目錄

簡介

必要條件

需求

採用元件

背景資訊

拓撲

重要配置

CA路由器

VPN網關配置

Windows裝置

驗證

案例 1.憑證對驗證有效

案例 2.證書被吊銷，身份驗證失敗

疑難排解

簡介

本文檔介紹如何對為AnyConnect基於證書的身份驗證配置的證書撤銷清單(CRL)進行故障排除。

必要條件

需求

思科建議您瞭解以下主題：

- 憑證授權單位(CA)

- 公開金鑰基礎架構 (PKI)

- FTD上的RA VPN

- 帶AnyConnect客戶端的Windows 10

採用元件

本檔案中的資訊是根據以下軟體版本：

- CSR1000V - Cisco IOS® XE，版本16.12.03 -作為Cisco IOS XE CA伺服器

- NGFWv - 7.1.0版-作為VPN網關

- AnyConnect安全移動客戶端4.10.07073版-作為VPN客戶端

- Windows 10作為本地電腦

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

CRL使裝置能夠確定證書是否在證書有效期到期之前被吊銷。CRL包含證書的序列號和撤銷日期。安全閘道(例如Firepower執行緒防禦(FTD)系統或其他終端裝置)使用此功能，藉由驗證憑證狀態來加強憑證驗證。

拓撲

提供與VPN網關和CA伺服器連線的基本拓撲。

重要配置

為了使用CRL完成基於證書的身份驗證，在涉及的每台裝置中均使用了顯示的配置。

CA路由器

伺服器證書頒發機構負責向使用者頒發身份證書，以便根據VPN網關提供身份驗證。 此外，路由器會儲存CRL資料庫檔案並充當CRL分發點(CDP)。

CDP是VPN網關和其他終端使用者檢索CRL資訊的位置。 此資訊會快取至本機，且僅在一段特定時間內有效；當此時間到期時，會下載新的CRL。

註：CRL資料庫和裝置可以訪問CRL的位置可以在同一台裝置上。但是，出於安全原因，建議終端裝置訪問的CRL儲存在CRL資料庫以外的其他裝置中。在本例中，CA路由器儲存CRL資料庫並充當VPN網關的CDP。

crypto pki server CAS

database level complete

no database archive

issuer-name cn=calo_root,ou=TAC,o=cisco

grant auto

hash sha256

lifetime crl 2

lifetime certificate 300

lifetime ca-certificate 1000

cdp-url http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

eku server-auth client-auth

database url ser nvram:

crypto pki trustpoint TP-self-signed-1507329386

enrollment selfsigned

subject-name cn=IOS-Self-Signed-Certificate-1507329386

revocation-check none

rsakeypair TP-self-signed-1507329386

crypto pki trustpoint CAS

revocation-check crl

rsakeypair CAS

interface GigabitEthernet2

ip address 192.0.2.10 255.255.255.0

negotiation auto

ip http server

ntp master 1

VPN網關配置

設定FTD是為了使用憑證作為驗證方法（僅限憑證）向終端使用者提供遠端存取VPN。從使用者接收身分辨識憑證後，FTD會驗證憑證是否由已知憑證授權單位(CA)核發，並透過從憑證中定義的CDP取得CRL來確認其有效性。

tunnel-group local type remote-access

tunnel-group local general-attributes

address-pool AC_pool

default-group-policy local_gp

username-from-certificate use-entire-name

tunnel-group local_test webvpn-attributes

authentication certificate

group-alias test enable

Windows裝置

身份證書由CA伺服器頒發並安裝到Windows裝置中。

驗證

接下來的調試和捕獲顯示了使用有效證書的使用者（工作場景）和使用已撤銷證書的使用者（非工作場景）之間的差異。

案例 1.憑證對驗證有效

當使用者開始連線嘗試時，會向FTD提供其辨識憑證，VPN閘道會驗證簽發者是否為已知授權單位，並開始透過HTTP/GET要求從辨識憑證中定義的CDP要求CRL。CA伺服器會使用CRL回覆，而FTD會檢查憑證的「序號」是否已列出。由於CRL是空的（沒有撤銷的憑證），因此FTD接受憑證為有效並允許使用者進行驗證。

PKI[7]: Cert to verify

PKI[7]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 217 microsecs

PKI[6]: Verified chain:

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

[..output ommitted]

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x06c8d45f

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x06c8d45f, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: CRL not cached. Initiating CRL download for cert idx 0.

