目錄

簡介

背景

必要條件

需求

採用元件

設定

網路圖表

ISE上的配置

Python示例

取得特定節點的所有系統憑證

按ID取得特定節點的系統憑證

取得所有信任憑證的清單

透過ID獲取信任證書

疑難排解

簡介

本檔案介紹使用openAPI管理思科身分辨識服務引擎(ISE)憑證的程式。

背景

面對企業網路安全和管理日益成長的複雜性，思科ISE 3.1引入了OpenAPI格式的API，簡化了證書生命週期管理，提供標準化和自動化介面以實現高效安全的證書操作，幫助管理員實施強大的安全實踐並保持網路合規性。

必要條件

需求

思科建議您瞭解以下主題：

- 思科身分辨識服務引擎(ISE)

- REST API

- Python

採用元件

- ISE 3.3

- Python 3.10.0

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

設定

網路圖表

拓撲

ISE上的配置

第1步：增加打開API admin帳戶

要增加API管理員，請導航到管理>系統>管理員訪問許可權>管理員>管理員使用者>增加。

API管理

第2步：在ISE上啟用開放式API

預設情況下，在ISE上停用開放式API。要啟用該功能，請導航到管理>系統>設定> API設定> API服務設定。切換「開啟API」選項。按一下Save。

啟用OpenAPI

第3步：探索ISE開放式API

導航到管理>系統>設定> API設定>概述。點選打開API訪問連結。

訪問OpenAPI

Python示例

取得特定節點的所有系統憑證

API列出特定ISE節點的所有證書。

第1步：API呼叫的必要資訊。

方法

取得

URL

https://<ISE-PAN-IP>/api/v1/certs/system-certificate/<ISE-Node-Hostname>

憑證

使用Open API帳戶憑據

標頭

接受：application/json

Content-Type： application/json

第2步：查詢用於檢索特定ISE節點證書的URL。

API URI

第3步：以下是Python代碼的示例。複製並貼上內容。替換ISE IP、使用者名稱和密碼。另存為要執行的python檔案。

確保ISE與運行python代碼示例的裝置之間保持良好的連線。

from requests.auth import HTTPBasicAuth

import requests

requests.packages.urllib3.disable_warnings()

if __name__ == "__main__":

url = "https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN"

headers = {"Accept": "application/json", "Content-Type": "application/json"}

basicAuth = HTTPBasicAuth("ApiAdmin", "Admin123")

response = requests.get(url=url, auth=basicAuth, headers=headers, verify=False)

print("Return Code:")

print(response.status_code)

print("Expected Outputs:")

print(response.json())

以下是預期輸出的範例。

Return Code:

200

Expected Outputs:

