1-96

hmac-md5-96

Minimum Server Key Size:

1024

KEX Algorithms:

diffie-hellman-group-exchange-sha256

diffie-hellman-group-exchange-sha1

diffie-hellman-group14-sha1

diffie-hellman-group1-sha1

ecdh-sha2-nistp256

ecdh-sha2-nistp384

ecdh-sha2-nistp521

要應用預設值，可以在逐步設定時從CLI > sshconfig > sshd運行命令：

[]> setup

Enter the Public Key Authentication Algorithms do you want to use

[rsa1,ssh-dss,ssh-rsa]>rsa1,ssh-dss,ssh-rsa

Enter the Cipher Algorithms do you want to use

[aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc]>aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

Enter the MAC Methods do you want to use

[hmac-md5,hmac-sha1,umac-64@openssh.com,hmac-ripemd160]>hmac-md5,hmac-sha1,umac-64@openssh.com,hmac-ripemd160,hmac-ripemd160@openssh.com,hmac-sha1-96,hmac-md5-96, diffie-hellman-group14-sha1

Enter the Minimum Server Key Size do you want to use

[1024]>

Enter the KEX Algorithms do you want to use

[diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1]>diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,iffie-hellman-group1-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521

提交更改

esa> commit

Please enter some comments describing your changes:

[]> Edit the SSHD values

更改後，裝置將成功加入群集

相關資訊

配置郵件安全裝置(ESA)集群

ESA常見問題：設定群集的要求是什麼？