PKI[12]: do_get_crl, pki_ossl_revocation.c:85

PKI[9]: starting CRL FSM #0

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_InitTransaction

PKI[12]: get_cdps, pki_crl_fsm_act.c:202

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[7]: cdp: (len=58, type=URI, prot=HTTP) http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_InitTransaction, Return status: 0

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_NextCDP

PKI[12]: crldl_cdp_blacklisted, pki_ossl_crl.c:1374

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[7]: CDP is not blacklisted

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_NextCDP, Return status: 0

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_Request

PKI[13]: crldp_download_pending, pki_ossl_crl.c:1184

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[8]: session 0x06c8d45f adding pending CRL entry for cert 0

PKI[12]: crldp_add_pending_download, pki_ossl_crl.c:1203

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: retrieve_crl, pki_crl_fsm_act.c:233

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[7]: CDP type HTTP

PKI[7]: getting http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_crl_build_http_io, pki_ossl_crl.c:1017

PKI[13]: pki_parse_uri, pki_ossl_uri.c:75

PKI[14]: pki_uri_map_protocol, pki_ossl_uri.c:17

PKI[14]: pki_uri_get_port, pki_ossl_uri.c:34

PKI[13]: pki_free_uri, pki_ossl_uri.c:57

PKI[11]: pki_crl_request_send_async, pki_ossl_crl.c:627

PKI[8]: [15] IOCB allocated

PKI[7]: PKI CRL I/O request queue result: IO_STATUS_QUEUED

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_Request, Return status: 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 0, revoked: 0, error: 0, pending: 1, fail-allow: 0

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[8]: [15] Received IO request msg

PKI[8]: [15] DNS resolve issued for 192.0.2.10

PKI[9]: CERT API thread sleeps!

PKI[7]: [15] DNS resolve 192.0.2.10 (192.0.2.10)

PKI[8]: [15] Socket open success

PKI[8]: [15] IPv4 Route lookup to 192.0.2.10 use interface outside

PKI[8]: [15] Connect sent to 192.0.2.10 from 192.0.2.1

PKI[12]: pki_io_cbfunc_log_revocation_check, pki_ossl_revocation.c:421

PKI[7]: 6717056: Attempting CRL revocation check from outside:192.0.2.1/62075 to 192.0.2.10/80 using HTTP.

PKI[8]: [15] Received Socket transmit ready msg

----- Begin Data Type:HTTP Request [15]

Length: 76 -----

47 45 54 20 2f 63 67 69 2d 62 69 6e 2f 70 6b 69 | GET /cgi-bin/pki

63 6c 69 65 6e 74 2e 65 78 65 3f 6f 70 65 72 61 | client.exe?opera

74 69 6f 6e 3d 47 65 74 43 52 4c 20 48 54 54 50 | tion=GetCRL HTTP

2f 31 2e 30 0d 0a 48 6f192.0.2.10 73 74 3a 20 31 39 32 2e | /1.0..Host: 192.

31 38 31 2e 33 2e 31 30 0d 0a 0d 0a | 0.2.10....

----- End Data Type:HTTP Request [15]

Length: 76 -----

PKI[8]: [15] Sent 76 bytes

PKI[8]: [15] Received Socket read ready msg

PKI[8]: [15] read 662 bytes

PKI[8]: [15] Read EOF

PKI[12]: pki_io_cbfunc, pki_crl_fsm_act.c:59

PKI[7]: Callback received for vcid: 0, sess_id: 0x06c8d45f, cert_idx: 0, status: IO_STATUS_OK(1), datalen: 662

PKI[13]: get_fsm_data, pki_ossl_revocation.c:446

PKI[7]: [15] IOCB freed

PKI[13]: CERT_API_QueueFSMEvent, vpn3k_cert_api.c:137

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: CERT API thread wakes up!