{'response': [{'id': '5b5b28e4-2a51-495c-8413-610190e1070b', 'friendlyName': 'Default self-signed saml server certificate - CN=SAML_ISE-DLC-CFME02-PSN.cisco.com', 'serialNumberDecimalFormat': '171164606212827159112166844026', 'issuedTo': 'SAML_ISE-DLC-CFME02-PSN.cisco.com', 'issuedBy': 'SAML_ISE-DLC-CFME02-PSN.cisco.com', 'validFrom': 'Fri Mar 29 01:14:22 CST 2024', 'expirationDate': 'Wed Mar 28 01:14:22 CST 2029', 'usedBy': 'Not in use', 'keySize': 4096, 'groupTag': '', 'selfSigned': True, 'signatureAlgorithm': 'SHA384withRSA', 'portalsUsingTheTag': '', 'sha256Fingerprint': '42ad8eeec643fce00605ac34aaf88ca5d687117591a2a4431b656dad8ce9616b', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/5b5b28e4-2a51-495c-8413-610190e1070b', 'type': 'application/json'}}, {'id': '8460950e-fd02-43f6-b1ea-abfa592cb641', 'friendlyName': 'CN=ISE-DLC-CFME02-PSN.cisco.com, OU=Certificate Services System Certificate#Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN#00003', 'serialNumberDecimalFormat': '27546245129667566853665077095037707664', 'issuedTo': 'ISE-DLC-CFME02-PSN.cisco.com', 'issuedBy': 'Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN', 'validFrom': 'Thu Mar 28 16:24:11 CST 2024', 'expirationDate': 'Thu Mar 29 16:24:11 CST 2029', 'usedBy': 'pxGrid', 'keySize': 4096, 'groupTag': '', 'selfSigned': False, 'signatureAlgorithm': 'SHA256withRSA', 'portalsUsingTheTag': '', 'sha256Fingerprint': 'a3c67ea007db0fd5672b471ea614a33c57f1ec55182b436cd0b386ebd88a141c', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/8460950e-fd02-43f6-b1ea-abfa592cb641', 'type': 'application/json'}}, {'id': 'ee5a1a18-4bba-49b5-960b-eabb4418ab5a', 'friendlyName': 'CN=ISE-DLC-CFME02-PSN.cisco.com, OU=ISE Messaging Service#Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN#00004', 'serialNumberDecimalFormat': '108100957755910846563764359601813445413', 'issuedTo': 'ISE-DLC-CFME02-PSN.cisco.com', 'issuedBy': 'Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN', 'validFrom': 'Thu Mar 28 16:24:12 CST 2024', 'expirationDate': 'Thu Mar 29 16:24:12 CST 2029', 'usedBy': 'ISE Messaging Service', 'keySize': 4096, 'groupTag': '', 'selfSigned': False, 'signatureAlgorithm': 'SHA256withRSA', 'portalsUsingTheTag': '', 'sha256Fingerprint': '3cf23d21cdae3bb412a24d3949a4e1e36666b7188fba24f15161be205c2de84a', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/ee5a1a18-4bba-49b5-960b-eabb4418ab5a', 'type': 'application/json'}}, {'id': '06024b57-e21d-44f7-ade9-f27835f825cd', 'friendlyName': 'CN=ISE-DLC-CFME02-PSN.cisco.com, OU=ISE Messaging Service#Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN#00001', 'serialNumberDecimalFormat': '161050984501207870146216443017020239440', 'issuedTo': 'ISE-DLC-CFME02-PSN.cisco.com', 'issuedBy': 'Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN', 'validFrom': 'Thu Mar 28 01:32:39 CST 2024', 'expirationDate': 'Thu Mar 29 01:32:39 CST 2029', 'usedBy': 'Not in use', 'keySize': 4096, 'groupTag': '', 'selfSigned': False, 'signatureAlgorithm': 'SHA256withRSA', 'portalsUsingTheTag': '', 'sha256Fingerprint': '53ebe08309e787d503a484538efe7631c89c6faa34371807cd98fd22a0ea3f4a', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/06024b57-e21d-44f7-ade9-f27835f825cd', 'type': 'application/json'}}, {'id': 'ba0833e1-d1b6-4080-bcf8-ef088cdcd2c8', 'friendlyName': 'CN=ISE-DLC-CFME02-PSN.cisco.com, OU=Certificate Services System Certificate#Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN#00002', 'serialNumberDecimalFormat': '47010535375030235417054492045580827528', 'issuedTo': 'ISE-DLC-CFME02-PSN.cisco.com', 'issuedBy': 'Certificate Services Endpoint Sub CA - ISE-DLC-CFME02-PSN', 'validFrom': 'Thu Mar 28 01:32:29 CST 2024', 'expirationDate': 'Thu Mar 29 01:32:29 CST 2029', 'usedBy': 'Not in use', 'keySize': 4096, 'groupTag': '', 'selfSigned': False, 'signatureAlgorithm': 'SHA256withRSA', 'portalsUsingTheTag': '', 'sha256Fingerprint': '656866d5143561929466b68d0bd207b67b3ae62cc69746fcef20a25000737d1c', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/ba0833e1-d1b6-4080-bcf8-ef088cdcd2c8', 'type': 'application/json'}}, {'id': '6c9c6d94-e693-4864-82cb-85ea37fd9527', 'friendlyName': 'Default self-signed saml server certificate - CN=SAML_ISE-BGL-CFME01-PAN.cisco.com', 'serialNumberDecimalFormat': '17112682887682578269840298717', 'issuedTo': 'SAML_ISE-BGL-CFME01-PAN.cisco.com', 'issuedBy': 'SAML_ISE-BGL-CFME01-PAN.cisco.com', 'validFrom': 'Sun Mar 24 16:18:08 CST 2024', 'expirationDate': 'Fri Mar 23 16:18:08 CST 2029', 'usedBy': 'SAML', 'keySize': 4096, 'groupTag': '', 'selfSigned': True, 'signatureAlgorithm': 'SHA384withRSA', 'portalsUsingTheTag': '', 'sha256Fingerprint': '010365518c6282e7fe54aa0b593433a2ae912000a3c76e0b2763b866bc7304e9', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/6c9c6d94-e693-4864-82cb-85ea37fd9527', 'type': 'application/json'}}, {'id': '9a7751ba-d630-43f2-b43d-bcf431dffa97', 'friendlyName': 'Default self-signed server certificate', 'serialNumberDecimalFormat': '17116455823360843797526070457', 'issuedTo': 'ISE-DLC-CFME02-PSN.cisco.com', 'issuedBy': 'ISE-DLC-CFME02-PSN.cisco.com', 'validFrom': 'Fri Mar 29 01:06:22 CST 2024', 'expirationDate': 'Sun Mar 29 01:06:22 CST 2026', 'usedBy': 'EAP Authentication, Admin, Portal, RADIUS DTLS', 'keySize': 4096, 'groupTag': 'Default Portal Certificate Group', 'selfSigned': True, 'signatureAlgorithm': 'SHA384withRSA', 'portalsUsingTheTag': 'BYOD Portal (default), Blocked List Portal (default), Certificate Provisioning Portal (default), Client Provisioning Portal (default), Hotspot Guest Portal (default), ISE Portal (default), MDM Portal (default), My Devices Portal (default), Self-Registered Guest Portal (default), Sponsor Portal (default), Sponsored Guest Portal (default)', 'sha256Fingerprint': 'f498da0b64fac68318f1f8f195e915c1000265d8950f610ec3bb9c75822739bd', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/9a7751ba-d630-43f2-b43d-bcf431dffa97', 'type': 'application/json'}}], 'nextPage': None, 'previousPage': None, 'version': '1.0.1'}

