目錄

簡介

必要條件

需求

採用元件

背景資訊

設定

驗證

疑難排解

簡介

本文檔介紹如何使用LDAP屬性對映為遠端訪問VPN使用者分配靜態IP地址。

必要條件

需求

思科建議您瞭解以下主題：

- Active Directory (AD)

- 輕量型目錄存取通訊協定(LDAP)

- 思科安全防火牆威脅防禦

- Cisco安全防火牆管理中心

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Windows Server 2022

- FTD 7.4.2版

- FMC 7.4.2版

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

背景資訊

注意：Firepower 6.7版或更高版本支援使用領域進行IP地址分配並配置LDAP屬性對映的選項。在繼續操作之前，請確保firepower版本為6.7或更高版本。

設定

步驟 1.導航到Devices > Remote Access，然後選擇所需的Remote Access VPN Policy。選擇所需的Connection Profile。在AAA頁籤下，選擇Authentication Server和Authorization Server的領域。

步驟 2.導航到Devices > Remote Access，然後選擇所需的遠端訪問VPN策略。導航到高級>地址分配策略，確保啟用使用授權伺服器（僅適用於RADIUS或領域）選項。

步驟 3.導航到Advanced > LDAP Attribute Mapping並增加Name Map，其中LDAP Attribute Name set to msRADIUSFramedIPAddress，Cisco Attribute Name set toIETF-Radius-Framed-IP-Address。

步驟 4.在Windows AD伺服器上，打開伺服器管理器，然後導航到工具> Active Directory使用者和電腦。按一下右鍵使用者，選擇屬性>撥入，然後選中名為分配靜態IP地址的框。

步驟 5.選擇Static IP Addresses並向使用者分配static IP address。

步驟 6.連線到VPN網關並使用Cisco Secure Client登入。系統將為使用者分配您配置的靜態IP地址。

驗證

啟用debug ldap 255並確保檢索到msRADIUSFramedIPAddress LDAP屬性：

[13] Session Start

[13] New request Session, context 0x000015371bf7a628, reqType = Authentication

[13] Fiber started

[13] Creating LDAP context with uri=ldap://192.168.2.101:389

[13] Connection to LDAP server: ldap://192.168.2.101:389, status = Successful

[13] supportedLDAPVersion: value = 3

[13] supportedLDAPVersion: value = 2

[13] Binding as (Administrator@test.example) [Administrator@test.example]

[13] Performing Simple authentication for Administrator@test.example to 192.168.2.101

[13] LDAP Search:

Base DN = [CN=Users,DC=test,DC=example]

Filter = [sAMAccountName=jdoe]

Scope = [SUBTREE]

[13] User DN = [CN=John Doe,CN=Users,DC=test,DC=example]

[13] Talking to Active Directory server 192.168.2.101

[13] Reading password policy for jdoe, dn:CN=John Doe,CN=Users,DC=test,DC=example

[13] Read bad password count 0

[13] Binding as (jdoe) [CN=John Doe,CN=Users,DC=test,DC=example]

[13] Performing Simple authentication for jdoe to 192.168.2.101

[13] Processing LDAP response for user jdoe

[13] Message (jdoe):

[13] Authentication successful for jdoe to 192.168.2.101

[13] Retrieved User Attributes:

[13] objectClass: value = top

[13] objectClass: value = person

[13] objectClass: value = organizationalPerson

[13] objectClass: value = user

[13] cn: value = John Doe

[13] sn: value = Doe

[13] givenName: value = John

[13] distinguishedName: value = CN=John Doe,CN=Users,DC=test,DC=example

[13] instanceType: value = 4

[13] whenCreated: value = 20240928142334.0Z

[13] whenChanged: value = 20240928152553.0Z

[13] displayName: value = John Doe

[13] uSNCreated: value = 12801

[13] uSNChanged: value = 12826

[13] name: value = John Doe

[13] objectGUID: value = ......fA.f...;.,

[13] userAccountControl: value = 66048

[13] badPwdCount: value = 0

[13] codePage: value = 0

[13] countryCode: value = 0

[13] badPasswordTime: value = 0

[13] lastLogoff: value = 0

[13] lastLogon: value = 0

[13] pwdLastSet: value = 133720070153887755

[13] primaryGroupID: value = 513

[13] userParameters: value = m: d.

[13] objectSid: value = ............Q=.S....=...Q...

[13] accountExpires: value = 9223372036854775807

[13] logonCount: value = 0

[13] sAMAccountName: value = jdoe

[13] sAMAccountType: value = 805306368

[13] userPrincipalName: value = jdoe@test.example

[13] objectCategory: value = CN=Person,CN=Schema,CN=Configuration,DC=test,DC=example

[13] msRADIUSFramedIPAddress: value = -1408232375

[13] mapped to IETF-Radius-Framed-IP-Address: value = -1408232375

[13] msRASSavedFramedIPAddress: value = -1408232375

[13] dSCorePropagationData: value = 16010101000000.0Z

[13] lastLogonTimestamp: value = 133720093118057231

[13] Fiber exit Tx=522 bytes Rx=2492 bytes, status=1

[13] Session End

疑難排解

調試命令：

debug webvpn 255

debug ldap

用於驗證分配給所需RA VPN使用者的靜態IP地址的命令：

show vpn-sessiondb anyconnect filter name <使用者名稱>

firepower# show vpn-sessiondb anyconnect filter name jdoe

Session Type: AnyConnect

Username : jdoe Index : 7

Assigned IP : 172.16.20.73 Public IP : 10.0.0.10

Protocol : AnyConnect-Parent SSL-Tunnel DTLS-Tunnel

License : AnyConnect Premium

Encryption : AnyConnect-Parent: (1)none SSL-Tunnel: (1)AES-GCM-128 DTLS-Tunnel: (1)AES-GCM-256

Hashing : AnyConnect-Parent: (1)none SSL-Tunnel: (1)SHA256 DTLS-Tunnel: (1)SHA384

Bytes Tx : 14664 Bytes Rx : 26949

Group Policy : DfltGrpPolicy Tunnel Group : RAVPN_PROFILE

Login Time : 11:45:48 UTC Sun Sep 29 2024

Duration : 0h:38m:59s

Inactivity : 0h:00m:00s

VLAN Mapping : N/A VLAN : none

Audt Sess ID : cb0071820000700066f93dec

Security Grp : none Tunnel Zone : 0