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=2, session=0x06c8d45f

PKI[9]: Async locked for session 0x06c8d45f

PKI[11]: pki_notify_fsm_evt, pki_ossl_revocation.c:56

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_ProcessResp

PKI[13]: pki_ossl_util_find_http_payload, pki_ossl_utils.c:36

PKI[8]: Received CRL of length 249 for session 0x06c8d45f, cert idx 0

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crl_add_to_cache, pki_ossl_crl_cache.c:1177

PKI[12]: pki_ossl_crypto_verify_and_insert_crl, pki_ossl_crl_cache.c:1126

PKI[12]: pki_ossl_insert_der_crl_int, pki_ossl_crl_cache.c:1017

PKI[8]: Inserting CRL

PKI[14]: pki_ossl_get_crl_summary, pki_ossl.c:151

PKI[8]: ---------CRL--------:

Certificate Revocation List (CRL):

Version 1 (0x0)

Signature Algorithm: sha1WithRSAEncryption

Issuer: /O=cisco/OU=TAC/CN=calo_root

Last Update: Sep 24 22:18:38 2023 GMT

Next Update: Sep 25 00:18:38 2023 GMT

No Revoked Certificates.

[..outout ommitted]

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x06c8d45f, cert 0 has rev_status 3, using methods 1/3/0 at index 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x06c8d45f, all revocation processing complete

PKI[5]: session: 0x06c8d45f, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: pki_ossl_crl_add_cache_to_store, pki_ossl_crl_cache.c:1396

PKI[9]: OSSL certstore updated with 0 certs, 1 CRLs and 0 policies, 0 certs added to stack

PKI[7]: session 0x06c8d45f, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 167 microsecs

PKI[7]: session 0x06c8d45f, Validation with CRL checking completed, status 0

PKI[7]: session 0x06c8d45f, Revocation check complete, no revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x06c8d45f asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[8]: No IOCB found for SOCKET CLOSE message, handle 0x5dba666

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x06c8d45f

PKI[9]: Async locked for session 0x06c8d45f

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

PKI[13]: CERT_GetGroupFromSSLRule, vpn3k_cert_api.c:1672

下一個FTD擷取會顯示FTD和CDP（此案例為CA伺服器）之間的HTTP交易，以便擷取CRL。

案例 2.證書被吊銷，身份驗證失敗

身份證書在CA伺服器中被吊銷，並在CRL資料庫檔案中註冊。但是，更新的CRL在目前CRL到期（設定為兩小時有效）之前無法供FTD使用。

CA-router#show crypto pki server CAS crl

Certificate Revocation List:

Issuer: cn=calo_root,ou=TAC,o=cisco

This Update: 22:18:38 UTC Sep 24 2023

Next Update: 00:18:38 UTC Sep 25 2023

Number of CRL entries: 0

CRL size: 249 bytes

CA-router#show crypto pki server CAS certificates

Serial Issued date Expire date Subject Name

1 20:18:36 UTC Sep 24 2023 20:18:36 UTC Jun 20 2026 cn=calo_root ou=TAC o=cisco

2 20:19:33 UTC Sep 24 2023 20:19:33 UTC Jul 20 2024 hostname=CA-router cn=desktop.example.com

3 23:50:58 UTC Sep 24 2023 23:50:58 UTC Jul 20 2024 cn=test.cisco.com

CA-router#crypto pki server CAS revoke 0x2

% Certificate 02 succesfully revoked.

CA-router#show crypto pki server CAS crl

Certificate Revocation List:

Issuer: cn=calo_root,ou=TAC,o=cisco

This Update: 23:59:32 UTC Sep 24 2023

Next Update: 01:59:32 UTC Sep 25 2023

Number of CRL entries: 1

CRL size: 272 bytes

Revoked Certificates:

Serial Number (hex): 02

Revocation Date: 23:59:32 UTC Sep 24 2023

在確認CRL過期後嘗試建立新連線時，證書檢查與前一個場景基本相同。FTD確認快取中沒有CRL後，會要求新的CRL。收到新CRL後，FTD會檢查身分憑證的序號是否屬於清單的一部分。序號會標籤為已撤銷，且FTD會繼續拒絕使用者的存取。

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x0dc288f9

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x0dc288f9, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: CRL not cached. Initiating CRL download for cert idx 0.