按ID取得特定節點的系統憑證

此API根據給定的主機名和ID提供特定節點的系統證書的詳細資訊。

第1步：API呼叫的必要資訊。

方法

取得

URL

https://<ISE-PAN-IP>/api/v1/certs/system-certificate/<ISE-Node-Hostname>/<ID-Of-Certificate>

憑證

使用Open API帳戶憑據

標頭

接受：application/json

Content-Type： application/json

第2步：根據給定的主機名和ID查詢用於檢索特定節點證書的URL。

API URI

第3步：以下是Python代碼的示例。複製並貼上內容。替換ISE IP、使用者名稱和密碼。另存為要執行的python檔案。

確保ISE與運行python代碼示例的裝置之間保持良好的連線。

from requests.auth import HTTPBasicAuth import requests requests.packages.urllib3.disable_warnings() if __name__ == "__main__": url = "https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/5b5b28e4-2a51-495c-8413-610190e1070b" headers = {"Accept": "application/json", "Content-Type": "application/json"} basicAuth = HTTPBasicAuth("ApiAdmin", "Admin123") response = requests.get(url=url, auth=basicAuth, headers=headers, verify=False) print("Return Code:") print(response.status_code) print("Expected Outputs:") print(response.json())

註：ID來自「獲取特定節點的所有系統證書」步驟3中的API輸出，例如，5b5b28e4-2a51-495c-8413-610190e1070b為「預設自簽名saml伺服器證書- CN=SAML_ISE-DLC-CFME02-PSN.cisco.com」。

以下是預期輸出的範例。

Return Code:

200

Expected Outputs:

{'response': {'id': '5b5b28e4-2a51-495c-8413-610190e1070b', 'friendlyName': 'Default self-signed saml server certificate - CN=SAML_ISE-DLC-CFME02-PSN.cisco.com', 'serialNumberDecimalFormat': '171164606212827159112166844026', 'issuedTo': 'SAML_ISE-DLC-CFME02-PSN.cisco.com', 'issuedBy': 'SAML_ISE-DLC-CFME02-PSN.cisco.com', 'validFrom': 'Fri Mar 29 01:14:22 CST 2024', 'expirationDate': 'Wed Mar 28 01:14:22 CST 2029', 'usedBy': 'Not in use', 'keySize': 4096, 'groupTag': '', 'selfSigned': True, 'signatureAlgorithm': 'SHA384withRSA', 'portalsUsingTheTag': '', 'sha256Fingerprint': '42ad8eeec643fce00605ac34aaf88ca5d687117591a2a4431b656dad8ce9616b', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/system-certificate/ISE-DLC-CFME02-PSN/5b5b28e4-2a51-495c-8413-610190e1070b', 'type': 'application/json'}}, 'version': '1.0.1'}

取得所有信任憑證的清單

API列出ISE集群的所有受信任證書。

第1步：API呼叫的必要資訊。

方法

取得

URL

https://<ISE-PAN-IP>/api/v1/certs/trusted-certificate

憑證

使用Open API帳戶憑據

標頭

接受：application/json

Content-Type： application/json

第2步：查詢用於檢索受信任證書的URL。

API URI

第3步：以下是Python代碼的示例。複製並貼上內容。替換ISE IP、使用者名稱和密碼。另存為要執行的python檔案。

確保ISE與運行python代碼示例的裝置之間保持良好的連線。

from requests.auth import HTTPBasicAuth import requests requests.packages.urllib3.disable_warnings() if __name__ == "__main__": url = "https://10.106.33.92/api/v1/certs/trusted-certificate" headers = {"Accept": "application/json", "Content-Type": "application/json"} basicAuth = HTTPBasicAuth("ApiAdmin", "Admin123") response = requests.get(url=url, auth=basicAuth, headers=headers, verify=False) print("Return Code:") print(response.status_code) print("Expected Outputs:") print(response.json())

以下是預期輸出的範例。（省略）

Return Code:

200

Expected Outputs:

{'response': [{'id': '147d97cc-6ce9-43d7-9928-8cd0fa83e140', 'friendlyName': 'VeriSign Class 3 Public Primary Certification Authority', 'subject': 'CN=VeriSign Class 3 Public Primary Certification Authority - G5,OU=(c) 2006 VeriSign\\, Inc. - For authorized use only,OU=VeriSign Trust Network,O=VeriSign\\, Inc.,C=US', 'issuedTo': 'VeriSign Class 3 Public Primary Certification Authority - G5', 'issuedBy': 'VeriSign Class 3 Public Primary Certification Authority - G5', 'keySize': '2048', 'signatureAlgorithm': 'SHA1withRSA', 'validFrom': 'Wed Nov 08 08:00:00 CST 2006', 'expirationDate': 'Thu Jul 17 07:59:59 CST 2036', 'serialNumberDecimalFormat': '33037644167568058970164719475676101450', 'description': 'Auto imported for secure connection to cisco.com/perfigo.com', 'status': 'Enabled', 'trustedFor': 'Cisco Services', 'internalCA': False, 'downloadCRL': 'off', 'crlDistributionUrl': None, 'automaticCRLUpdate': 'on', 'automaticCRLUpdatePeriod': '5', 'automaticCRLUpdateUnits': 'Minutes', 'nonAutomaticCRLUpdatePeriod': '1', 'nonAutomaticCRLUpdateUnits': 'Hours', 'crlDownloadFailureRetries': '10', 'crlDownloadFailureRetriesUnits': 'Minutes', 'authenticateBeforeCRLReceived': 'off', 'ignoreCRLExpiration': 'off', 'enableServerIdentityCheck': 'off', 'enableOCSPValidation': 'off', 'selectedOCSPService': '', 'rejectIfNoStatusFromOCSP': 'off', 'rejectIfUnreachableFromOCSP': 'off', 'sha256Fingerprint': '9acfab7e43c8d880d06b262a94deeee4b4659989c3d0caf19baf6405e41ab7df', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/trusted-certificate/147d97cc-6ce9-43d7-9928-8cd0fa83e140', 'type': 'application/json'}},{'id': '2ed8db2d-a93c-45a7-b0de-4ee52978bf36', 'friendlyName': 'Certificate Services Endpoint Sub CA - ISE-RTP-CFME02-MNT#00026', 'subject': 'CN=Certificate Services Endpoint Sub CA - ISE-RTP-CFME02-MNT', 'issuedTo': 'Certificate Services Endpoint Sub CA - ISE-RTP-CFME02-MNT', 'issuedBy': 'Certificate Services Node CA - ISE-BGL-CFME01-PAN', 'keySize': '4096', 'signatureAlgorithm': 'SHA256withRSA', 'validFrom': 'Fri Jul 05 11:14:45 CST 2024', 'expirationDate': 'Fri Mar 24 16:19:21 CST 2034', 'serialNumberDecimalFormat': '32567431426291188219902826022164975182', 'description': "Auto import of trust certificate from PSN's CA server", 'status': 'Enabled', 'trustedFor': 'Infrastructure,Endpoints', 'internalCA': True, 'downloadCRL': 'off', 'crlDistributionUrl': None, 'automaticCRLUpdate': 'on', 'automaticCRLUpdatePeriod': '5', 'automaticCRLUpdateUnits': 'Minutes', 'nonAutomaticCRLUpdatePeriod': '1', 'nonAutomaticCRLUpdateUnits': 'Hours', 'crlDownloadFailureRetries': '10', 'crlDownloadFailureRetriesUnits': 'Minutes', 'authenticateBeforeCRLReceived': 'off', 'ignoreCRLExpiration': 'off', 'enableServerIdentityCheck': 'off', 'enableOCSPValidation': 'on', 'selectedOCSPService': 'Internal_OCSP_Service', 'rejectIfNoStatusFromOCSP': 'on', 'rejectIfUnreachableFromOCSP': 'off', 'sha256Fingerprint': '6162311dcf7a2517a6bb454b9e7e46ad64cbf4be1fcfc73680730304c94e28f7', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/trusted-certificate/2ed8db2d-a93c-45a7-b0de-4ee52978bf36', 'type': 'application/json'}},{'id': '34ae5495-f892-422b-b27e-4e48246b54cc', 'friendlyName': 'Certificate Services OCSP Responder - ISE-RTP-CFME02-MNT#00027', 'subject': 'CN=Certificate Services OCSP Responder - ISE-RTP-CFME02-MNT', 'issuedTo': 'Certificate Services OCSP Responder - ISE-RTP-CFME02-MNT', 'issuedBy': 'Certificate Services Endpoint Sub CA - ISE-RTP-CFME02-MNT', 'keySize': '2048', 'signatureAlgorithm': 'SHA256withRSA', 'validFrom': 'Fri Jul 05 11:16:34 CST 2024', 'expirationDate': 'Fri Jul 06 11:16:34 CST 2029', 'serialNumberDecimalFormat': '32318639486615740757657486695632971049', 'description': "Auto import of trust certificate from PSN's CA server", 'status': 'Enabled', 'trustedFor': 'Infrastructure,Endpoints', 'internalCA': True, 'downloadCRL': 'off', 'crlDistributionUrl': None, 'automaticCRLUpdate': 'on', 'automaticCRLUpdatePeriod': '5', 'automaticCRLUpdateUnits': 'Minutes', 'nonAutomaticCRLUpdatePeriod': '1', 'nonAutomaticCRLUpdateUnits': 'Hours', 'crlDownloadFailureRetries': '10', 'crlDownloadFailureRetriesUnits': 'Minutes', 'authenticateBeforeCRLReceived': 'off', 'ignoreCRLExpiration': 'off', 'enableServerIdentityCheck': 'off', 'enableOCSPValidation': 'off', 'selectedOCSPService': '', 'rejectIfNoStatusFromOCSP': 'off', 'rejectIfUnreachableFromOCSP': 'off', 'sha256Fingerprint': 'bae344121c6fd3b9cfe43c4853406595f450b5d90c474419e8d692e0098a1200', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/trusted-certificate/34ae5495-f892-422b-b27e-4e48246b54cc', 'type': 'application/json'}}], 'nextPage': None, 'previousPage': None, 'version': '1.0.1'}