PKI[12]: do_get_crl, pki_ossl_revocation.c:85

PKI[9]: starting CRL FSM #0

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_InitTransaction

PKI[12]: get_cdps, pki_crl_fsm_act.c:202

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[7]: cdp: (len=58, type=URI, prot=HTTP) http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_InitTransaction, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_NextCDP

PKI[12]: crldl_cdp_blacklisted, pki_ossl_crl.c:1374

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[7]: CDP is not blacklisted

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_NextCDP, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_Request

PKI[13]: crldp_download_pending, pki_ossl_crl.c:1184

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[8]: session 0x0dc288f9 adding pending CRL entry for cert 0

PKI[12]: crldp_add_pending_download, pki_ossl_crl.c:1203

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: retrieve_crl, pki_crl_fsm_act.c:233

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[7]: CDP type HTTP

PKI[7]: getting http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_crl_build_http_io, pki_ossl_crl.c:1017

PKI[13]: pki_parse_uri, pki_ossl_uri.c:75

PKI[14]: pki_uri_map_protocol, pki_ossl_uri.c:17

PKI[14]: pki_uri_get_port, pki_ossl_uri.c:34

PKI[13]: pki_free_uri, pki_ossl_uri.c:57

PKI[11]: pki_crl_request_send_async, pki_ossl_crl.c:627

PKI[8]: [16] IOCB allocated

PKI[7]: PKI CRL I/O request queue result: IO_STATUS_QUEUED

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_Request, Return status: 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 0, revoked: 0, error: 0, pending: 1, fail-allow: 0

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[8]: [16] Received IO request msg

PKI[8]: [16] DNS resolve issued for 192.0.2.10

PKI[9]: CERT API thread sleeps!

PKI[7]: [16] DNS resolve 192.0.2.10 (192.0.2.10)

PKI[8]: [16] Socket open success

PKI[8]: [16] IPv4 Route lookup to 192.0.2.10 use interface outside

PKI[8]: [16] Connect sent to 192.0.2.10 from 192.0.2.1

PKI[12]: pki_io_cbfunc_log_revocation_check, pki_ossl_revocation.c:421

PKI[7]: 6717056: Attempting CRL revocation check from outside:192.0.2.1/27791 to 192.0.2.10/80 using HTTP.

PKI[8]: [16] Received Socket transmit ready msg

----- Begin Data Type:HTTP Request [16]

Length: 76 -----

47 45 54 20 2f 63 67 69 2d 62 69 6e 2f 70 6b 69 | GET /cgi-bin/pki

63 6c 69 65 6e 74 2e 65 78 65 3f 6f 70 65 72 61 | client.exe?opera

74 69 6f 6e 3d 47 65 74 43 52 4c 20 48 54 54 50 | tion=GetCRL HTTP

2f 31 2e 30 0d 0a 48 6f 73 74 3a 20 31 39 32 2e | /1.0..Host: 192.

31 38 31 2e 33 2e 31 30 0d 0a 0d 0a | 0.2.10....

----- End Data Type:HTTP Request [16]

Length: 76 -----

PKI[8]: [16] Sent 76 bytes

PKI[8]: [16] Received Socket read ready msg

PKI[8]: [16] read 685 bytes

PKI[8]: [16] Read EOF

PKI[12]: pki_io_cbfunc, pki_crl_fsm_act.c:59

PKI[7]: Callback received for vcid: 0, sess_id: 0x0dc288f9, cert_idx: 0, status: IO_STATUS_OK(1), datalen: 685

PKI[13]: get_fsm_data, pki_ossl_revocation.c:446

PKI[7]: [16] IOCB freed

PKI[13]: CERT_API_QueueFSMEvent, vpn3k_cert_api.c:137

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: CERT API thread wakes up!

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=2, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[11]: pki_notify_fsm_evt, pki_ossl_revocation.c:56

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_ProcessResp

PKI[13]: pki_ossl_util_find_http_payload, pki_ossl_utils.c:36

PKI[8]: Received CRL of length 272 for session 0x0dc288f9, cert idx 0

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crl_add_to_cache, pki_ossl_crl_cache.c:1177

PKI[12]: pki_ossl_crypto_verify_and_insert_crl, pki_ossl_crl_cache.c:1126

PKI[12]: pki_ossl_insert_der_crl_int, pki_ossl_crl_cache.c:1017

PKI[8]: Inserting CRL

PKI[14]: pki_ossl_get_crl_summary, pki_ossl.c:151

PKI[8]: ---------CRL--------:

Certificate Revocation List (CRL):

Version 1 (0x0)

Signature Algorithm: sha1WithRSAEncryption

Issuer: /O=cisco/OU=TAC/CN=calo_root

Last Update: Sep 25 00:18:09 2023 GMT

Next Update: Sep 25 02:18:09 2023 GMT

Number of Revoked Certificates: 1

PKI[12]: asn1_to_unix_time, crypto_pki.c:1735

PKI[12]: asn1_to_unix_time, crypto_pki.c:1735

PKI[12]: pki_ossl_crypto_certc_insert_CRL, pki_ossl_crl_cache.c:735

PKI[7]: CRL: current time is 1695601164

PKI[7]: CRL: nextupdate time is 1695608289

PKI[7]: CRL: lastupdate time is 1695601089

PKI[7]: set CRL update timer with delay: 7125

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: the current device time: 00:19:24 UTC Sep 25 2023

PKI[7]: the last CRL update time: 00:18:09 UTC Sep 25 2023

PKI[7]: the next CRL update time: 02:18:09 UTC Sep 25 2023

PKI[7]: CRL cache delay being set to: 3600000

PKI[14]: pki_ossl_set_crl_store_dirty, pki_ossl_crl_cache.c:1441

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: crldl_notify_result, pki_ossl_crl.c:1304

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_ProcessResp, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_Callback

PKI[12]: rev_cb, pki_ossl_validate.c:902

PKI[7]: revocation status queued for session 0x0dc288f9 and cert_idx 0, rev_status 3

PKI[13]: CERT_API_QueueFSMResp, vpn3k_cert_api.c:158

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_Callback, Return status: 0

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=3, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x0dc288f9, cert 0 has rev_status 3, using methods 1/3/0 at index 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x0dc288f9, all revocation processing complete

PKI[5]: session: 0x0dc288f9, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: pki_ossl_crl_add_cache_to_store, pki_ossl_crl_cache.c:1396

PKI[9]: OSSL certstore updated with 0 certs, 1 CRLs and 0 policies, 0 certs added to stack

PKI[7]: session 0x0dc288f9, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)<<<<<<<<<<<<<<<<<<<

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[6]: val status=0: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (23)certificate revoked, cert_idx: 0<<<<<<<<<<<<<<<<<

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[4]: Certificate verification error: certificate revoked<<<<<<<<<<<<<<<<<<<

PKI[14]: map_ossl_error, pki_ossl_validate.c:62

PKI[7]: session 0x0dc288f9, Validation with CRL checking completed, status 15

PKI[5]: session 0x0dc288f9, Error in revocation check or revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x0dc288f9 asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[8]: No IOCB found for SOCKET CLOSE message, handle 0x1a6b367e

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

[..output ommitted]

PKI[7]: Cert to verify

PKI[7]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 233 microsecs

PKI[6]: Verified chain:

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

[..ooutput ommitted]

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x1acca1bd

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x1acca1bd, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[13]: is_crl_dst, pki_ossl_crl_cache.c:479

PKI[7]: CRL for cert idx 0 found in cache

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x1acca1bd, all revocation processing complete

PKI[5]: session: 0x1acca1bd, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[7]: session 0x1acca1bd, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[6]: val status=0: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (23)certificate revoked, cert_idx: 0

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[4]: Certificate verification error: certificate revoked

PKI[14]: map_ossl_error, pki_ossl_validate.c:62

PKI[7]: session 0x1acca1bd, Validation with CRL checking completed, status 15

PKI[5]: session 0x1acca1bd, Error in revocation check or revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x1acca1bd asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x1acca1bd

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x1acca1bd

PKI[9]: Async locked for session 0x1acca1bd

PKI[9]: Async unlocked for session 0x1acca1bd

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

下一個FTD擷取顯示FTD和CDP之間的HTTP交易，以便在清單中儲存已撤銷憑證的情況下擷取CRL。

疑難排解

以下命令可用於辨識與憑證相關的進一步問題：

- 在FTD上：

debug crypto ca 14

- 在CA路由器上：

debug crypto pki API

debug crypto pki callbacks

debug crypto pki messages

debug crypto pki validation

debug crypto pki error

debug crypto pki server

debug crypto pki transactions