透過ID獲取信任證書

此API可根據給定ID顯示信任證書的詳細資訊。

第1步：API呼叫的必要資訊。

方法

取得

URL

https://<ISE-PAN-IP>/api/v1/certs/trusted-certificate/<ID-Of-Certificate>

憑證

使用Open API帳戶憑據

標頭

接受：application/json

Content-Type： application/json

第2步：查詢用於檢索部署資訊的URL。

API URI

第3步：以下是Python代碼的示例。複製並貼上內容。替換ISE IP、使用者名稱和密碼。另存為要執行的python檔案。

確保ISE與運行python代碼示例的裝置之間保持良好的連線。

from requests.auth import HTTPBasicAuth import requests requests.packages.urllib3.disable_warnings() if __name__ == "__main__": url = "https://10.106.33.92/api/v1/certs/trusted-certificate/147d97cc-6ce9-43d7-9928-8cd0fa83e140" headers = {"Accept": "application/json", "Content-Type": "application/json"} basicAuth = HTTPBasicAuth("ApiAdmin", "Admin123") response = requests.get(url=url, auth=basicAuth, headers=headers, verify=False) print("Return Code:") print(response.status_code) print("Expected Outputs:") print(response.json())

註：ID來自「獲取所有受信任證書清單」第3步中的API輸出，例如，147d97cc-6ce9-43d7-9928-8cd0fa83e140是「VeriSign 3類公共主要證書頒發機構」。

以下是預期輸出的範例。

Return Code: 200 Expected Outputs: {'response': {'id': '147d97cc-6ce9-43d7-9928-8cd0fa83e140', 'friendlyName': 'VeriSign Class 3 Public Primary Certification Authority', 'subject': 'CN=VeriSign Class 3 Public Primary Certification Authority - G5,OU=(c) 2006 VeriSign\\, Inc. - For authorized use only,OU=VeriSign Trust Network,O=VeriSign\\, Inc.,C=US', 'issuedTo': 'VeriSign Class 3 Public Primary Certification Authority - G5', 'issuedBy': 'VeriSign Class 3 Public Primary Certification Authority - G5', 'keySize': '2048', 'signatureAlgorithm': 'SHA1withRSA', 'validFrom': 'Wed Nov 08 08:00:00 CST 2006', 'expirationDate': 'Thu Jul 17 07:59:59 CST 2036', 'serialNumberDecimalFormat': '33037644167568058970164719475676101450', 'description': 'Auto imported for secure connection to cisco.com/perfigo.com', 'status': 'Enabled', 'trustedFor': 'Cisco Services', 'internalCA': False, 'downloadCRL': 'off', 'crlDistributionUrl': None, 'automaticCRLUpdate': 'on', 'automaticCRLUpdatePeriod': '5', 'automaticCRLUpdateUnits': 'Minutes', 'nonAutomaticCRLUpdatePeriod': '1', 'nonAutomaticCRLUpdateUnits': 'Hours', 'crlDownloadFailureRetries': '10', 'crlDownloadFailureRetriesUnits': 'Minutes', 'authenticateBeforeCRLReceived': 'off', 'ignoreCRLExpiration': 'off', 'enableServerIdentityCheck': 'off', 'enableOCSPValidation': 'off', 'selectedOCSPService': '', 'rejectIfNoStatusFromOCSP': 'off', 'rejectIfUnreachableFromOCSP': 'off', 'sha256Fingerprint': '9acfab7e43c8d880d06b262a94deeee4b4659989c3d0caf19baf6405e41ab7df', 'link': {'rel': 'self', 'href': 'https://10.106.33.92/api/v1/certs/trusted-certificate/147d97cc-6ce9-43d7-9928-8cd0fa83e140', 'type': 'application/json'}, 'isReferredInPolicy': False}, 'version': '1.0.1'}

疑難排解

若要疑難排解與開放式API相關的問題，請在偵錯日誌組態視窗中將theapiservicecomponent 的日誌層級設定為DEBUG。

要啟用調試，請導航到操作>故障排除>調試嚮導>調試日誌配置> ISE節點>裝置服務。

API服務調試

要下載調試日誌，請導航到操作>故障排除>下載日誌> ISE PAN節點>調試日誌。

下載調試日誌